CATÁLOGO DE PRODUTOS

MAIO 2016

2016.

UM ANO DE OPORTUNIDADES,

UM RENOVADO CATÁLOGO E UMA

NOVA PÁGINA NA NOSSA HISTÓRIA.

Um catálogo de produtos reúne linhas de peças e equipamentos, referências técnicas, variedade de fornecedores. Possui organização, facilidade de busca, de leitura e qualidade de imagens.

O catálogo que está em suas mãos foi feito pensando além. Para nós, ele é uma oportunidade, um importante momento de contato com você, que vai de assuntos profissionais a um elemento fundamental na vida de pessoas e empresas: confiança.

Completamos esse ano mais de 10 anos de estrada, incontáveis pedidos, entregas, viagens, telefonemas, e-mails, encontros e aprendizados.

Tudo isso só foi possível porque, nesse tempo, desenvolvemos uma estreita relação com nossos clientes, que começa com a equipe de profissionais Ótima e resulta em procedimentos aprimorados, seguros e assertivos.

Nessas páginas você encontra tintas, impermeabilizantes, materiais hidráulicos, abrasivos, ferragens, utilidades do lar e ferramentas manuais e elétricas, de marcas nacionais e importadas, mas, além disso, encontra compromisso.

Um compromisso global, pois pensa no futuro e trabalha diariamente para construir e manter uma relação sólida e duradoura com clientes e fornecedores. Seja através do rígido padrão de qualidade, da logística apurada ou da equipe de vendas que fala a mesma língua que você.

Assim, conquistamos prêmios no setor atacadista, reconhecimentos que nos trazem orgulho, mas que representam essencialmente nosso esforço em entregar sempre o melhor serviço.

Ano após ano, mérito após mérito, entrega após entrega, cada um nos faz olhar para nós mesmos e buscar novos processos, mais dinâmicos e em sintonia com as necessidades do mercado. São práticas de um cotidiano de que quem alia expertise no segmento com ferramentas inovadoras e pessoas focadas.

Por isso, seguimos acreditando, pois dessa forma renovamos nosso compromisso com você, com a confiança de que ainda escreveremos juntos muitas páginas dessa história.

ÍNDICE

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

HIDRÁULICA

ARMÁRIO VIENA 42X50 COM ESPELHEIRA ...........................................14

GRELHA ROTATIVA QUADRADA COM DISPOSITIVO

ARMÁRIO VIX 65X60 COM ESPELHEIRA ................................................14

DE VEDAÇÃO CROMADA ......................................................................20

ACAMENTOS E REGISTROS

ARMÁRIO VIX 65X60 COM ESPELHEIRA ...............................................14

RALO QUADRADO COM CAIXILHO INOX ...............................................20

ARMÁRIO VIX 65X60 COM ESPELHEIRA ...............................................14

ACABAMENTO PARA REGISTRO ...........................................................11

ARMÁRIO VIX 65X60 COM ESPELHEIRA ...............................................14

PIAS E ARMÁRIOS DE COZINHA

ITAPEMA BELLA ..................................................................................11

BALCÃO COZINHA FLEX 1,20M ............................................................20

ACABAMENTO PARA REGISTRO PERTUTTI ...........................................11

ACESSÓRIOS DE BANHEIRO

CUBA INOX SEM POLIMENTO AÇO 430 SEM VÁLVULA 3/5" ..................20

ACABAMENTO PARA REGISTRO RIVA ...................................................11

CABIDE PLÁSTICO COM 1 GANCHO BRANCO .......................................14

PIA INOX LISA AÇO 430 SEM VÁLVULA 3/5" .........................................20

ACABAMENTO PARA REGISTRO TRIO ....................................................11

CABIDE PLÁSTICO COM 3 GANCHOs BRANCOs ....................................14

PIA INOX 1,05M AÇO 430 SEM VÁLVULA 3/5" .......................................20

ACABAMENTO PARA REGISTRO C33 ....................................................11

GANCHO COM VENTOSA 4 PEÇAS ........................................................14

PIA INOX 1,20M AÇO 430 SEM VÁLVULA 3/5" .......................................20

ACABAMENTO PARA REGISTRO C50 ....................................................11

GANCHO PLÁSTICO 3 PEÇAS COM ADESIVO DE FIXAÇÃO .....................14

PIA INOX 2,00M AÇO 430 SEM VÁLVULA 3/5" .......................................20

ACABAMENTO VÁLVULA DESCARGA CLÁSSICA SALVÁGUA ....................11

GANCHO PLÁSTICO CROMADO 3 PEÇAS COM ADESIVO DE FIXAÇÃO ....15

ACABAMENTO VÁLVULA DESCARGA SALVÁGUA BOX CHROME ABS .......11

DUCHA HIGIÊNICA FLEXÍVEL EM AÇO INOX 1,20M ................................15

LOUÇAS SANITÁRIAS

ACABAMENTO VÁLVULA DESCARGA SALVÁGUA BOX .............................11

DUCHA HIGIÊNICA FLEXÍVEL EM AÇO INOX 1,20M ................................15

TANQUE PLÁSTICO 15 LITROS .............................................................20

ACABAMENTO VÁLVULA DESCARGA CLÁSSICA .....................................11

DUCHA HIGIÊNICA FLEXÍVEL LISO PVC 1,20MT .....................................15

TANQUE LOUÇA MÉDIO 31 LITROS ......................................................20

ACABAMENTO VÁLVULA DESCARGA CLÁSSICA ....................................11

DUCHA HIGIÊNICA 1/4" VOLTA TRIO .....................................................15

COLUNA PARA TANQUE .......................................................................20

ACABAMENTO VÁLVULA DESCARGA ....................................................11

DUCHA HIGIÊNICA MVS PERTUTTI ........................................................15

TANQUE INOX SOBREPOR SEM ESPELHO 23 LITROS VS3 ......................20

ACABAMENTO VÁLVULA DESCARGA ....................................................11

DUCHA HIGIÊNICA PVC 1/4 VOLTA ALAVANCA 1,20M BRANCA ...............15

BACIA CONVENCIONAL FIT ..................................................................20

VÁLVULA DESCARGA BASE .................................................................11

DUCHA HIGIÊNICA PVC 1/4 VOLTA ALAVANCA 1/2 1,20M CROMADA .....15

BACIA CONVENCIONAL PARATI ............................................................20

REGISTRO GAVETA COM ACABAMENTO C33 ABS .................................11

KIT ACESSÓRIO 5 PÇS ABS VERSÁTIL ..................................................15

BACIA CONVENCIONAL THEMA PLUS ...................................................20

REGISTRO GAVETA COM ACABAMENTO C50 ABS .................................11

KIT ACESSÓRIO METAL 5 PÇS FUNZIONALE ..........................................15

BACIA PARA CAIXA PARATI ..................................................................20

REGISTRO GAVETA BASE .....................................................................12

GATILHO PARA DUCHA HIGIÊNICA ........................................................15

CAIXA PARA ACOPLAR PARATI ECOFLUSH 3/6L ....................................20

REGISTRO GAVETA COM ACABAMENTO BRUTO EUROPA ......................12

SUPORTE PARA DUCHA HIGIÊNICA UNIVERSAL .....................................15

CAIXA PARA ACOPLAR PARATI .............................................................23

REGISTRO PRESSÃO COM ACABAMENTO C33 ABS ...............................12

MANGUEIRA PARA DUCHA HIGIÊNICA AÇO INOX 1,20M ........................15

BACIA COM CAIXA FIT ECOFLUSH 3/6 LITROS.......................................23

REGISTRO PRESSÃO COM ACABAMENTO C50 ABS ...............................12

MANGUEIRA PARA DUCHA HIGIÊNICA AÇO INOX 1,20M .........................15

BACIA COM CAIXA PARATI ECOFLUSH 3/6L ..........................................23

REGISTRO PRESSÃO BASE ...................................................................12

MANGUEIRA PARA DUCHA HIGIÊNICA PVC BRANCA 1,20M ...................15

CUBA DE APOIO THEMA 50X36CM .......................................................23

REGISTRO PRESSÃO BASE ..................................................................12

PORTA PAPEL HIGIÊNICO RESISTENZA .................................................15

CUBA DE APOIO FIT .............................................................................23

REGISTRO PRESSÃO BASETEC 1/4 DE VOLTA ITAPEMA BELLA ...............12

ROLETE PARA PAPEL HIGIÊNICO 13,5X2,4CM .......................................15

CUBA EMBUTIR OVAL 49X32CM ..........................................................23

REGISTRO PRESSÃO BASETEC 1/2 VOLTA PERTUTTI ............................12

BARRA DE APOIO 40CM METAL CROMADO .........................................15

LAVATÓRIO PARA COLUNA FIT 47X42CM ..............................................23

REGISTRO PRESSÃO BASETEC CERÂMICO 1/2 VOLTA ..........................12

BARRA DE APOIO 40CM PLÁSTICO BRANCO .........................................15

COLUNA PARA LAVATÓRIO FIT ..............................................................23

REGISTRO PARA MÁQUINA DE LAVAR ..................................................12

ASSENTO SANITÁRIO ALMOFADADO BRANCO .......................................15

LAVATÓRIO PARA COLUNA PARATI 47X42CM ........................................23

ACESSÓRIOS DE HIDRÁULICA

ASSENTO SANITÁRIO UNIVERSAL ALMOFADADO ...................................17

COLUNA PARA LAVATÓRIO PARATI .......................................................23

ASSENTO SANITÁRIO UNIVERSAL PREMIER ..........................................17

LAVATÓRIO PARA COLUNA PARATI 47X42CM ........................................23

KIT REPARO PARA VÁLVULA DE DESCARGA ..........................................12

ASSENTO SANITÁRIO UNIVERSAL PREMIER ..........................................17

COLUNA PARA LAVATÓRIO PARATI .......................................................23

KIT REPOSIÇÃO REGISTRO ..................................................................12

ASSENTO SANITÁRIO UNIVERSAL PREMIER ...........................................17

LAVATÓRIO SUSPENSO GUARAPARI 46X34CM ......................................23

BICO PARA TORNEIRA JARDIM PRETA ..................................................12

ASSENTO SANITÁRIO UNIVERSAL NOVO BRANCO .................................17

TAMPA PARA CAIXA ACOPLADA TP BRANCO PARATI .............................23

BOIA PARA CAIXA DE DESCARGA HASTE .............................................12

ASSENTO SANITÁRIO UNIVERSAL SOFT ...............................................17

LAVATÓRIO PLÁSTICO 36X26CM ..........................................................23

BOIA PARA CAIXA D’ÁGUA HASTE ALUMÍNIO .........................................12

ASSENTO SANITÁRIO UNIVERSAL SOFT ...............................................17

MICTÓRIO CONVENCIONAL 01 ............................................................23

BOIA PARA CAIXA D’áGUA ...................................................................12

ASSENTO SANITÁRIO UNIVERSAL SOFT ...............................................17

BOIA REPARO CAIXA ACOPLADA .........................................................12

FILTROS

ASSENTO SANITÁRIO PERFECTO MULTI ...............................................17

BOTÃO ACIONAMENTO LATERAL PARA CAIXA ACOPLADA ....................12

ASSENTO SANITÁRIO THEMA ..............................................................17

TORNEIRA COM FILTRO PAREDE C50 ...................................................23

BOTÃO ACIONAMENTO SUSPENSO PARA CAIXA ACOPLADA .................12

SIFÃO UNIVERSAL DUPLO PLÁSTICO ...................................................17

TORNEIRA COM FILTRO PAREDE C33 ....................................................23

CAIXA DESCARGA 8 LITROS .................................................................12

SIFÃO UNIVERSAL DUPLO PLÁSTICO ...................................................17

TORNEIRA COM FILTRO PAREDE PRÁTICA .............................................23

CAIXA DESCARGA CONTROLADA ECO NOVA 6/9 LITROS ......................13

SIFÃO UNIVERSAL DUPLO PLÁSTICO ...................................................17

TORNEIRA COM FILTRO PAREDE PLUS .................................................23

CAIXA DESCARGA CONTROLADA 9 LITROS ..........................................13

SIFÃO UNIVERSAL SIMPLES PLÁSTICO 1,50CM ....................................17

TORNEIRA COM FILTRO PAREDE ACQUABELLA .....................................24

MECANISMO ENTRADA CAIXA ACOPLADA ...........................................13

SIFÃO UNIVERSAL SIMPLES PLÁSTICO 72CM .......................................17

MECANISMO SAÍDA CAIXA ACOPLADA COM ACIONAMENTO PNEMATIC 13

TORNEIRAS

SIFÃO UNIVERSAL SIMPLES PLÁSTICO 72CM .......................................17

MECANISMO SAÍDA CAIXA ACOPLADA .................................................13

TORNEIRA COZINHA MESA 1/4 DE VOLTA RIVA .....................................24

SIFÃO UNIVERSAL SIMPLES PLÁSTICO 73CM ........................................17

REPARO VÁLVULA SAÍDA ACIONAMENTO SUPERIOR .............................13

TORNEIRA COZINHA MESA 1/4 DE VOLTA TRIO ....................................24

SIFÃO UNIVERSAL SIMPLES PLÁSTICO .................................................17

REPARO PARA CAIXA ACOPLADA NATURAL ..........................................13

TORNEIRA COZINHA MESA MVS PERTUTTI ............................................24

CONJUNTO ENTRADA MECÂNICA PARA CAIXA ACOPLADA ....................13

VÁLVULAS E GRELHAS

TORNEIRA COZINHA MESA MVS ABS/METAL C33..................................24

CONJUNTO DE FIXAÇÃO .....................................................................13

VÁLVULA PIA AMERICANA METAL ........................................................17

TORNEIRA COZINHA MESA MVS ABS/METAL C50..................................24

CONJUNTO SAÍDA D'ÁGUA UNIVERSAL ................................................13

VÁLVULA PIA AMERICANA INOX STANDARD ..........................................17

TORNEIRA COZINHA MESA 1/4 VOLTA ABS/BRANCA C31 ......................24

CORRENTE E FIXADOR ........................................................................13

VÁLVULA PIA AMERICANA INOX DOMINUS ............................................19

TORNEIRA COZINHA MESA 1/4 VOLTA ABS/CROMADO C31 ...................24

OBTURADOR PARA SAÍDA ÁGUA FLEXÍVEL 2" .......................................13

ENGATE INOX .....................................................................................19

TORNEIRA COZINHA MESA 1/4 VOLTA ABS/BRANCA C50 ......................24

OBTURADOR PARA VEDAÇÃO MECANISMO DE SAÍDA ..........................13

ENGATE PLÁSTICO ...............................................................................19

TORNEIRA COZINHA MESA 1/4 VOLTA ABS/CROMADO C50 ...................24

BOLSA DE VEDAÇÃO PARA CAIXA DESCARGA ACOPLADA ....................13

TAMPÃO PARA VÁLVULA DE LAVATÓRIO................................................19

TORNEIRA COZINHA MESA MVS ABS/BRANCA PLUS ............................24

CONJUNTO LIGAÇÃO AJUSTE COM BOLSA 25CM CROMADO ...............13

ADAPTADOR PARA VÁLVULA PIA E LAVATÓRIO .....................................19

TORNEIRA COZINHA PAREDE MVS METAL PERTUTTI .............................24

ANEL DE VEDAÇÃO .............................................................................13

VÁLVULA PARA LAVATÓRIO METAL .......................................................19

TORNEIRA COZINHA PAREDE MVS ABS/METAL C50 ..............................24

ANEL DE VEDAÇÃO ..............................................................................13

VÁLVULA PARA TANQUE ......................................................................19

TORNEIRA COZINHA PAREDE 1/4 VOLTA METAL C50 .............................24

ANEL DE VEDAÇÃO COM GUIA .............................................................13

VÁLVULA PARA LAVATÓRIO E PIA .........................................................19

TORNEIRA COZINHA PAREDE 1/4 VOLTA ABS/BRANCA C31 ...................24

ESPUDE PARA VASO SANITÁRIO ...........................................................13

REGULADOR VAZÃO STANDARD RRV PVC .............................................19

TORNEIRA COZINHA PAREDE 1/4 VOLTA ABS/CROMADO C31 ................24

PROLONGADOR MULTIUSO .................................................................13

VÁLVULA RETENÇÃO COM FILTRO PARA POÇO ABS ..............................19

TORNEIRA COZINHA PAREDE 1/4 VOLTA ABS/CROMADO C50 ................24

PROLONGADOR MULTIUSO .................................................................14

VÁLVULA RETENÇÃO UNIVERSAL .........................................................19

TORNEIRA COZINHA PAREDE MVS ABS/METAL C33 ..............................24

REPARO TORNEIRA .............................................................................14

VÁLVULA RETENÇÃO VERTICAL ............................................................19

TORNEIRA COZINHA PAREDE MVS ABS/BRANCA PLUS ..........................24

VEDANTE PARA TORNEIRA ..................................................................14

VÁLVULA SUCÇÃO ..............................................................................19

TORNEIRA COZINHA PAREDE MVS ABS/METAL C33 ..............................24

TORNEIRA COZINHA PAREDE 1/4 VOLTA ABS/CROMADO C31 ................25

ARMÁRIOS DE BANHEIRO

CAIXA COLETORA DE GORDURA GRANDE ............................................19

CAIXA DE GORDURA QUADRADA .........................................................19

TORNEIRA COZINHA PAREDE 1/4 VOLTA ABS/CROMADO C50 ................25

ARMÁRIO PLÁSTICO COM CANTONEIRA EM ALUMÍNIO ..........................14

GRELHA PARA RALO E CAIXA QUADRADA BRANCA ..............................19

TORNEIRA COZINHA PAREDE CHUVEIRINHO 15CM BRANCA ..................25

ARMÁRIO PLÁSTICO VERSÁTIL ............................................................14

PORTA GRELHA QUADRADA BRANCA ...................................................19

TORNEIRA COZINHA PAREDE JATO SIMPLES 18CM BRANCA .................25

ARMÁRIO PLÁSTICO BRANCO 34X37X10 .............................................14

RALO QUADRADO SIFONADO ..............................................................19

TORNEIRA LAVATÓRIO BRANCA ...........................................................25

ESPELHO OVAL 56X44,5X2CM ............................................................14

RALO REDONDO SIFONADO ................................................................19

TORNEIRA LAVATÓRIO PLUS BRANCA ..................................................25

ESPELHO RETANGULAR 54X54X3CM ...................................................14

CAIXA SIFONADA QUADRADA COM 3 ENTRADAS .................................19

TORNEIRA LAVATÓRIO METAL .............................................................25

CANTONEIRA GRANDE BRANCA ...........................................................14

CAIXA SIFONADA QUADRADA COM 7 ENTRADAS ..................................20

TORNEIRA LAVATÓRIO PRESSMATIC COMPACT .....................................25

CANTONEIRA BANHEIRO BRANCO ........................................................14

GRELHA QUADRADA COM CAIXILHO INOX ............................................20

TORNEIRA LAVATÓRIO MVS ABS/METAL C33 ........................................25

PRATELEIRA PVC BRANCA ...................................................................14

TORNEIRA LAVATÓRIO MVS ABS/METAL C50 .......................................25

4

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

ÍNDICE

TORNEIRA LAVATÓRIO 1/4 VOLTA ALAVANCA ABS/BRANCA ALAVANCA ..25

CURVA 90° SOLDÁVEL ........................................................................32

COLA 793 INSTANTÂNEO BICO ANTIENTUPIMENTO ..............................38

TORNEIRA LAVATÓRIO 1/4 VOLTA ALAVANCA ABS/CROMADA ALAVANCA 25

CURVA 90° CURTA COLUNA SÉRIE REFORÇADA (AZUL) .........................32

COLA 793 INSTANTÂNEO BICO ANTIENTUPIMENTO ..............................38

TORNEIRA LAVATÓRIO MVS ABS/METAL C33 ........................................25

CURVA DE TRANSPOSIÇÃO SOLDÁVEL ..................................................32

COLA AZULEJO E PASTILHA MASSAPLIC ..............................................38

TORNEIRA LAVATÓRIO MVS ABS/METAL C50 .......................................25

JOELHO 45° ESGOTO PRIMÁRIO E SECUNDÁRIO ...................................32

COLA BRANCA ...................................................................................38

TORNEIRA LAVATÓRIO MVS ABS/METAL C50 .......................................25

JOELHO 45° ESGOTO PRIMÁRIO E SECUNDÁRIO ...................................32

COLA BRANCA EXTRA CASCOREZ .......................................................38

TORNEIRA LAVATÓRIO 1/4 DE VOLTA TRIO ............................................25

JOELHO 45º SOLDÁVEL ......................................................................32

COLA BRANCA EXTRA CASCOREZ .......................................................38

TORNEIRA LAVATÓRIO MVS PERTUTTI...................................................25

JOELHO 90º ESGOTO PRIMÁRIO SN .....................................................32

COLA BRANCA UNIVERSAL ..................................................................38

TORNEIRA LAVATÓRIO 1/4 VOLTA ABS/BRANCA C31 .............................25

JOELHO 90º ESGOTO PRIMÁRIO E SECUNDARIO ...................................32

COLA BRANCA EXTRA .........................................................................38

TORNEIRA LAVATÓRIO 1/4 VOLTA ABS/CROMADA C31 ..........................25

JOELHO 90º ESGOTO PRIMÁRIO E SECUNDARIO ...................................32

COLA BRANCA EXTRA .........................................................................39

TORNEIRA LAVATÓRIO 1/4 VOLTA ABS/CROMADA C50 ..........................25

JOELHO 90 ROSCAvél ..........................................................................34

COLA DE CONTATO .............................................................................39

TORNEIRA PAREDE LONGA PERTUTTI ..................................................27

JOELHO 90º SOLDÁVEL BUCHA LATÃO .................................................34

COLA DE CONTATO CASCOLA S/TOLUOL .............................................39

TORNEIRA TANQUE 10CM 1/2 BRANCA ...............................................27

JOELHO 90º SOLDÁVEL ROSCA (LR) .....................................................34

COLA DE CONTATO CASCOLA S/ TOLUOL ............................................39

TORNEIRA TANQUE 15CM 1/2 BRANCA ...............................................27

JOELHO 90º SOLDÁVEL ......................................................................34

COLA DE CONTATO CASCOLA S/ TOLUOL ............................................39

TORNEIRA TANQUE 10CM COM BICO PARA MANGUEIRA ......................27

JOELHO 90º ESGOTO VIS. ....................................................................34

COLA DE CONTATO S/ TOLUOL ............................................................39

TORNEIRA TANQUE 15CM COM BICO PARA MANGUEIRA ......................27

VÁLVULA RETENÇÃO ESGOTO ..............................................................34

COLA DE CONTATO S/ TOLUOL ............................................................39

TORNEIRA TANQUE 1/4 VOLTA ABS CROMADO C31 ...............................27

JUNÇÃO 45º ESGOTO PRIMÁRIO E SECUNDÁRIO ..................................34

COLA DE CONTATO S/ TOLUOL ............................................................39

TORNEIRA TANQUE 1/4 VOLTA ABS CROMADO C50 ...............................27

JUNÇÃO 45º REDUÇÃO SIMP. ESGOTO PRIMÁRIO .................................34

COLA INSTANTÂNEA SUPER COLA .......................................................39

TORNEIRA JARDIM PAREDE BICO PARA MANGUEIRA .............................27

JUNÇÃO 45º REDUÇÃO SIMP. ESGOTO PRIMÁRIO .................................34

COLA MADEIRA ..................................................................................39

TORNEIRA JARDIM PAREDE PRETA .......................................................27

JUNCAO DUPLA ESGOTO PRIMÁRIO ....................................................34

COLABOND INSTANTÂNEO ..................................................................39

TORNEIRA JARDIM PAREDE DE ESFERA BRANCA .................................27

LUVA CORRER PARA TUBO ESGOTO ....................................................34

EPOXI SUPER LIQ 10 MIN ALUM (8G+8G) .............................................39

TORNEIRA JARDIM PAREDE METAL 3/4 MVS AMARELA .........................27

LUVA CORRER PARA TUBO SOLDÁVEL .................................................34

EPOXI SUPER LIQ 10 MIN (3G+3G) ......................................................39

TORNEIRA JARDIM PAREDE METAL 3/4 MVS CROMADA ........................27

LUVA ESGOTO PRIMÁRIO E SECUNDÁRIO ..............................................34

ESPONJA MÁGICA MR. STRONG ..........................................................39

TORNEIRA JARDIM PAREDE METAL COM BICO PERTUTTI ......................27

LUVA ESGOTO PRIMÁRIO E SECUNDÁRIO ..............................................34

ESPUMA EXPANSIVA BRICOLAGEM ......................................................39

TORNEIRA MÁQUINA LAVAR DE ESFERA CROMADA ...............................27

LUVA REDUÇÃO ROSCÁVEL ..................................................................34

ESPUMA EXPANSIVA ...........................................................................39

TORNEIRA MÁQUINA LAVAR E TANQUE COM BICO .................................27

LUVA REDUÇÃO ROSCÁVEL ..................................................................34

ESPUMA EXPANSIVA CONSTRUÇÃO .....................................................39

TORNEIRA TANQUE MÁQUINA LAVAR ABS/METAL C33 ...........................27

LUVA ROSCÁVEL .................................................................................34

TORNEIRA TANQUE MÁQUINA LAVAR COM BICO PERTUTTI ...................27

LUVA SIMPLES ESGOTO SÉRIE REFORÇADA (AZUL) ...............................34

FITAS

TORNEIRA TANQUE MÁQUINA LAVAR 1/4 VOLTA ABS/BRANCA C31 ........27

LUVA SOLDÁVEL .................................................................................34

FITA ANTIDERRAPANTE PRETA ..............................................................39

TORNEIRA TANQUE MÁQUINA LAVAR 1/4 VOLTA ABS/CROMADO C31 ....27

LUVA SOLDÁVEL BUCHA LATÃO ..........................................................34

FITA ANTIDERRAPANTE PRETA .............................................................39

TORNEIRA TANQUE MÁQUINA LAVAR 1/4 VOLTA ABS/BRANCA C50 ........27

LUVA SOLDÁVEL ROSCÁVEL (LR) .........................................................35

FITA ANTIDERRAPANTE TRANSPARENTE ...............................................39

TORNEIRA TANQUE MÁQUINA LAVAR 1/4 VOLTA ABS/CROMADO C50 ....29

NÍPEL ROSCÁVEL ................................................................................35

FITA CREPE MASK ..............................................................................41

VELA REFIL PARA FILTRO MART PLAST ................................................29

PLUG ROSCÁVEL ................................................................................35

FITA CREPE NORFLEX AUTOMOTIVA SANFONADA..................................41

VELA REFIL PARA PURIFICADOR DE ÁGUA 1/2 .....................................29

PROLONGAMENTO CAIXA SIFONADA ...................................................35

FITA CREPE 18 X 50 AUTOMOTIVA ........................................................41

TORNEIRA PARA FILTRO BR 3/8” .........................................................29

REDUÇÃO EXC. ESGOTO PRIMÁRIO ......................................................35

FITA CREPE 24 X 50 USO GERAL ..........................................................41

TORNEIRA PARA FILTRO MR/PT 3/8”.....................................................29

REGISTRO DE ESFERA ROSCA INTERNA ................................................35

FITA CREPE 48 X 50 AUTOMOTIVA ........................................................41

TORNEIRA PARA FILTRO SUPER BRANCA/AZUL 3/8” ..............................29

REGISTRO DE PRESSÃO SOLDÁVEL .....................................................35

FITA CREPE 18 X 50 USO GERAL SANFONADA PT 06 ............................41

TORNEIRA PARA FILTRO BRANCA/PRETA 5/8” .......................................29

REGISTRO ESFERA ROSCA EXTERNA ....................................................35

FITA CREPE 48 X 50 USO GERAL PREMIUM AZUL ..................................41

TORNEIRA PARA FILTRO GELÁGUA BR ..................................................29

REGISTRO ESFERA ROSCÁVEL EXTERNA ...............................................35

FITA CREPE PACOTE COM 5 UNIDADES ................................................41

TORNEIRA PARA FILTRO GELÁGUA BRANCA/AZUL ................................29

REGISTRO ESFERA SOLDÁVEL .............................................................35

FITA CREPE PACOTE COM 5 UNIDADES ................................................41

SUPORTE PARA GARRAFÃO BRANCO ...................................................29

REGISTRO ESFERA SOLDÁVEL COM UNIÃO ..........................................35

FITA CREPE ........................................................................................41

ADAPTADOR PARA TORNEIRA FILTRO ..................................................29

TÊ DE INSPEÇÃO ESGOTO ....................................................................35

FITA DE DEMARCAÇÃO AMARELA ........................................................41

FITA DE DEMARCAÇÃO BRANCA ..........................................................41

BOMBAS

TÊ ESGOTO SECUNDÁRIO ....................................................................35

TÊ ESGOTO PRIMÁRIO ........................................................................35

FITA DE DEMARCAÇÃO VERDE .............................................................41

BOMBA D'ÁGUA 1/2HP QB60 (PERIFÉRICA) ..........................................29

TÊ REDUÇÃO PARA ESGOTO PRIMÁRIO ...............................................35

FITA DE DEMARCAÇÃO VERMELHA .......................................................41

BOMBA D'ÁGUA SUBMERSA "L" 750 3/4” 127 V .................................29

TÊ REDUÇÃO SOLDÁVEL .....................................................................35

FITA DUPLA FACE ...............................................................................41

BOMBA D'ÁGUA SUBMERSA "L" 850 3/4” 127 ...................................29

TÊ ROSCÁVEL ......................................................................................35

FITA DUPLA FACE ACRÍLICA INTERNA BLISTER .....................................41

BOMBA D'ÁGUA SUBMERSA "L" 950 1" 127 V ....................................29

TÊ SOLDÁVEL ......................................................................................35

FITA DUPLA FACE ACRÍLICA INTERNA BLISTER .....................................41

BOMBA D'ÁGUA SUBMERSA PUMP 660 3/4” 127 V .............................29

TÊ SOLDÁVEL BUCHA LATÃO ..............................................................35

FITA DUPLA FACE ACRÍLICA EXTERNA BLISTER ....................................41

BOMBA D'ÁGUA SUBMERSA PUMP 660 3/4” 220 V .............................29

TÊ SOLDÁVEL ROSCÁVEL (LR) .............................................................35

FITA DUPLA FACE ESPUMA ..................................................................41

REGULADOR AUTOMÁTICO DE NÍVEL 25 A ...........................................29

UNIÃO ROSCÁVEL ...............................................................................36

FITA DUPLA FACE ESPUMA BLISTER ....................................................41

CAIXAS D’ÁGUA E RESERVATÓRIO

UNIÃO SOLDÁVEL ...............................................................................36

FITA DUPLA-FACE FIXA PRO ESPUMA ..................................................42

TUBO PARA CAIXA DESCARGA LONGO COM CURVA ..............................36

FITA DUPLA-FACE FIXA PRO MASSA ACRÍLICA ......................................42

CAIXA D'ÁGUA POLIETILEN ..................................................................29

TUBO DESCARGA CURTO COM JOELHO AZUL ......................................36

FITA ISOLANTE IMPERIAL SLIM .............................................................42

CHUVEIROS ELÉTRICOS E DUCHAS

TUBO PVC ESGOTO PRIMÁRIO E SECUNDÁRIO .....................................36

FITA ISOLANTE 33 + SCOTCH ..............................................................42

FITA ISOLANTE ....................................................................................42

BRAÇO PARA CHUVEIRO BRANCO MONOCANO ....................................29

ADESIVOS E FITAS

FITA PARA EMBALAGEM MARROM .......................................................42

BRAÇO PARA CHUVEIRO EXTRA POLIDO ..............................................31

FITA PARA EMBALAGEM TRANSPARENTE .............................................42

CHUVEIRO 4" COM BRAÇO 36CM FRIO BRANCO ...................................31

ADESIVOS E COLAS

FITA ROLO ADESIVO 21 FLS ................................................................42

CHUVEIRO 4" SEM BRAÇO FRIO BRANCO ............................................31

FITA SILVER PRATA ..............................................................................42

CHUVEIRO COM BRAÇO COM REGISTRO ..............................................31

DUREPOXI ..........................................................................................37

FITA SILVER TAPE PRATA ......................................................................42

CHUVEIRO COM BRAÇO COM REGISTRO ..............................................31

SUPER BONDER ..................................................................................37

FITA VEDA-ROSCA ..............................................................................42

CHUVEIRO COM BRAÇO SEM REGISTRO ...............................................31

ADESIVO DE CONTATO PULVI VINIL .......................................................37

FITA VEDA-ROSCA ..............................................................................42

CHUVEIRO COM BRAÇO SEM REGISTRO ..............................................31

FIXADOR EPOXI 15 MIN POLYHOBBY .....................................................37

FITA VEDA-ROSCA ..............................................................................42

DUCHA ADVANCED MULTI ...................................................................31

ADESIVO EPOXI BI POLYEPOX ...............................................................37

FITA VEDA-ROSCA ..............................................................................42

DUCHA ADVANCED TURBO MULTI .........................................................31

ADESIVO FIXA CUBA ...........................................................................37

DUCHA MAXI DUCHA ..........................................................................31

ADESIVO FIXA CUBA ...........................................................................37

PROTETOR ANTI-IMPACTO

DUCHA TOP JET MULTI 127/5500 .......................................................31

ADESIVO FIXA ESPELHO MULTIFIX .......................................................37

PROTETOR BUMPER ANTI-IMPACTO GOTA ...........................................42

RESISTÊNCIA ......................................................................................31

ADESIVO FIXA ESPELHO ......................................................................37

PROTETOR BUMPER ANTI-IMPACTO REDONDO ....................................42

RESISTÊNCIA ADVANCED TRB...............................................................31

ADESIVO FIXA PREG0 FÁCIL BASE D’ÁGUA ..........................................37

ADESIVO FIXA PREGO FÁCIL BASE DÁGUA ............................................37

PROTETOR FELTRO QUADRADO PRETO ...............................................42

TUBOS E CONEXÕES

ADESIVO FIXA SEM PREGO ..................................................................37

PROTETOR FELTRO REDONDO BRANCO ...............................................42

PROTETOR FELTRO REDONDO PRETO .................................................43

ANEL DE VEDAÇÃO PARA ESGOTO .......................................................31

ADESIVO FIXA/TRAVA PARAFUSOS VERMELHO .....................................37

ADAPTADOR SOLDÁVEL CURTO COM BOLSA E ROSCA ........................31

ADESIVO FIXA/TRAVA PARAFUSOS AZUL ..............................................37

SELANTES E SILICONES

ADAPTADOR SOLDÁVEL PARA CAIXA D´ÁGUA COM BORRACHA ............31

ADESIVO MULTIFIX "RODÁPE E SANCA" BRANCO ..................................37

PU FLEXÍVEL CINZA - BISNAGA 400GR .................................................43

BUCHA REDUÇÃO LONGA ESGOTO ......................................................31

ADESIVO PARA PVC COM PINCEL APLICADOR .......................................37

PU FIX - BRANCO - CARTUCHO 387G/280ML ......................................43

BUCHA REDUÇÃO ROSCÁVEL ..............................................................31

ADESIVO PARA PVC COM PINCEL APLICADOR .......................................38

PU FIX - CINZA - CARTUCHO 387G/280ML ..........................................43

BUCHA REDUÇÃO SOLDÁVEL CURTA ...................................................31

ADESIVO PARA PVC COM PINCEL APLICADOR ......................................38

PU FIX CINZA SACHET 552G/400ML ....................................................43

BUCHA REDUÇÃO SOLDÁVEL LONGA ...................................................32

ADESIVO PARA PVC .............................................................................38

PU FLEX CONSTRUÇÃO 400G CINZA ...................................................43

CAIXA DE CENTRO PARA LAJE .............................................................32

ADESIVO PARA PVC .............................................................................38

SILICONE ACÉTICO ALTA TEMPERATURA ..............................................43

CAP ESGOTO PRIMÁRIO E SECUNDÁRIO ..............................................32

ADESIVO PARA PVC .............................................................................38

SILICONE ACÉTICO ALTA TEMPERATURA ..............................................43

CAP ESGOTO PRIMÁRIO E SECUNDÁRIO ..............................................32

ADESIVO PARA PVC .............................................................................38

SILICONE ACÉTICO ALTA TEMPERATURA ..............................................43

CAP ROSCÁVEL ..................................................................................32

ADESIVO PARA PVC .............................................................................38

SILICONE ALTA TEMPERATURA VERMELHO ............................................43

CAP SOLDÁVEL ...................................................................................32

ADESIVO PARA PVC .............................................................................38

SILICONE AQUÁRIOS TRANSPARENTE ...................................................43

COLAR DE TOMADAS ..........................................................................32

ADESIVO PARA PVC .............................................................................38

SILICONE ACÉTICO USO GERAL ...........................................................43

CURVA 90° CURTA ESGOTO ................................................................32

ADESIVO PARA PVC .............................................................................38

SILICONE ACÉTICO USO GERAL ...........................................................43

PRIMÁRIO E SECUNDÁRIO ....................................................................32

ADESIVO PLÁSTICO .............................................................................38

SILICONE ACÉTICO USO GERAL ...........................................................43

CURVA 90° LONGA ESGOTO ...............................................................32

CATALISADOR INCOLOR PARA MASSA PLÁSTICA .................................38

SILICONE ACÉTICO USO GERAL ...........................................................43

CENTRAL DE RELACIONAMENTO • 27 3089.3888

5

ÍNDICE

SILICONE ACÉTICO USO GERAL ...........................................................43

DISCO DIAMANTADO CONTÍNUO ...........................................................49

JOGO CHAVES DE FENDA 6 PÇS 4/2 PHILLIPS AÇO CARBONO BLISTER .55

SILICONE ACÉTICO USO GERAL BLISTER ...............................................43

DISCO DIAMANTADO CONTÍNUO D1 .....................................................49

JOGO CHAVES DE FENDA 6 PEÇAS 41110/506 ...................................55

SILICONE ACÉTICO USO GERAL BLISTER ...............................................43

DISCO DIAMANTADO CONTÍNUO CLASSIC ............................................49

JOGO CHAVES DE FENDA 6 PEÇAS 41516/507 ...................................55

SILICONE ACÉTICO USO GERAL COLMEIA ............................................43

DISCO DIAMANTADO CONTÍNUO PRO ..................................................49

JOGO CHAVES DE FENDA 7 PEÇAS ......................................................55

SILICONE ACÉTICO USO GERAL BLISTER ...............................................43

DISCO DIAMANTADO SEGMENTADO ....................................................49

JOGO CHAVES PRECISÃO 6 PEÇAS ......................................................55

SILICONE NEUTRO CONCRETO/PEDRA/PLÁSTICO .................................44

DISCO DIAMANTADO SEGMENTADO .....................................................49

JOGO DE TARRAXA 1/2" A 1" PARA CANOS ..........................................55

SILICONE SPRAY .................................................................................44

DISCO DIAMANTADO SEGMENTADO CLASSIC .......................................49

JOGO SERRA COPO 1" 25MM AÇO CARBONO ......................................55

SILICONE MULTIUSO SPRAYON ............................................................44

DISCO DIAMANTADO SEGMENTADO PRO .............................................49

JOGO SERRA COPO 2" 50MM AÇO CARBONO ......................................55

VEDA-CALHA ALUMÍNIO .......................................................................44

DISCO DIAMANTADO TURBO ...............................................................49

MALA P/ FERRAMENTA EM LONA 400X200X300MM DB 016 ................55

VEDA-JUNTA ......................................................................................44

DISCO DIAMANTADO TURBO 110MM ...................................................49

MALETA COM SOQUETES E ACES 1/2" 22PC .......................................56

VEDA-TRINCA BRANCO ........................................................................44

DISCO DIAMANTADO TURBO CLASSIC .................................................49

SELA-TRINCA SILICONE SELADOR .......................................................44

DISCO DIAMANTADO TURBO PRO 110MM ...........................................49

FERRAMENTAS DE APERTO

CHAVE AJUSTÁVEL 10" ........................................................................56

MASSAS ADESIVAS

DISCO SERRA CIRCULAR COM VIDEA 4 3/8 24 DENTES.........................49

DISCO SERRA CIRCULAR VIDEA 110MM 24DENTES .............................49

CHAVE AJUSTÁVEL INGLESA 8" 200MM AÇO CARBONO ......................56

MASSA ADESIVA PLÁSTICA BRANCA 1KG .............................................44

DISCO SERRA CIRCULAR MULTICORTE 110MM 24 COM DENTES .........50

CHAVE ALLEN JOGO 7 PEÇAS 2 A 8MM SUPORTE ................................56

MASSA ADESIVA PLÁSTICA BRANCA 400G ..........................................44

DISCO SPEED GRIP G125 COM FURO ..................................................50

CHAVE ALLEN JOGO 8 PEÇAS JG 1,5A8,0MM .....................................56

MASSA ADESIVA PLÁSTICA CINZA 1KG .................................................44

DISCO FLAP DISC R-822 .....................................................................50

CHAVE BIELA .......................................................................................56

MASSA ADESIVA PLÁSTICA CINZA 400G ...............................................44

DISCO FLAP DISC R-822 .....................................................................50

CHAVE BIELA .......................................................................................56

MASSA LEVE 340G ..............................................................................44

CHAVE COMBINADA ............................................................................56

MASSA LEVE 90G ...............................................................................44

LIXAS

CHAVE FENDA AMARELA ......................................................................56

MASSA LIGHT 500G ............................................................................44

DISCO LIXA A-275 CHAMPAGNE ..........................................................50

CHAVE PHILLIPS AMARELA ..................................................................56

MASSA PARA CALAFETAR 350G ..........................................................44

DISCO LIXA A-219 SPEED-GRIP SEM FUROS .........................................50

CHAVE GRIFO AÇO FORJADO STILLSON ................................................56

AUTOMOTIVOS E QUÍMICOS

DISCO LIXA A290 ................................................................................50

CHAVE PARA MANDRIL (13MM - 1/2") E (10MM - 3/8") ........................56

DISCO LIXA F-212 METALITE ................................................................50

ALICATE CORTE DIAGONAL MAYLE 6" ISOLADO ...................................56

BATIDA DE PEDRA PRETO 900ML .........................................................46

DISCO LIXA F-224 METALITE ................................................................50

ALICATE BICO MEIA CANA 6" AÇO CARBONO ISOLADO ........................56

PANO POLIMENTO MICROFIBRA PARA POLIMENTO 40X40 ....................46

DISCO LIXA F-247 METALITE ................................................................50

ALICATE BICO MEIA CANA RETO 6" AÇO CARBONO NIQUELADO ...........56

CONVERTEDOR DE FERRUGEM 100ML .................................................46

DISCO LIXA F-425 DURITE ..................................................................50

ALICATE BICO REDONDO 6" AÇO CARBONO NIQUELADO ......................56

CONVERTEDOR DE FERRUGEM 100ML ................................................46

LIXA A-290 040 F 230X280 .................................................................50

ALICATE BICO REDONDO 7" CABO EMBORRACHADO ...........................56

CONVERTEDOR DE FERRUGEM 500ML ................................................46

LIXA D’ÁGUA T-401 ............................................................................50

ALICATE BICO RETO 6" NIQUELADO ......................................................56

DESENGRIPANTE MUNDIAL STO 300ML SPRAY .....................................46

LIXA CHAMPAGNE A-275 ....................................................................50

ALICATE BOMBA D'ÁGUA 10" AÇO CARBONO CR FRISO ........................56

LUB-GIN ANTIFERRUGEM .....................................................................46

LIXA MADEIRA A-237 ...........................................................................50

ALICATE CORTE DIAGONAL 6" AÇO CARBONO CABO ISOLADO ..............57

DESENTUPIDOR DE PIA 1LT LÍQUIDO ....................................................46

LIXA MASSA A-257 ..............................................................................50

ALICATE CORTE DIAGONAL 6" AÇO CARBONO ISOLADO .......................57

GRAFITE EM PÓ 25G ............................................................................46

LIXA FERRO K-246 ..............................................................................50

ALICATE DE PRESSÃO 10" AÇO CARBONO NIQUELADO BLISTER ............57

GRAFITE SPRAY 200ML/115G .............................................................46

LIXA NO-FILL A-219 .............................................................................50

ALICATE DE PRESSÃO 10" MORDENTE EM "V" ....................................57

GRAXA (CA-2) 100/ 500 GR-CX12 .......................................................46

ALICATE DE PRESSÃO 10" MORDENTE TRIANGULAR ...........................57

LIMPA-CONTATO 300ML SPRAY ...........................................................46

FERRAMENTAS ELÉTRICAS

ALICATE DESENCAPAR FIOS 0,2 A 2,5MM² ...........................................57

LUBRIFICANTE P/ CORRENTES 200ML / 100G .....................................46

MARTELETE PERFURADOR MPD-810 810W 127V/ 3 JAULES ..............52

ALICATE MEIA-CANA CURTO MAYLE 6" ISOLADO .................................57

PENTOX SUPER AEROSSOL 400ML ......................................................46

ESMERILHADEIRA ANGULAR 4.1/2 1.010W WS10-115T 127V .............52

ALICATE REBITADOR MANUAL ..............................................................57

PENTOX SUPER INCOLOR GALÃO 3,6L .................................................46

ESMERILHADEIRA ANGULAR WS08-115 860W 127V/11000 ................52

ALICATE UNIVERSAL 7" AÇO CARBONO BASIC AZUL ............................57

PISO CLEAN 1L ...................................................................................47

FURADEIRA DE IMPACTO 500W 1/2" 127V ..........................................52

ALICATE UNIVERSAL 8" AÇO CARBONO ISOLADO AMARELO .................57

PRIMER PU 51 750ML + 150ML CATALISADOR ....................................47

FURADEIRA DE IMPACTO FIA-012R 500W 127V/2800 .........................52

ALICATE UNIVERSAL 8" AÇO CARBONO NIQUELADO CABO ISOLADO .....57

PRIMER UNIVERSAL 900ML .................................................................47

FURADEIRA DE IMPACTO SBM-500 500W 127V/ 2800 .......................52

ALICATE UNIVERSAL 8" AÇO CARBONO POLIDO CABO ISOLADO ............57

REMOVEDOR DE TINTA SPRAY 400ML / 250G ......................................47

FURADEIRA DE IMPACTO SBM-780 780W 1,5-13MM 127V .................52

ALICATE UNIVERSAL 8" CABO ISOLADO ................................................57

REMOVEDOR PASTOSO 1KG ................................................................47

FURADEIRA FIA 038R 300W 127V/2800 RPM 3/8" (10MM) - RED .........52

ALICATE UNIVERSAL MAYLE 8 ISOLADO ...............................................57

SODA CÁUSTICA 500G .......................................................................47

FURADEIRA IMP 1/2" SBM-810T 127V 810W CARCAÇA ALUMÍNIO .......52

ALICATE CORTA CABO 8" S/ ISOLAMENTO ...........................................57

SOLDA EM TUBO 25G ..........................................................................47

PARAFUSADEIRA E FURADEIRA A BATERIA ABS-9,6V/ 3,8" (10MM) .......52

FERRAMENTAS DE CONSTRUÇÃO

SOLUÇÃO DESENGRAXANTE 900ML .....................................................47

PARAFUSADEIRA E FURADEIRA ED-280 280W/ 3,8" (10MM) ................52

VASELINA SÓLIDA 100G ......................................................................47

POLITRIZ OP13-180 127V 1300W/1000-3000 RPM ............................52

DESEMPENADEIRA DE AÇO DENTADA CABO FECHADO .........................57

VEDA-CAPO MAXIVED 400G + CATALISADOR 60G ................................47

SERRA MÁRMORE MS-115 1400W 127V S/DISCO 12000 ....................52

DESEMPENADEIRA DE AÇO LISA CABO ABERTO ....................................57

VERNIZ 8.1 800ML + CATALISADOR 100ML .........................................47

SERRA MÁRMORE SMA-1300S 1300W -127 V /13000 RPM - VERDE....52

DESEMPENADEIRA DE AÇO LISA CABO FECHADO .................................57

WD-40 300ML SPRAY..........................................................................47

LIXADEIRA OSCILANTE ESS-200 - 127V 200W/11000 RPM .................52

DESEMPENADEIRA PLÁSTICA P/TEXTURA .............................................57

MASSA ANTIRRUÍDO 1,3KG .................................................................47

LIXADEIRA PLÁSTICA MANUAL 220X80MM PRETA ...............................52

DESEMPENADEIRA DE AÇO COM DENTES 12X24 .................................57

MASSA DE POLIR N°2 BASE D´ÁGUA 1KG ............................................47

MANDRIL ............................................................................................53

DESEMPENADEIRA DE AÇO COM DENTES 12X48 TÉCNICA ...................58

MASSA DE POLIR Nº2 TRADICIONAL 490G ...........................................47

SOPRADOR TÉRMICO STD-1500N - 1500W 127V - 2 ESTÁGIOS ..........53

DESEMPENADEIRA DE AÇO COM DENTES 25,5X12CM .........................58

MASSA PLÁSTICA CINZA 1KG .............................................................47

ELETRODO 6013 2,50MM CAIXA COM 5KG .........................................53

DESEMPENADEIRA DE AÇO COM DENTES 272X120MM .......................58

MASSA POLIÉSTER 900G ....................................................................47

DESEMPENADEIRA DE AÇO DENTADA CABO ABERTO ............................58

MASSA ULTRA LIGHT 495G .................................................................47

BROCAS

DESEMPENADEIRA DE AÇO LISA 12X24 ...............................................58

CIMENTO BRANCO 1KG FARDO 10KG ..................................................47

BROCA AÇO RÁPIDO ...........................................................................53

DESEMPENADEIRA DE AÇO LISA 12X48 TÉCNICA .................................58

GESSO RÁPIDO 1KG - FARDO COM 10KG ............................................47

BROCA CONCRETO DIN 8039 ..............................................................53

DESEMPENADEIRA DE AÇO LISA 25,5X12CM .......................................58

BROCA FIBROCIMENTO E MOURÃO .....................................................53

DESEMPENADEIRA DE AÇO LISA .........................................................58

ABRASIVOS

BROCA AÇO RÁPIDO ...........................................................................53

DESEMPENADEIRA DE MADEIRA ..........................................................58

BROCA CHATA 150MM .......................................................................53

DESEMPENADEIRA PLÁSTICA C/ ESPUMA 14X27CM .............................58

ESCOVAS DE AÇO

BROCA CHATA"ATC"157MM ...............................................................53

DESEMPENADEIRA PVC CORRUGADA 14X27/ 17X30 ...........................58

ESCOVA CIRCULAR (A) 3X3/8 C/ HASTE 1/4" AÇO CARBONO .................48

BROCA CONCRETO STANDARD ...........................................................53

DESEMPENADEIRA PVC CORRUGADA PEQUENA 15X24 / 17X29 PRETA .58

ESCOVA CIRCULAR (A) 4X1/2X1/2 AÇO CARBONO ................................48

BROCA ESCAL. PARA TELHA ................................................................53

DESEMPENADEIRA PVC LISA 14X24/ 17X30 ........................................58

ESCOVA COPO 2" C/ HASTE 1/4 AÇO CARBONO ...................................48

BROCA FIBROCIMENTO E MOURÃO 1/4"X250MM ................................53

DESEMPENADEIRA PVC LISA PEQUENA 15X24 / 17X29 PRETA ..............58

ESCOVA COPO 4" ONDULADA AÇO CARBONO ......................................48

BROCA SDS PLUS SPEEDHAMMER ......................................................53

DESEMPENADEIRA PVC PARA GRAFIATO 17X30 ..................................58

ESCOVA TIPO COPO TORCIDA 3" DWT ROSCA M14 X 2,0MM ................48

BROCA WIDEA EXTERNA LONGA...........................................................53

DESEMPENADEIRA TEXTURADORA 17X30MM .......................................58

ESCOVA COPO 4" TORCIDA AÇO CARBONO ..........................................48

BROCA WIDEA LONGA ........................................................................53

DESENTUPIDOR FURACÃO 10M ............................................................58

ESCOVA DE AÇO 3 FILEIRAS CORPO E CABO MADEIRA AÇO CARBONO ..48

BROCA AÇO RÁPIDO ............................................................................53

ESQUADRO CABO ALUMÍNIO 12" .........................................................58

ESCOVA DE AÇO 3 FILEIRAS CORPO E CABO PLÁSTICO ........................48

BROCA CHATA PARA MADEIRA ............................................................53

ESQUADRO CABO PLÁSTICO 12" .........................................................58

ESCOVA DE AÇO 3 FILEIRAS CORPO E CABO PLÁSTICO .......................48

BROCA CONCRETO .............................................................................53

ESQUADRO CABO PVC 30CM ..............................................................60

ESCOVA DE AÇO 6 FILEIRAS S/ CABO CORPO MADEIRA AÇO CARBONO 48

BROCA SDS PLUS ...............................................................................53

ESQUADRO CABO ZAMAC 30CM .........................................................60

ESCOVA DE AÇO CORPO PLÁSTICO S/CABO 177X55MM ......................48

ACESSÓRIO PARA MICRORETÍFICAS ARA 208 PEÇAS RED ....................53

ESTILETE 18MM ES183 .......................................................................60

ESCOVA DE AçO ECONÔMICA 3 FILEIRAS CABO PLÁSTICO ....................48

ESTILETE LEVE PROFISSIONAL 18X172MM ..........................................60

ESCOVA DE AÇO ECONÔMICA 6 FILEIRAS CABO PLÁSTICO ...................48

FERRAMENTAS MANUAIS

ESTILETE PROFISSIONAL 6 ..................................................................60

PEDRA DE AFIAR AMOLADOR TIPO CANOA JT911 .................................48

ESTILETE TRAPEZ STANDARD 170MM .................................................60

PEDRA DE AFIAR COMBINADA JB6 .......................................................48

CAIXAS DE FERRAMENTAS

FORMÃO CABO MADEIRA CHANFRADO ................................................60

CAIXA FERRAMENTAS 14,5" C/ 2 BAND. ARTICULADAS ........................55

FUNIL PLÁSTICO PRETO FLEXÍVEL 165MM............................................60

DISCOS

CAIXA FERRAMENTAS 15" C/ ORGANIZADORES ..................................55

FORMÃO CABO MADEIRA CHANFRADO CROMO-VANÁDIO .....................60

DISCO CORTE BNA 12 ........................................................................48

CAIXA FERRAMENTAS 17" C/ 6 BAND. 36 DIVISÕES ............................55

GRAMPEADOR MANUAL .......................................................................60

DISCO CORTE CLASSIC AR 102 ...........................................................49

CAIXA FERRAMENTAS POLIPROPILENO 20X40 PRETA ...........................55

GRAMPO ............................................................................................60

DISCO CORTE CLASSIC AR 302 ...........................................................49

ESTOJO MULTIUSO PROFISSIONAL 12 COMPARTIMENTOS ...................55

GRAMPO TIPO C .................................................................................60

DISCO CORTE CLASSIC T41 .................................................................49

GROSA MEIA CANA 10" ......................................................................60

DISCO CORTE MULTICORTE C60T .........................................................49

JOGOS DE CHAVES

LÂMINA ESTILETE 18MM TUBETE COM 10 UNIDADES ...........................60

DISCO CORTE SUPER AÇO AR 312 ......................................................49

CHAVE DE FENDA COM PONTEIRAS 7 PEÇAS .......................................55

LÂMINA PARA ROÇADEIRA ...................................................................60

DISCO DESBASTE SUPER BDA 640 ......................................................49

JOGO CHAVES COMBINADAS 12 PEÇAS ..............................................55

LÂMINA SERRA CIRCULAR 4.3/8" (110MM) FURO 20MM 24 DENTES ...60

6

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ÍNDICE

LÁPIS CARPINTEIRO CAIXA COM 72 UNIDADES .....................................60

CAVADEIRA RETA 09 120CM CABO METÁLICO E SOCADOR ..................66

KIT ROLO DE LA 4 PCS + GARFO .........................................................72

LÁPIS DE CARPINTEIRO LUFKIN CAIXA 72PC ........................................60

CAVADEIRA RETA 09 S/ CABO ..............................................................66

MINI DESEMPENADEIRA PLÁSTICA P/ TEXTURA ....................................73

CANETA MARCAÇÃO PERMANENTE INDUSTRIAL ...................................60

COLHER DE PEDREIRO CANTO RETO ....................................................66

MINI ROLO DE LÃ 5 CM .......................................................................73

RISCADOR PARA PISO E AZULEJO AZUL ...............................................60

COLHER DE PEDREIRO CANTO RETO ...................................................68

MINI ROLO FÁCIL 5CM .........................................................................73

RODEL PINO CORTE DUPLO UNIVERSAL ...............................................61

COLHER DE PEDREIRO CANTO RETO ...................................................68

MISTURADOR DE TINTA GRANDE 60CM COMPRIMENTO ........................73

LIMA K&F ENXADA 8" .........................................................................61

COLHER DE PEDREIRO CANTO RETO ...................................................68

MISTURADOR DE TINTA MANUAL PLÁSTICO ..........................................73

LIMA PARA ENXADA 8" C/ CABO BLISTER ............................................61

ENXADA DUAS CARAS 2,5 LG GOIVADA SEM CABO .............................68

MISTURADOR DE TINTA PEQUENO 40CM COMPRIMENTO ......................73

LIMA PARA FACÃO DESTRO K&F .........................................................61

ENXADA LARGA GOIVADA 28CM VIAT SEM CABO .................................68

PROLONGADOR EXTENSOR AJUSTÁVEL 2M/3M ....................................73

LIMA PARA MOTOSSERRA....................................................................61

ENXADA LARGA 2,5 COM CABO ..........................................................68

PROLONGADOR PROFIMASTER 5M ......................................................73

LINHA PARA PEDREIRO LISA ................................................................61

ENXADA LARGA 2,5 SEM CABO GOIVADA .............................................68

PROLONGADOR TRAVA FÁCIL 4M .........................................................73

LINHA PARA PEDREIRO TRANÇADA ......................................................61

ENXADA LARGA CANAVIAL 1,5 COM CABO 130CM ..............................68

RASPADOR 6CM ..................................................................................73

FERRAMENTAS DE GOLPE

ENXADA LARGA GOIVADA 28CM C/CABO VIAT 1.5M ............................68

REFIL PARA PAD PARA RECORTE EM PINTURAS ....................................73

ENXADÃO DUAS CARAS 3,0 ESTREITO ................................................68

ROLINHO DE ESPUMA CZ 05/09/15/23cm ............................................73

MACHADINHA AÇO CUNHA 32CM ........................................................61

ENXADÃO DUAS CARAS 3,0 LARGO .....................................................68

MACHADINHA COM UNHA 450G ..........................................................61

ENXADÃO ESTREITO 2,5 BELLOTA COM CABO .....................................68

ROLOS

MACHADO SOLDADO 3.5 C/ CABO 100CM ..........................................61

ENXADÃO ESTREITO 2,5 BELLOTA SEM CABO ....................................68

ROLO "MINIROLO" DE ESPUMA 5/9CM CINZA .......................................73

MARRETA COM CABO .........................................................................61

ENXADÃO ESTREITO 2,5 S/ CABO .......................................................68

ROLO ANTIGOTA PROFIMAX 23CM .......................................................73

MARRETA OITAVADA ...........................................................................61

ENXADÃO ESTREITO FORJADO 2,5 COM CABO 130CM ........................68

ROLO ANTIRESPINGO 23CM BRASILEIRINHO .........................................73

MARTELO UNHA POLIDO ......................................................................61

ENXADÃO LARGO FORJADO 2,5 COM CABO 130CM ............................68

ROLO ANTIRESPINGO ECONÔMICO 23CM .............................................73

MARTELO AÇO POLIDO ........................................................................61

PICARETA CHIBANCA 4LB COM CABO 90CM .......................................68

ROLO DE LÃ ........................................................................................73

MARTELO BORRACHA BRANCA ............................................................61

PICARETA CHIBANCA 4LB SEM CABO ..................................................68

ROLO DE LÃ ANTIGOTA .......................................................................73

MARTELO BORRACHA PRETO ..............................................................61

PICARETA ESTREITA 4LB COM CABO 90CM .........................................68

ROLO DE LÃ ANTIGOTA .......................................................................73

MARTELO UNHA B.B ............................................................................61

PICARETA ESTREITA 4LB SEM CABO ....................................................68

ROLO DE LÃ ANTIGOTA .......................................................................73

MARTELO POLIDO CABO MADEIRA .......................................................61

FACÃO PARA MATO CABO DE MADEIRA ................................................69

ROLO DE LÃ EXTRA 23CM ...................................................................75

MARTELO UNHA MASTER ....................................................................61

FACÃO PARA MATO ............................................................................69

ROLO DE LÃ MISTA 23CM ....................................................................75

MARTELO UNHA CABO MADERITE NAVAL .............................................61

FACÃO PARA MATO CABO PLÁSTICO ....................................................69

ROLO DE LÃ POLIÉSTER ECONÔMICO 23CM .........................................75

MARTELO PENA 5OG ..........................................................................63

FOICE ROÇADEIRA COM CABO 120CM ................................................69

ROLO DE LÃ SINTÉTICA RESIMAX ........................................................75

CABO MARRETA MADEIRA 30CMX300MM ...........................................63

FOICE ROÇADEIRA SEM CABO .............................................................69

ROLO DE LÃ SINTÉTICA ECONÔMICO 23CM..........................................75

CABO MARTELO 25CMX295MM ..........................................................63

ROLO DE LÃ SUPER 23CM ...................................................................75

NÍVEL DE ALUMÍNIO 12" ......................................................................63

FERRAMENTAS DE FLUXO E MOVIMENTAÇÃO

ROLO DE PELE.....................................................................................75

NÍVEL DE ALUMÍNIO 350MM 14" .........................................................63

CARRINHO DE MÃO CAÇAMBA METÁLICA FUNDA 65L .........................69

ROLO EFEITO JEANS 10CM ..................................................................75

NÍVEL DE ALUMÍNIO MAGNÉTICO 300MM 12" .............................................63

CARRINHO DE MÃO PRETO 50L ..........................................................69

ROLO EPOXI INDUSTRIAL 23CM ...........................................................75

NÍVEL DE MADEIRA 12" ......................................................................63

CARRINHO DE MÃO CAÇAMBA PLÁSTICA FUNDA 55L ...........................69

ROLO EXTRA PROFIMAX 23CM ...........................................................75

PLAINA HB02-82 - 127V - 710W/ 14500 RPM LARG CORTE 82MM .....63

CARRINHO DE MÃO EXTRA FORTE 65L ................................................69

ROLO MAGIEFEITO 23CM .....................................................................75

PLAINA MANUAL Nº4 ..........................................................................63

CÂMARA DE AR 3,25 X 8 .....................................................................69

ROLO MAXILÃ PROFIMAX 23CM ...........................................................75

PLAINA MANUAL Nº5 ...........................................................................63

PNEU 3,25 X 8 DUAS LONAS ................................................................69

ROLO PARA TEXTURA EXTRA RÚSTICA 110/55 23CM ...........................75

PONTEIRO REDONDO ..........................................................................63

BOMBA DE AR PEDAL ..........................................................................69

ROLO PARA TEXTURA FINA 110/75 23CM ............................................75

PRUMO DE AÇO PAREDE 400GR 1020 ................................................63

BOMBA DE AR USO GERAL 1/8" X 1.1/2" .............................................69

ROLO PARA TEXTURA MÉDIA 110/65 23CM .........................................75

RÉGUA BI-TUB COM. 45MMX20,8MM TAMPA VERDE - 2M - NAT ..........63

BOMBA PARA PNEUS COM PEDAL ........................................................69

ROLO PARA TEXTURA RÚSTICA 1155 23CM VERMELHO ........................75

RÉGUA BI-TUB EXTRA 2"X1" TAMPA VERMELHA - 2M - NAT .................63

BALDE CONCRETO DE AÇO INTEIRIÇO 10L PRETO ...............................69

ROLO PINTA CANTO 5CM .....................................................................75

RÉGUA FRISADA 2"X1" TAMPA AMARELA - 2M - NAT ...........................63

BALDE CONCRETO EMBORRACHADO SUPERFLEX 12L PRETO ..............69

ROLO RENDE PLUS .............................................................................75

ROÇADEIRA DE GRAMA A GÁSOLINA 40CC ..........................................63

BALDE CONCRETO PLÁSTICO ALÇA EM AÇO 12L PRETO ......................69

ROLO RENDEPLUS (MICROFIBRA) 23CM ...............................................75

ARCO DE SERRA FIXO 12" ..................................................................63

BALDE EXTRA FORTE PRETO ................................................................69

ROLO ROLA-FÁCIL ..............................................................................75

ARCO DE SERRA FIXO 12" AMARELO ...................................................63

BALDE PARA CONCRETO 12L PLÁSTICO C/ ALÇA PLÁSTICO .................69

ROLO VELUDO .....................................................................................76

ARCO DE SERRA FIXO 12" FERRO AS100 .............................................63

BALDE REFORÇADO POLIPROPILENO 12L ..............................................69

SUPORTE MANUAL PARA LIXA ..............................................................76

ARCO DE SERRA FIXO POP P1001 ........................................................63

CAIXA DE MASSA PRETA 20L ..............................................................70

ARCO DE SERRA MINI MAC 2005 .........................................................64

CAIXA DE MASSA REFORÇADA 20L PRETA ..........................................70

TRINCHAS

ARCO DE SERRA MONOBLOCO MAC 2100 ...........................................64

CAIXA MASSA POLIPROPILENO 20L .....................................................70

TRINCHA 319 ......................................................................................76

ARCO DE SERRA REGULÁVEL 12" CABO ERGONÔMICO ........................64

PENEIRA ARO 55 PLÁSTICO LARANJA ..................................................70

TRINCHA 395 ......................................................................................76

ARCO DE SERRA REGULÁVEL CABO VERMELHO MAC 2000 ...................64

TRINCHA 417/41 CERDAS GRIS ...........................................................76

SERRA BIMETAL EXTRAFLEX K&F 18 DENTES ......................................64

ACESSÓRIOS PARA PINTURA

TRINCHA AT315/ PLUMA TEK ..............................................................76

SERROTE PROFISSIONAL (5 DENT. P/ POL.) CABO MADEIRA ..................64

TRINCHA SEDA TEK ............................................................................76

SERROTE 20" AMADOR CABO MADEIRA ..............................................64

ACESSÓRIOS PARA PINTURA

ESTOPA 150G .....................................................................................76

SERROTE DE PODA 12" ......................................................................64

BROXA STANDARD 15X5,6/18X8CM ....................................................71

ALGODÃO P/ POLIMENTO 100G ...........................................................76

SERROTE DRYWALL 9" .......................................................................64

TACO LIXADOR GRANDE ......................................................................71

BOINA DE PELE DUPLA-FACE COM ROSCA 8” .......................................76

SERROTE FAST JACK CABO ERGONÔMICO ..........................................64

TACO PARA LIXA BORRACHA PVC .........................................................71

BOBINA PLÁSTICA PRETA 4X100 .........................................................76

TALHADEIRAS CHATAS ........................................................................64

PAD PARA RECORTE EM PINTURAS ......................................................71

EPI

TESOURA PARA CHAPAS 10" ...............................................................64

ABRETRINCA .......................................................................................71

TORQUÊS ARMADOR 12" AÇO CARBONO ............................................64

BANDEJA PARA PINTURA 15CM PEQUENA PRETA 1415P ......................71

EQUIPAMENTO DE PROTEÇÃO INDIVIDUAL

TORQUÊS ARMADOR 12" LARANJA ......................................................64

BANDEJA PARA PINTURA 23CM PRETA MÉDIA 1523P ...........................71

TORQUÊS CARPINTEIRO 10" AÇO CARBONO ........................................64

BANDEJA PARA PINTURA 23CM VERMELHA ..........................................71

MÁSCARA RESPIRADORA PFF1 COM VÁLVULA AZUL ............................77

BANDEJA PINTURA POLIPROPILENO GRANDE 1,5l/ 4L PRETA ...............71

MÁSCARA RESPIRADORA PFF3 COM VÁLVULA AZUL ............................77

FERRAMENTAS DE MEDIÇÃO

BALDE PINTURA POLIPROPILENO ALÇA EM AÇO 15L PRETO .................71

MÁSCARA RESPIRADORA PFF1 SEM VÁLVULA AZUL ............................77

METRO DE MADEIRA NATURAL DUPLO CM. POL. 2MT ..........................64

CAÇAMBA 11L PRETA ..........................................................................71

MÁSCARA RESPIRADORA PFF3 SEM VÁLVULA AZUL ............................77

TRENA LUFKIN L500 SHELF ................................................................64

ESPÁTULA CABO MADEIRA LÂMINA AÇO ..............................................71

MÁSCARA RESPIRADORA PFF2 SEM VÁLVULA CARVÃO AZUL ...............77

TRENA LONGA ABERTA FIBRA .............................................................64

ESPÁTULA CABO MADEIRA LÂMINA AÇO ..............................................71

ÓCULOS SKY FUMÊ ............................................................................77

TRENA EMBORRACHADA COM TRAVA .................................................64

ESPÁTULA CABO PLÁSTICO LÂMINA EM AÇO CARBONO .......................71

ÓCULOS SKY INCOLOR .......................................................................77

TRENA EMBORRACHADA COM TRAVA .................................................64

ESPÁTULA DE AÇO INOX PARA GESSO ..................................................71

ÓCULOS SUMMER FUMÊ .....................................................................77

TRENA COLOR COM TRAVA .................................................................66

ESPÁTULA DE CANTO ..........................................................................71

ÓCULOS SUMMER INCOLOR ................................................................77

TRENA BLISTER ...................................................................................66

ESPÁTULA MULTIUSO LÂMINA AÇO REFORÇADO .................................72

PEDESTAL PRETO/AMARELO ...............................................................77

TRENA DE AÇO ....................................................................................66

ESPÁTULA PLÁSTICA ..........................................................................72

PROTETOR AURICULAR PLUG COPOLÍMETRO .......................................77

PROTETOR AURICULAR PLUG SILICONE ...............................................77

FERRAMENTAS DE CORTE

ESPÁTULA PLÁSTICA LISA ..................................................................72

ESPÁTULA CABO PLÁSTICO 4" LÂMINA EM AÇO ..................................72

PROTETOR FACIAL 10" INCOLOR CC ...................................................77

CORTADOR DE PISO PREMIUM ............................................................66

EESPÁTULA CABO MADEIRA LÂMINA AÇO ...........................................72

BOTA PVC BRANCA CURTA ...................................................................77

CORTADOR DE PISO PROFISSIONAL MAC ............................................66

ESPÁTULA CABO PLÁSTICO LÂMINA EM AÇO .......................................72

BOTA PVC BRANCA EXTRA CURTA .......................................................77

CORTADOR DE PISO E AZULEJO SPEED SÉRIE 300 ...............................66

ESPÁTULA PLÁSTICA ...........................................................................72

BOTA PVC PRETA EXTRA CURTA ..........................................................77

PÁ DE BICO COM CABO 120CM ..........................................................66

ESPÁTULA CABO MADEIRA RIGIDA LÂMINA AÇO ...................................72

BOTA PVC PRETA/AMARELO CURTA ......................................................78

PÁ DE BICO Nº03 COM CABO 71CM ....................................................66

ESPÁTULA CABO PLÁSTICO FLEXÍVEL PRETO LÂMINA EM AÇO ..............72

BOTINA SEGURANÇA SEM BICO DE AÇO ..............................................78

PÁ DE BICO VIAT 3 ..............................................................................66

GARFO GAIOLA PROFIMAX 23CM - 46MM ............................................72

BOTINA USAFE COM BICO DE AÇO .......................................................78

PÁ DE BICO Y METÁLICO 4 ..................................................................66

GARFO PARA ROLO DE PINTURA 23CM SIMPLES .................................72

BOTINA USAFE SEM BICO NR 38 .........................................................78

PÁ QUADRADA Nº03 C/CABO 71CM ....................................................66

GARFO PARA ROLOS 330/23SR SEM ROSCA SEM GAIOLA ....................72

PÁ QUADRADA VIAT 3 .........................................................................66

JARDIM E PISCINA

GARFO PARA ROLOS 400/23 COM ROSCA COM GAIOLA .......................72

PÁ QUADRADA Y METÁLICO 4 .............................................................66

GARFO PARA ROLOS 400/23 SEM ROSCA COM GAIOLA .......................72

CAVADEIRA ARTICULADA 110CM COM CABO MADEIRA ........................66

JARDINAGEM

KIT ANTIRESPINGO ECONÔMICO 3 PECAS .............................................72

CAVADEIRA ARTICULADA 120CM COM CABO METÁLICO ......................66

KIT C/ROLO DE LÂ 3 PCS .....................................................................72

ESGUICHO COM ENGATES ROSQUEADOS ............................................79

CAVADEIRA ARTICULADA 140CM COM CABO MADEIRA ........................66

KIT PINTURA 3 PEÇAS ..........................................................................72

ESGUICHO EM POTE 25 PEÇAS ...........................................................79

CAVADEIRA RETA 08 120CM CABO MADEIRA, OLHO 35MM .................66

KIT PINTURA 5 PEÇAS ..........................................................................72

ESGUICHO HIDROP. EM CARTELA .........................................................79

CENTRAL DE RELACIONAMENTO • 27 3089.3888

7

ÍNDICE

ESGUICHO HIDROP. JATO CONTROLÁVEL .............................................79

FECHADURA EXTERNA INOX PREMIUM ROS RED CIL 55 .......................83

ADAPTADOR BRUTO PARA INSTALAÇÃO DE GÁS (ROSCA INT) ..............90

ESGUICHO HIDROP. METÁLICA EM CARTELA ........................................79

FECHADURA BANHEIRO QUADRATTA ROS QUAD CIL 55 .......................83

ADAPTADOR RETO PARA INSTALAÇÃO DE GÁS (ROSCA EXT) .................90

ESGUICHO PISTOLA REGULÁVEL 1/2 OU 3/4 ........................................79

FECHADURA EXTERNA QUADRATTA ROS QUAD CIL 55 .........................83

ADAPTADOR RETO PARA INSTALAÇÃO DE GÁS (ROSCA INT) .................90

ESGUICHO RETO REGULÁVEL 1/2 OU 3/4 .............................................79

FECHADURA BANHEIRO INOX PREMIUM ESP QUAD CIL ........................83

ADAPTADOR PARA MANGUEIRA JARDIM - POTE 25 PEÇAS ..................79

FECHADURA EXTERNA INOX PREMIUM ESP QUAD CIL 55 .....................83

ARAMES

ADAPTADOR PARA MANGUEIRA JARDIM - POTE 75 PEÇAS ..................79

FECHADURA INTERNA INOX PREMIUM ESP QUAD CIL 55 .......................83

ARAME FARPADO DYNO 400M ............................................................90

ANCINHO 14D ESTAMPADOS SEM CABO .............................................79

FECHADURA BANHEIRO INOX PREMIUM ESP RED CIL 55 ......................83

ARAME FARPADO NELORE 250M ........................................................90

ANCINHO LEVE 14D COM CABO 150CM ..............................................79

FECHADURA INTERNA INOX PREMIUM ESP RED CIL 55 ........................83

ARAME FARPADO NELORE 500M ........................................................90

APARADOR DE GRAMA 127 V AP1000 .................................................79

FECHADURA BANHEIRO POP ESP RED CIL 55 .......................................83

GRAMPO POLIDO AROEIRA BWG 9X1 X 1KG ........................................90

ASPERSOR CIRCULAR EM CARTELA ....................................................79

FECHADURA INTERNA POP ESP RED CIL 55 .........................................83

GRAMPO ZINCADO AGRICULTOR ..........................................................90

ASPERSOR ESTÁTICO EM CARTELA .....................................................79

FECHADURA BANHEIRO POP ESP RED CIL 55 ......................................85

ARAME OVALADO SEM FARPAS PANTANAL PG 17X15 ..........................90

COLHEDOR DE FRUTAS S/ CABO .........................................................79

FECHADURA EXTERNA POP ESP RED CIL 55 ........................................85

ARAME PARA CERCA ELÉTRICA ACO ZINCADO ELECTRO14 ZN3 500M .90

CONJUNTO P/ JARDINAGEM CABO MADEIRA 3 PEÇAS .........................79

FECHADURA INTERNA POP ESP RED CIL 55 .........................................85

ARAME PARA CERCA ELÉTRICA AÇO ZINCADO ELECTRO 15 .................90

CONJUNTO PARA IRRIGAÇÃO EM CARTELA .........................................80

FECHADURA BANHEIRO POP TACO GOLF ESP RED CIL 55 .....................85

ARAME PARA CERCA ELÉTRICA AÇO ZINCADO ELECTRO 15 .................90

EMENDA PARA MANGUEIRA 1/2" .........................................................80

FECHADURA EXTERNA POP TACO GOLF ESP RED CIL 55 ......................85

ARAME RECOZIDO BWG 18 1,25MM 1KG ............................................91

CONECTOR PLÁSTICO P/ MANGUEIRA FÊMEA (ROSCA INTERNA) ...........80

FECHADURA BANHEIRO TACO GOLF ESP RED CIL 55 ............................85

ARAME RECOZIDO PRETO BWG 18 FIO 1,24MM 1KG ...........................91

ENGATE RÁPIDO 1/2" PASSAGEM LIVRE ...............................................80

FECHADURA EXTERNA TACO GOLF ESP RED CIL 55 .............................85

ARAME ZINCADO MACIO ......................................................................91

ENGATE RÁPIDO MANGUEIRA JARDIM EM"POTE" COM 15 PEÇAS ........80

FECHADURA INTERNA TACO GOLF ESP RED CIL 55 ..............................85

CERCAS E TELAS

ENGATE RÁPIDO MANGUEIRA JARDIM EM POTE COM 40 PEÇAS ..........80

FECHADURA INTERNA MILLENIO ESP RED CIL 55 .................................85

ENGATE RÁPIDO PARA MANG 1/2 ........................................................80

CERCA FARPADA CONCERTINA NÃO CLIPADA .......................................91

FIO DE NYLON P/JARDIM 1,8MM 20M .................................................80

TRAVAS, TRINCOS E FECHOS

TELA CHIQUEIRO HEXAGONAL PIAU TIPO 3 ..........................................91

MANGUEIRA JARDIM CRISTAL TRANÇADA 7/16X1,7" ...........................80

TRAVA DE SEGURANÇA INOX IP (TETRA CHAVE) ...................................85

TELA GALINHEIRO HEXAGONAL COLEIRA BRANCA TIPO 2 .....................91

MANGUEIRA CRISTAL (NÍVEL) ROLO 50M .............................................80

FECHADURA PARA GAVETA 22MM .......................................................85

TELA GALINHEIRO HEXAGONAL COLEIRA BRANCA TIPO 2 .....................91

MANGUEIRA CRISTAL TRANÇADA 200LBS ............................................80

FECHADURA SOBREPOR PARA PORTÃO 100MM PRETA BRILHANTE .....85

TELA PINTEIRO HEXAGONAL COLEIRA BRANCA TIPO 1 .........................91

MANGUEIRA CRISTAL TRANÇADA 200LBS ............................................80

FECHO CHATO 3.1/2" ZC P/ PORTÃO PACOTE12 ..................................85

TELA SEGURANÇA MALHA 100X050MMX1,90MM ...............................91

MANGUEIRA DUPLA-FACE RECAPADA 1/2"X1,7 50M AZUL ..................80

FECHO PEGA LADRÃO AÇO CROMADO .................................................85

TELA SEGURANÇA MALHA 100X050MMX1,90MM ...............................91

MANGUEIRA ENTRADA PARA MÁQUINA DE LAVAR CRISTAL 1,20M .......80

FECHO REDONDO 4" ZC PACOTE 12 ....................................................85

TELA VIVEIRO HEXAGONAL COLEIRA BRANCA 1/2 .................................91

MANGUEIRA IRRIGAFLEX CINZA ............................................................80

FIXADOR DE PORTA FP-555 MAGNÉTICO EM ALUMÍNIO ........................85

MUNDO CASA

MANGUEIRA JARDIM PREMIUM PLUS SILICONADA LARANJA .................80

FIXADOR DE PORTA P/ RODAPÉ FPD0050.............................................85

MANGUEIRA MULTIUSO TRANÇADA CRISTAL AMARELADA ....................80

MAÇANETA DE ALAVANCA CROMADA ..................................................85

ORGANIZAÇÃO

MANGUEIRA SUPERFLEX LARANJA ......................................................80

MOLA AÉREA PRATA POTONCIA 2 ........................................................85

KIT VARÃO PARA CORTINA BRANCO COM 2 SUPORTES PRATIKO ..........92

PAZINHA ESTREITA CABO MADEIRA .....................................................80

MOLA AÉREA PRETA POTENCIA 2 .........................................................85

KIT VARÃO PARA CORTINA C/3 SUP. C/ENC. PRATIKO ............................92

REGADOR PLÁSTICO 10L PRETO UNIVERSAL .......................................80

PORTA CADEADO 4”/5" ZC PT12.........................................................86

KIT VARÃO PARA CORTINA C/2 SUP. PRATIKO .......................................92

REGADOR PLÁSTICO 6L AZUL PROFISSIONAL ......................................81

PUXADOR ALÇA 102MM ......................................................................86

SUPORTE PARA CORTINA BANHEIRO 110CM A 200CM ........................92

SACHO CORAÇÃO COM CABO 43CM ...................................................81

TRINCO FIO REDONDO 2 1/2" FG - ISERO .............................................86

CORTINA PARA BOX POLIÉSTER LUXO 180X180 CM ............................92

SUPORTE FIXO PARA MANGUEIRA (JARDIM) .........................................81

TRINCO UNIVERSAL 12CM LO - ISERO ..................................................86

EXTENSOR PARA CORTINA BOX BANHEIRO 0,90/1,40M .......................92

TESOURA 12" DE GRAMA ...................................................................81

OLHO MAGICO C/VISOR CROM. 35 A 50MM .........................................86

TUBO EXTEN. PRONTO FIX 1,35 A 1,48M 1,50 A 1,63M ........................92

TESOURA DE PODA .............................................................................81

FIXADORES

TUBO EXTENSOR PRONTO FIX 1,20 A 1,33 M .......................................92

TESOURA DE PODA PROFISSIONAL .....................................................81

VARAL CHÃO ALUMÍNIO RENOVAR 90CM ..............................................92

ADAPTADOR FÊMEA ROSCA DE 3/4 E RED 1/2 PT12 ...........................81

BARRA ROSCADA ZINCADA ..................................................................86

BUCHA PARA GESSO/DRY WALL ..........................................................86

VARAL DE CHÃO RENOVAR COM ASAS EM AÇO 150CX50LX90A ...........92

PISCINA

BUCHA PLÁSTICA Nº10 S/ ANEL PT 500 ..............................................86

VARAL SANFONADO AÇO RENOVAR 1,00 M ..........................................92

ALGICIDA DE CHOQUE GL 1 LITRO .......................................................81

ESCÁPULA COM BUCHA ......................................................................86

VARAL TETO RENOVAR 1,20 X 0,50 M ..................................................92

ALGICIDA DE MANUTENÇÃO GL 1 LITRO ..............................................81

ESPAÇADOR CERÂMICO 2MM .............................................................86

GRADE PROTEÇÃO PARA PORTA LARGURA 70CM X ALTURA 80CM ......92

BARRILHA LEVE PT 2KG ......................................................................81

GANCHO COM BUCHA ........................................................................86

PORTAS SANFONADAS

CLARIFICANTE FLOCULANTE E DECANTADOR 2 EM 1(FLÓCOLUS) 1L ....81

PARAFUSO A.A PANELA FENDA RETA ZI ................................................86

PORTA SANFONADA PVC BRANCO ......................................................92

CLORO GRANULADO BALDE ...............................................................81

PARAFUSO COM BUCHA MAD. SEXT. ROSCA SOBERBA .........................86

PISTOLA DE COLA QUENTE 60W BIVOLT PC0060 ..................................92

CLORO MULTIAÇÃO BALDE 10KG ........................................................81

PARAFUSO COM BUCHA MAD. SEXT. ROSCA SOBERBA .........................86

LIXEIRA MULTIUSO 6L BRANCA 23X25CM ...........................................92

CLORO MULTIAÇÃO PT 1KG ...............................................................81

PARAFUSO COM BUCHA MAD. CAB. CHATA FENDA ZI ..........................86

LIXEIRA REDONDA COM BASCULANTE 4,3L BRANCA 20,2X19,3CM .....93

DIMINUIDOR DE PH E ALCALINIDADE GL 1 LITRO .................................81

PARAFUSO COM BUCHA A.A PANELA FENDA RETA ZI ............................86

LIXEIRA RETANGULAR COM PEDAL 6L BRANCA 20,6X22,6X28CM ........93

ESTABILIZADOR DE PH PT 2KG ............................................................81

PARAFUSO FRANCÊS UNC COM PORCA ZI ............................................86

CABIDE P/ ROUPAS CRISTAL ADULTO LEVE 6 PAGUE 5 40CM ...............93

KIT TESTE AQUACHECK .......................................................................81

PARAFUSO MADEIRA CABEÇA CHATA FENDA ZI ...................................86

CABIDE P/ ROUPAS PRETO ADULTO LEVE 6 PAGUE 5 42CM .................93

LIMPA BORDAS GL 1 LITRO .................................................................81

PARAFUSO MADEIRA SEXTAVADO ROSCA SOBERBA ZI ..........................86

REFIL PISTOLA COLA QUENTE 8X100 CARTELA C/9 .............................93

PASTILHA MULTIAÇÃO PT 200GR ........................................................81

PARAFUSO PARA VASO B08 ................................................................86

PULVERIZADOR 350ML PD350 .............................................................93

SULFATO DE ALUMÍNIO PT 2KG ...........................................................81

PARAFUSO PARA VASO B10 ................................................................88

PARAFUSO PARA VASO B12 .................................................................88

PULVERIZADOR 500ML PU500 ............................................................93

FERRAGENS

PARAFUSO PARA VASO LATÃO ESPECIAL ..............................................88

ESCOVA MULTIUSO ..............................................................................93

PITÃO COM BUCHA .............................................................................88

ESCOVA MULTIUSO COM ALÇA .............................................................93

FERRAGENS

PREGO POLIDO EM AÇO ......................................................................88

ESCOVA SANITÁRIA .............................................................................93

NÚMERO ALUMÍNIO ESP. (APTO) - 05 CM ..............................................82

PARAFUSO PARA TELHA COM VEDAÇÃO ..............................................88

PALHA DE AÇO ...................................................................................93

VEDANTE PARA PORTA .......................................................................82

KIT VEDAÇÃO E FIXAÇÃO DE TELHAS PVC .............................................88

PALHA DE AÇO ...................................................................................93

RODÍZIO SILICONE COM TRAVA ...........................................................82

ARRUELA MOLE PARA TELHA ..............................................................88

FACA PEIXEIRA ....................................................................................93

RODÍZIO SILICONE SEM TRAVA .............................................................82

FACA ESPORTE INOX 5 FISH ................................................................93

LONAS E CORDAS

GANCHO DE REDE PAREDE ZINCADO PARAFUSO .................................82

FACA ESPORTE INOX 5 OUTDOOR .......................................................93

GANCHO PARA REDE PAREDE SOBREPOR SIMPLES PT-02 ...................82

LONA POLIETILENO LARANJA ..............................................................88

CANIVETE 11 FUNÇÕES INOX 2 1/3 .....................................................93

CORDA ECO ROPE 03MM BRANCA CARRETEL COM 400M ...................88

CANIVETE INOX 3 - CARTELA C/ 6 UNID. ...............................................93

CADEADOS

CORDA ECO ROPE 04MM BRANCA CARRETEL COM 220M ...................88

CANIVETE INOX 3 LÂMINA ...................................................................93

CADEADO ENCARTELADO PAR MESMO SEGRED0 .................................82

RETANGULAR "CARTELA" COM 6 UNIDADE ..........................................93

CHAPAS DE ALUMÍNIO

CADEADO ENCARTELADO PAR MESMO SEGRED0 .................................82

ESCADA

CADEADO INDIVIDUAL .........................................................................82

CHAPA ALUMÍNIO TRADICIONAL ROLO COM 27,5M ..............................88

CADEADO INDIVIDUAL .........................................................................82

ABRAÇADEIRA ROSCA SEM FIM ..........................................................88

ESCADA ALUMÍNIO 3 DEGRAUS RESIDENCIAL (BANQUETA) ...................93

CADEADO TETRA INDIVIDUAL ..............................................................82

ABRAÇADEIRA TIPO U .........................................................................88

ESCADA ALUMÍNIO ..............................................................................93

CADEADO DE LATÃO ...........................................................................82

ARRUELA ZAMAC ...............................................................................88

ESCADA ALUMÍNIO PROFISSIONAL ARTICULADA ..................................94

CADEADO DE LATÃO ...........................................................................82

BUCHA ZAMAC ...................................................................................88

LIMPEZA

CADEADO LATÃO HASTE LONGA .........................................................82

REGULADOR DE GÁS E ACESSÓRIOS

PÁ DE LIXO COM CABO ........................................................................94

CANTONEIRA ARREDONDADA ..............................................................83

ENGATE FLEXÍVEL AÇO INOX PARA GÁS F X F ......................................88

RODO PEQUENO ..................................................................................94

CANTONEIRA L POLIDO ........................................................................83

ENGATE FLEXÍVEL AÇO INOX PARA GÁS ..............................................88

RODO MÉDIO .......................................................................................94

CANTONEIRA MÃO FRANCÊSA LEVE PODIUM ........................................83

REGULADOR DE GÁS 1KG BRUTO ........................................................88

RODO GRANDE ....................................................................................94

CANTONEIRA METÁLICA .....................................................................83

REGULADOR DE GÁS COM MANÔMETRO 1KG BRUTO ...........................88

VASSOURA LIMPEZA PESADA ...............................................................94

CANTONEIRA SEXTAVADA ALTA POLIDO ................................................83

REGULADOR DE GÁS 1KG BRUTO ........................................................90

VASSOURA MULTIUSO ..........................................................................94

DOBRADIÇA CURVA COM CALCO ........................................................83

REGULADOR DE GÁS COM MANGUEIRA 1,20M + ABRAÇADEIRA ..........90

VASSOURA P/ JARDIM METÁLICA 22 DENTES C/CABO 1,20M ..............94

FECHADURAS

REGULADOR DE GÁS COM MANGUEIRA 80CM + ABRAÇADEIRA ...........90

VASSOURA PARA CANTOS ...................................................................94

CILINDRO 48MM COM ROSCA E PARAFUSO CROMADO .......................83

REGULADOR DE GÁS 2KG BRUTO ........................................................90

VASSOURA PLÁSTICA PARA JARDIM 18D. C/CABO 1,20M ....................94

TRAVA DE SEGURANÇA BRONZE BL (TETRA CHAVE) .............................83

KIT P/ INST. DE GÁS C/FLEXÍVEL 1,20M AÇO INOX ................................90

VASSOURA PLÁSTICA PARA JARDIM 22 DENTES C CABO 1,20M ..........94

FECHADURA BANHEIRO HOME ROSETA RED CIL 55 .............................83

REGISTRO PARA GÁS 90º COM FECHAMENTO EM ESFERA ...................90

VASSOURA PLÁSTICA PARA JARDIM 26 DENTES COM CABO 1,20M .....94

FECHADURA BANHEIRO INOX PREMIUM ROS RED CIL 55 .....................83

ADAPTADOR BRUTO PARA INSTALAÇÃO DE GÁS (ROSCA EXT) ...............90

VASSOURA TIPO ESCOVÃO ...................................................................94

8

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ÍNDICE

VASSOURA TIPO PELO .........................................................................94

ADAPTADORES E EXTENSÕES ELETRICAS

CORDÃO PARALELO 300V 100M BRANCO ..........................................106

VASSOURÃO DE CERDAS RÍGIDAS SEM CABO .......................................94

EXTENSÃO 2P CORDÃO PARALELO 10A 250W BRANCA .....................100

VASSOURÃO GARI ................................................................................94

ILUMINAÇÃO

EXTENSÃO 2P CORDÃO PARALELO 10A 250W PRETA .........................100

VASSOURÃO GARI MADEIRA 375X65MM COM CABO 1,20M - MAX .......94

EXTENSÃO 2P+T CABO PP CHATO 3X0,75 10A/250V BR/PT ..............100

CABO PARA VASSOURÃO .....................................................................94

REATORES

EXTENSÃO 2P+T CABO PP CHATO 3X0,75 10A/250V BR/PT ..............100

TIJOLO DE VIDRO INCOLOR CLOUDY 19X19X08 CX06 - ECB .................94

REATOR AF ELETRÔNICO BIVOLT .......................................................107

ELÉTRICA

MÓDULOS, PLACAS E PLUGUES

REATOR AF ELETRÔNICO BIVOLT .......................................................107

MÓDULO 1 INTERRUPTOR PARALELO 10A 250V PETRA .....................100

LANTERNA

ABRAÇADEIRA

MÓDULO 1 INTERRUPTOR SIMPLES 10A 250V PETRA ........................101

MÓDULO KEYSTONE RJ45 PETRA .....................................................101

LANTERNA LED HIGH-FUN 9 LEDS PT12 ............................................107

ABRAÇADEIRA NYLON BRANCA ............................................................96

MÓDULO TOMADA 2P+T 10A 250V PETRA .......................................101

LANTERNA LED RECARREGÁVEL BIV 7 LEDS K0068 ............................107

LANTERNA LED SMART-PRO 1 LED K4007 PT24 ...............................107

ACESSÓRIOS ELÉTRICA

MÓDULO TOMADA 2P+T 10A 250V RAPID ........................................101

MÓDULO TOMADA 2P+T 20A 250V PETRA .......................................101

CABEÇOTE ALUMÍNIO ..........................................................................96

LÂMPADAS

PLACA 4X2 1 MÓDULO HORIZONTAL PETRA ......................................101

PROLONGADOR PARA CAIXA OCTOGONAL AMARELO ...........................96

LÂMPADA 3U 127V BRANCA ..............................................................107

PLACA 4X2 1 MÓDULO HORIZONTAL RAPID ......................................101

CAIXA LUZ 4X4 OCTOGONAL AMARELA PACOTE12 ...............................96

LÂMPADA 3U 25W 127V 2700K T4 ...................................................107

PLACA 4X2 1 MÓDULO VERTICAL PETRA ...........................................101

CAIXA LUZ 4X2 AMARELA PACOTE 20 ..................................................96

LÂMPADA 3U 25W 127V 6400K T4 ...................................................107

PLACA 4X2 1 MÓDULO VERTICAL RAPID ............................................101

CAIXA LUZ 4X2 PRETA ........................................................................96

LÂMPADA 3U MINI 15W 127V 6400K T3 ...........................................107

PLACA 4X2 2 MÓDULOS DISTANTES PETRA ......................................101

CAIXA LUZ 4X4 AMARELA PACOTE 20 ..................................................96

LÂMPADA COMPACTA ESPIRAL 59W 127V 6400K T4 ........................107

PLACA 4X2 2 MÓDULOS DISTANTES RAPID .......................................101

TUBO ELETRODUTO DE PVC RÍGIDO ROSCÁVEL ....................................96

LÂMPADA DICRÓICA HALÓGENA 50W12V .........................................107

PLACA 4X2 2 MÓDULOS PETRA ........................................................101

LUVA PARA ELETRODUTO

LÂMPADA ESPIRAL 46W 127V 6400K T4 ..........................................107

PLACA 4X2 2 MÓDULOS RAPID .........................................................101

ROSCÁVEL PRETA ...............................................................................96

LÂMPADA ESPIRAL 127V AMARELA ...................................................107

PLACA 4X2 3 MÓDULOS PETRA ........................................................101

CURVA CURTA 90º PARA ELETRODUTO ROSCÁVEL ...............................96

LÂMPADA ESPIRAL 127V BRANCA .....................................................107

PLACA 4X2 CEGA MILLENIUN ............................................................101

ELETRODUTO PVC FLEX CORRUGADO AMARELO ..................................96

LÂMPADA GELADEIRA/MICROONDAS CLARA 15W E-14 127V ............107

PLACA 4X2 COM FURO MILLENIUN ....................................................101

ELETRODUTO PVC FLEX CORRUGADO LARANJA REFORÇADO ...............96

LÂMPADA INC. BOLINHA CRISTAL15W E-27 127V PT10 UNIDADES ....108

PLACA 4X4 2 MÓDULOS HORIZONTAL PETRA ....................................101

CAPACITOR MET. DUPLO 3 FIOS ..........................................................96

LÂMPADA INC. BOLINHA LEITOSA 15W E-27 127V PT10 UNIDADES ....108

PLACA 4X4 2 MÓDULOS HORIZONTAL RAPID ....................................101

CAPACITOR MET. SIMPLES 2 FIOS ........................................................96

LÂMPADA INC. ECOLOGENA A55 127V ..............................................108

PLACA 4X4 4 MÓDULOS DISTANTES PETRA ......................................101

CONTROLE PARA VENTILADOR E LÂMPADA DESLIZANTE BIVOLT ..........96

LÂMPADA LED 4,5W MINI GLOBO 2700K E27 ....................................108

PLACA 4X4 4 MÓDULOS PETRA ........................................................101

CONTROLE PARA VENTILADOR E LÂMPADA ROTATIVO BIVOLT ..............97

LÂMPADA LED 4.5W CANDLE 2700K E27 ..........................................108

PLACA 4X4 6 MÓDULOS RAPID .........................................................103

CONTROLE PARA VENTILADOR OU LUMINOSIDADE BIVOLT ...................97

LÂMPADA LED A60 2700K-AM-BIV E27 25000H ................................108

PLACA 4X4 CEGA MILLENIUN ............................................................103

HASTE TERRA COBREADA ESPECIAL ....................................................97

LÂMPADA LED A60 6500K-BR-BIV E27 25000H ................................108

PLACA REDONDA 4" COM FURO MILLENIUN ......................................103

TERMINAL DE PRESSÃO REFORÇADO FUNDIDO ...................................97

LÂMPADA LED CLASSIC A60 9W 6500K -BR-BIV E27 6K BRANCA ......108

PLACA REDONDA 4" MILLENIUN ........................................................103

LÂMPADA LED DICRÓICA 4W SUPER LED E27 ...................................108

QUADROS E DISPOSITIVOS DE PROTEÇÃO

PLUGUE 3 SAÍDAS 2P 10A 250V .......................................................103

LÂMPADA LED DICRÓICA 4W SUPER LED GU 10 ................................108

CAIXA DE PASSAGEM ..........................................................................97

PLUGUE 3 SAÍDAS 2P 10A 250V .......................................................103

LÂMPADA LED DICROICA PRO-COB 6400K .........................................108

CAIXA HIDRÔMETRO (REGIÃO SAAE / SANEAR) .....................................97

PLUGUE FÊMEA 2P+T 10A 250V BRANCO (PROLONGADOR) ...............103

LÂMPADA LED PAR16 5.5W 6500-BR-BIV GU10 25000H 25° ............108

CAIXA PARA MEDIDOR MONOFÁSICO COMPLETO 177X282X140MM .....97

PLUGUE GIGANTE 2P+T CINZA FORTE ................................................103

LÂMPADA LED PAR20 4W AMARELA 127V-E27 6K ............................108

CAIXA PARA MEDIDOR POLIFÁSICO 247X378X185MM ..........................97

PLUGUE MACHO 180º 2P ...................................................................103

LÂMPADA LED PAR20 7W 2700K-AM-BIV E27 25000H 35° ...............108

CAIXA PARA PROTEÇÃO GERAL 167X263X123MM 100A ......................97

PLUGUE MACHO 180º 2P ...................................................................103

LÂMPADA LED PAR20 4W BRANCA 127V-E27 6K ..............................108

UNIÃO PARA ACOPLAMENTO DE CAIXA DE MEDIÇÃO ...........................97

PLUGUE MACHO 180º 2P+T ..............................................................103

LÂMPADA LED PAR30 12W 3000K 100-240V E27 25000H 35° .........108

CABO COAXIAL OHMS 100M ...............................................................97

PLUGUE MACHO 180º 2P+T ..............................................................103

LÂMPADA LED PAR38 18W 3000K 100-240V E27 25000H 40° .........108

CABO DE REDE (LAN) 4PT TOP AZUL 305M ..........................................97

PULSADOR CAMPAINHA 10A COM PLACA 250V MILLENIUN ...............103

LÂMPADA LED TUBE T8 8W 6500K-BR-BIV G13 40000H 150° ...........108

CABO TELEFONE CCI PARES 100M CINZA .............................................97

TOMADA COMPUTADOR RJ45 COM PLACA MILLENIUN ......................103

LÂMPADA LED TUBO 18W 6400K-BR 1,21CM BIV .............................108

ANTENA EM V - 5 ESTÁGIOS ...............................................................97

TOMADA SOBREPOR EXTERNA 2P+T 10A 250V BR ...........................103

LÂMPADA LED TUBO 36W 5000K-BR 2,37CM BIV .............................110

ANTENA INTERNA E EXTERNA HD 5000 DIGITAL ..................................97

TOMADA SOBREPOR EXTERNA 2P+T 20A 250V BR ...........................103

LÂMPADA LED TUBO 9W 6400K-BR 600MM BIV ...............................110

ANTENA INTERNA MINI RETANGULAR - UHF/VHF/FM - C/SELETOR ........97

TOMADA TELEFONE RJ11 CONJUNTO PADRÃO .................................103

LÂMPADA LED VELA 3W 3000K E14 .................................................110

SUPORTE PARA TV PLASMA/LCD/LED SPRING FIXO UNIVERSAL .............97

SENSORES

LÂMPADA MINI 3U 15W 127V 2700K 3U T3 ......................................110

DIVISOR ANTENA 900 A 2050 MHZ ALTA .............................................97

RELÉ FOTOCÉLULA BIVOLT CORUJITO ...............................................103

LÂMPADA MISTA DE 160W220V E27 ................................................110

EMENDA "F" UNIVERSAL PACOTE 30 ...................................................97

RELÉ FOTOCÉLULA BIVOLT PARA BASE .............................................103

LÂMPADA PALITO HALÓGENA DEQ 300W 110-130V .........................110

EMENDA "T" JACK "F" PACOTE 30 ......................................................97

SENSOR DE PRESENÇA QA19 360º BIVOLT COM FOTOCÉLULA ..........103

LÂMPADA PALITO HALÓGENA DEQ 500W 110 130V ..........................110

CABO CATV RCA 3+3 PLUG (AM/VM/BR) 1,80M ..................................99

SENSOR DE PRESENÇA QA26180ºBIVOLT C/ FOTOCÉLULA EXTERNO .104

CANALETA 20X10X2MT BRANCA C/ DIVISÓRIA CX25 ...........................99

LUMINÁRIAS E SPOTS

SENSOR DE PRESENÇA QI2 180º BIVOLT C/ FOTOCÉLULA ..................104

CHAVE TESTE ......................................................................................99

LUMINÁRIA COMPLETA BRANCA .......................................................110

SENSOR DE PRESENÇA QI6 180º BIVOLT C/OM FOTOCÉLULA .............104

CHAVE TESTE 135MM

LUMINÁRIA DE EMERGÊNCIA 30 LEDS BIVOLT ...................................110

CAIXA COM 12 UNID ...........................................................................99

INTERRUPTORES E TOMADAS

LUMINÁRIA LED EMB. QUADRADA SLIM 20CM 15W 127 BR ...............110

CHAVE TESTE DIGITAL .........................................................................99

1 INTERRUPTOR PARALELO HORIZONTAL C/ PLACA 10A ...................104

LUMINÁRIA LED EMB. QUADRADA SLIM 24CM 24W 127 BR ...............110

CONECTOR PARAFUSO FENDIDO SIMPLES ............................................99

1 INTERRUPTOR PARALELO+TOMADA C/ PLACA 10A 250V .............104

LUMINÁRIA LED EMB. REDONDO SLIM 12CM 7W 127 BR ..................110

CONECTOR DE COMPRESSÃO .............................................................99

1 INTERRUPTOR PARALELO C/ PLACA 10A 250V MILLENIUN ..............104

LUMINÁRIA LED EMB. REDONDO.SLIM 20CM 15W 127 BR ................110

CONECTOR METAL COM ANEL ............................................................99

1 INTERRUPTOR SIMPLES + TOMADA COM PLACA 10A 250V PETRA .104

LUMINÁRIA LED EMB. REDONDO.SLIM 24CM 24W 127 BR ................110

CONECTOR METAL ROSCA RG 59U .....................................................99

1 INTERRUPTOR SIMPLES + TOMADA C/ PLACA ................................104

LUMINÁRIA LED INLINE BIV ................................................................110

CONECTOR PORCELANA ......................................................................99

1 INTERRUPTOR SIMPLES COM PLACA 10A 250V MILLENIUN ............104

LUMINÁRIA LED SOBREP. QUADRADA SLIM 30CM 24W 127 BR ..........110

CONECTOR PORCELANA ......................................................................99

1 INTERRUPTOR SIMPLES EXTERNO 10A 250V BR .............................104

LUMINÁRIA LED SOBREP. REDONDA SLIM 30CM 24W 127 BR ............110

EXTENSÃO TELEFONE LISA BRANCO.....................................................99

1 INTERRUPTOR SIMPLES HORIZONTAL COM PLACA ........................104

LUMINÁRIA TARTARUGA ALUMÍNIO OVAL E27 C/ GRADE BRANCA .......110

EXTENSÃO TELEFONE LISA PRETO ......................................................99

1 INTERRUPTOR SIMPLES+1INTERPT PARALELO C/ PLACA ...............104

LUMINÁRIA TARTARUGA ALUMÍNIO OVAL E27 C/ GRADE PRETA ..........110

FIXA FIOS ...........................................................................................99

1 INTERRUPTOR SIMPLES+1INTR PARALELO C/ PLAC 10A ................104

SPOT KIT SPORT PRATIK QUADRADA MR16 HI-LED .............................110

FIXA FIO MIGUELÃO .............................................................................99

1 TOMADA 2P+T HORIZONTAL 10A COM PLACA 250V PETRA ...........104

IMPERMEABILIZANTES

FIXA FIOS ...........................................................................................99

1 TOMADA 2P+T HORIZONTAL COM PLACA 10A 250V MILLENIUN .....104

PASSA FIO (COLORIDO) PEAD ...............................................................99

1 TOMADA 2P+T VERTICAL 10A COM PLACA 250V MILLENIUN ..........104

ADESIVOS E IMPERMEABILIZANTES

PASSA FIO COM ALMA DE AÇO ............................................................99

2 NTERRUPTORESES SIMPLES 10A COM PLACA 250V MILLENIUN .....104

SOQUETE PORCELANA (RECEPTÁCULO) PARA PLAFON .........................99

ADITIVO P/ MASSA CIPLAKAL FRASCO 1L ..........................................111

2 NTERRUPTORES SIMPLES COM PLACA 10A 250V PETRA ................104

SOQUETE PORCELANA (RECEPTÁCULO) PARA PLAFON ........................99

BIANCOLA - FRASCO 1L ...................................................................111

2 NTERRUPTORES SIMPLES+TOMAD 2P+T10A C PLAC 250V ..........104

SOQUETE PORCELANA RCA EXTERNO ...............................................100

BIANCOLA ........................................................................................111

2 TOMADAS 2P+T HORIZONTAL 10A COM PLACA 250V MILLENIUN ...104

PLAFON REDONDO COM SOQUETE PORCELANA BRANCO ..................100

EPÓXI CIPLAK - FRASCO 1KG ............................................................111

2 TOMADAS 2P+T HORIZONTAL 10A COM PLACA 250V PETRA .........106

PLAFON QUADRADO C SOQUETE PORCELANA PETRA 100W/250V BR 100

HIDROPRIMER PARA MANTA ASFÁLTICA ............................................111

3 INTERRUPTOR SIMPLES 10A COM PLACA 250V MILLENIUN ............106

PLAFON REDONDO C SOQUETE PORCEL MILLENIUN 100W/250V BR ..100

IMPERCIT .........................................................................................111

3 INTERRUPTOR SIMPLES 10A COM PLACA 250V PETRA ...................106

PLUG CHATO MACHO 10A CINZA PACOTE 10 ....................................100

CAIXA SOBREPOR 2 MÓDULOS PETRA BRANCO (SISTEMA X) ..............106

MANTAS

PLUG MODULAR 8X8 RJ45 PACOTE 100 ...........................................100

CAIXA SOBREPOR 4X2 BRANCA ........................................................106

KIMANTA (MANTA AUTOADERENTE) ALUMINIZADA ..............................111

TOMADINHA MINI SOQUETE REDONDO COM FIO 12CM PACOTE 100 .100

CAIXA SOBREPOR COM TOMADA 2P+T 20A 250V ..............................106

KIMANTA (MANTA AUTOADERENTE) TERRACOTA .................................111

DISJUNTORES

MANTA ASFÁLTICA ALUMÍNIO 3MMX10M ..........................................111

FIOS E CABOS

MANTA ASFÁLTICA POLIÉSTER 3MMX10M/ 4MMX10M ......................111

DISJUNTOR UNIPOLAR DIN CURVA C 3KA ..........................................100

CABO FLEXÍVEL 750V 1,50 MM 100M ...............................................106

MANTA ASFÁLTICA POLIÉSTER COM ALUMÍNIO 3MMX10M ................111

DISJUNTOR BIPOLAR DIN CURVA C 3KA .............................................100

CABO FLEXÍVEL 750V 2,50 MM 100M ...............................................106

MANTA ASFÁLTICA POLIETILENO 3MMX10M ......................................111

DISJUNTOR TRIPOLAR DIN CURVA C 3KA ...........................................100

CABO FLEXÍVEL 750V 4,00 MM 100M ...............................................106

MANTA POLIÉSTER TPIII P/ PISCINA 4MMX10M ..................................113

DISJUNTOR NEMA UNIPOLAR 127VCA 5KA ........................................100

CABO FLEXÍVEL 750V 6,00 MM 100M ...............................................106

MANTACRIL FAST MANTA LIQUIDA ....................................................113

DISJUNTOR NEMA 40A BIPOLAR 220VCA 5KA ...................................100

CABO FLEXÍVEL 750V 10,00 MM 100M .............................................106

MANTACRIL SUPER MANTA LIQUIDA ...................................................113

DISJUNTOR 63A DIFERENCIAL DR 30MA LINHA DMS .........................100

CABO SEMIRRÍGIDO 750V 100M .......................................................106

POLY DESMOLDAR 3,6KG ..................................................................113

DISJUNTOR 63A DIFERENCIAL DR 30MA LINHA DMS .........................100

CABO PP FLEXÍVEL 500V 100M .........................................................106

CENTRAL DE RELACIONAMENTO • 27 3089.3888

9

ÍNDICE

MATERIAL DE ISOLAMENTO

CORANTES

NOVACOR GESSO E DRYWALL ............................................................118

VEDA-LAJE PRETO ............................................................................113

CORANTE XADREZ AMARELO 50ML ...................................................116

METALATEX ECO RESINA IMPERMEABILIZANTE ...................................121

VEDA-PAREDE BRANCO ....................................................................113

PÓ XADREZ AMARELO - 250/500G ....................................................116

NOVACOR RESINA IMPERMEABILIZANTE .............................................121

VEDA-UMIDADE FLEX ........................................................................113

VERNIZ E COMPLEMENTOS PARA MADEIRA

VEDA-UMIDADE PAREDE ...................................................................113

TEXTURAS

METALATEX VERNIZ ACRÍLICO PARA PEDRAS ......................................121

MANTA SUB COBERTURA DUPLA-FACE COM 1,20m LARGURA ............113

METALATEX TEXTURA LISO ................................................................116

OSMOCOLOR STAIN UV DECK ............................................................121

MANTA SUB COBERTURA SIMPLES COM 1,20m LARGURA ..................113

NOVACOR TEXTURA RÚSTICA .............................................................116

OSMOCOLOR STAIN ST NATURAL .......................................................121

PINTURA

TINTAS IMOBILIÁRIAS E COMPLEMENTOS

VERNIZ ISOLARE ................................................................................121

METALATEX REQUINTE SUPERLAVÁVEL - RED MIX E COLOR ................117

SW VERNIZ PREMIUM ........................................................................121

COMPLEMENTOS PARA PINTURA

METALATEX LITORAL ACRÍLICO - RED MIX E COLOR ............................117

VERNIZ COPAL ...................................................................................121

CONVERTEDOR DE FERRUGEM ...........................................................114

METALATEX ELASTIC - RED MIX E COLOR ...........................................117

VERNIZ FILTRO SOLAR .......................................................................121

CONVERTEDOR DE FERRUGEM ...........................................................114

METALATEX BACTERCRYL ..................................................................117

VERNIZ MARÍTIMO .............................................................................121

GLOBO FIX - FIXADOR DE CAL 150ML ................................................114

METALATEX ECO TELHA .....................................................................117

MASSA PARA MADEIRA ....................................................................121

METALATEX ECO SUPER GALVIT .........................................................114

NOVACOR PISO MAIS RESISTENTE .....................................................117

METALATEX ECO FUNDO BRANCO FOSCO PARA MADEIRA .................122

METALATEX MASSA ACRÍLICA BRANCA ..............................................114

NOVACOR PISO ULTRA .......................................................................117

METALATEX ECO MASSA NÍVELADORA PARA MADEIRA ......................122

METALATEX MASSA PVA BRANCA - GALÃO 3,6LT ...............................114

NOVACOR AZULEJO ACETINADO .........................................................117

SPRAYS

PRIMER CINZA ESCURO FOSCO ..........................................................114

NOVACOR EPOXI ................................................................................117

ALTA TEMPERATURA ..........................................................................123

REMOVEDOR DE TINTA SPRAY 400ML / 250G ....................................114

METALATEX ACRÍLICO E SEMIBRILHO - RED MIX E COLOR ...................117

ALUMEN ............................................................................................123

REMOVEDOR STRIPTIZI GEL 1,0KG .....................................................114

NOVACOR ACRÍLICO COBRE MAIS RED MIX E COLOR ..........................117

ARTE URBANA ...................................................................................123

RESTAURAÇÃO ACRÍLICO FLEXÍVEL FOSCO .........................................114

NOVACOR EXTRA ACRÍLICA RED MIX E COLOR ....................................117

DECOR ..............................................................................................123

SELADORA INCOLOR PARA MADEIRA ................................................114

DURAPLAST ACRÍLICA ........................................................................118

KEM TONE ACRÍLICA ..........................................................................118

DECOR VERNIZ PARA USO GERAL .......................................................123

SOLVENTES

METALATEX ESMALTE ........................................................................118

ESMALTE SINTÉTICO BRANCO FOSCO ................................................123

SUPER GALVIT ..................................................................................115

METALATEX ECO ESMALTE RED MIX E COLOR ....................................118

LUMINOSA ........................................................................................123

ZARCÃO VERM. FC - 990 ...................................................................115

NOVACOR ESMALTE ACETINADO ........................................................118

METALIK EXTERIOR ............................................................................123

ÁGUARRÁS MINERAL ........................................................................115

METALATEX ECO FUNDO PREPARADOR ..............................................118

METALIK INTERIOR .............................................................................123

METALATEX ÁGUARRÁS .....................................................................115

METALATEX FUNDO PREPARADOR DE PAREDE....................................118

COLORGIN PLÁSTICO .........................................................................123

QUEROSENE ......................................................................................115

NOVACOR FUNDO ANTIFERRUGEM .....................................................118

SUPER GALVITE .................................................................................123

THINNER ACABAMENTO ....................................................................115

SUPER ADERE FUNDO BRILHANTE ......................................................118

USO GERAL .......................................................................................123

THINNER COMUM MULTIUSO .............................................................115

NOVACOR FUNDO FOSCO ..................................................................118

CENTRAL DE RELACIONAMENTO

27 3089.3888

www.otimaatacado.com.br

10

CENTRAL DE RELACIONAMENTO • 27 3089.3888

CENTRAL

HIDRÁULICA

DE RELACIONAMENTO

27 3089.3888

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

ACABAMENTO PARA REGISTRO

ACABAMENTO PARA REGISTRO

ACABAMENTO PARA REGISTRO RIVA

ACABAMENTO PARA REGISTRO TRIO

ITAPEMA BELLA

PERTUTTI

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

02469

BASE 1/2" 3/4" 1"

UN

04235

BASE 1/2" 3/4" 1"

UN

07761

BASE 1/2" 3/4" 1"

UN

05116

BASE 1/2" 3/4" 1"

UN

ACABAMENTO PARA REGISTRO C33

ACABAMENTO PARA REGISTRO C50

ACABAMENTO VÁLVULA DESCARGA

ACABAMENTO VÁLVULA DESCARGA

CLÁSSICA SALVÁGUA

SALVÁGUA BOX CHROME ABS

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08897

BASE 1/2" 3/4" 1"

UN

08898

BASE 1/2" 3/4" 1"

UN

06534 CHROME

UN

06226

CHROME ABS

UN

ACABAMENTO VÁLVULA DESCARGA

ACABAMENTO VÁLVULA DESCARGA

ACABAMENTO VÁLVULA DESCARGA

ACABAMENTO VÁLVULA DESCARGA

SALVÁGUA BOX

CLÁSSICA

CLÁSSICA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06105

GELO POLAR ABS

UN

02459 CROMADO

UN

02460 CROMADO/PRETO

UN

02456

CINZA PEROLA

UN

ACABAMENTO VÁLVULA DESCARGA

VÁLVULA DESCARGA BASE

REGISTRO GAVETA COM ACABAMENTO

REGISTRO GAVETA COM ACABAMENTO

C33 ABS

C50 ABS

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

02455

1.1/2''

UN

08885

1/2"

UN

08887

1/2"

UN

02457

GELO POLAR

UN

05115 1.1/4”

UN

08886 3/4”

UN

08888 3/4”

UN

ACAMENTOS E REGISTROS • ACESSÓRIOS DE HIDRÁULICA • ARMÁRIOS DE BANHEIRO • ACESSÓRIOS DE BANHEIRO • VÁLVULAS E GRELHAS • REGULADOR DE GÁS E ACESSÓRIOS • PIAS E ARMÁRIOS DE COZINHA LOUÇAS SANITÁRIAS • PORTAS SANFONADAS • FILTROS • TORNEIRAS • BOMBAS • CAIXAS D’ÁGUA E RESERVATÓRIO • CHUVEIROS ELÉTRICOS E DUCHAS • TUBOS E CONEXÕES

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

11

HIDRÁULICA

REGISTRO GAVETA BASE

REGISTRO GAVETA COM ACABAMENTO

REGISTRO PRESSÃO COM ACABAMENTO

REGISTRO PRESSÃO COM ACABAMENTO

BRUTO EUROPA

C33 ABS

C50 ABS

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

02463

1/2"

UN

02466

1/2"

UN

08879

1/2"

UN

08881

1/2"

UN

02464 3/4”

UN

02464 3/4”

UN

08880 3/4”

UN

08882 3/4”

UN

REGISTRO PRESSÃO BASE

REGISTRO PRESSÃO BASE

REGISTRO PRESSÃO BASETEC 1/4 DE

REGISTRO PRESSÃO BASETEC 1/2 VOLTA

VOLTA ITAPEMA BELLA

PERTUTTI

Cód. Ref.

Un.

Cód. Ref.

Un.

02461

1/2"

UN

08883

1/2"

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

02462 3/4”

UN

08884 3/4”

UN

07312 3/4"

UN

04234 3/4"

UN

REGISTRO PRESSÃO BASETEC

REGISTRO PARA MÁQUINA DE LAVAR

KIT REPARO PARA VÁLVULA DE

KIT REPOSIÇÃO REGISTRO

CERÂMICO 1/2 VOLTA

DESCARGA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04389

1.1/2''

UN

01012

1/2" 3/4"

PT12

05552 3/4"

UN

01001 1/2"

PT12

05210 1.1/4”

UN

PT12

BICO PARA TORNEIRA JARDIM PRETA

BOIA PARA CAIXA DE DESCARGA HASTE

BOIA PARA CAIXA D’ÁGUA HASTE

BOIA PARA CAIXA D’ÁGUA

ALUMÍNIO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

01010 1/2"

PT12

08932

1/2' 13CM

UN

05011

1/2" 19CM

UN

06076

1/2" 3/4"

UN

BOIA REPARO CAIXA ACOPLADA

BOTÃO ACIONAMENTO LATERAL PARA

BOTÃO ACIONAMENTO SUSPENSO PARA

CAIXA DESCARGA 8 LITROS

CAIXA ACOPLADA

CAIXA ACOPLADA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06467 KF160

UN

06464 CROMADO

UN

06463 CROMADO

UN

08395 BRANCA

UN

12

CENTRAL DE RELACIONAMENTO • 27 3089.3888

HIDRÁULICA

CAIXA DESCARGA CONTROLADA ECO

CAIXA DESCARGA CONTROLADA 9

MECANISMO ENTRADA CAIXA

MECANISMO SAÍDA CAIXA ACOPLADA

NOVA 6/9 LITROS

LITROS

ACOPLADA

COM ACIONAMENTO PNEMATIC

Cód. Ref.

Un.

Cód. Ref.

Un.

05025

CINZA CLARO

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

06617 BRANCA

UN

05023

BEGE CLARO

U N

07574 UNIVERSAL

UN

07576 UNIVERSAL

UN

MECANISMO SAÍDA CAIXA ACOPLADA

REPARO VÁLVULA SAÍDA ACIONAMENTO

REPARO PARA CAIXA ACOPLADA

CONJUNTO ENTRADA MECÂNICA PARA

SUPERIOR

NATURAL

CAIXA ACOPLADA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07573 UNIVERSAL

UN

05722 UNIVERSAL

UN

06465 UNIVERSAL

UN

04021 KE300/N

UN

CONJUNTO DE FIXAÇÃO

CONJUNTO SAÍDA D'ÁGUA UNIVERSAL

CORRENTE E FIXADOR

OBTURADOR PARA SAÍDA ÁGUA

FLEXÍVEL 2"

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05723 KPF

UN

08857 MSU

UN

05724 KA/CRF

UN

05725 KS/O

UN

OBTURADOR PARA VEDAÇÃO

BOLSA DE VEDAÇÃO PARA CAIXA

CONJUNTO LIGAÇÃO AJUSTE COM

ANEL DE VEDAÇÃO

MECANISMO DE SAÍDA

DESCARGA ACOPLADA

BOLSA 25CM CROMADO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07575 340210-41

UN

05034 KS/BV

UN

05009 CLA2

UN

09307 3554

UN

ANEL DE VEDAÇÃO

ANEL DE VEDAÇÃO COM GUIA

ESPUDE PARA VASO SANITÁRIO

PROLONGADOR MULTIUSO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

00883 UB001

UN

09224 3554CG

UN

02238 798

PT20

04229

20MM 1/2"

PT12

CENTRAL DE RELACIONAMENTO • 27 3089.3888

13

HIDRÁULICA

PROLONGADOR MULTIUSO

REPARO TORNEIRA

VEDANTE PARA TORNEIRA

ARMÁRIO PLÁSTICO COM CANTONEIRA

EM ALUMÍNIO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05195 1/2”

PT05

Cód. Ref.

Un.

04228

40MM 1/2"

PT12

08896 CROMADO

UN

05196 3/4"

PT05

05029

36X31X10CM

UN

ARMÁRIO PLÁSTICO VERSÁTIL

ARMÁRIO PLÁSTICO BRANCO 34X37X10

ESPELHO OVAL 56X44,5X2CM

ESPELHO RETANGULAR 54X54X3CM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05003 35,5X30,5X10CM

UN

02354 34X37X10CM

UN

08520 5110-2

UN

08519 5100-2

UN

CANTONEIRA GRANDE BRANCA

CANTONEIRA BANHEIRO BRANCO

PRATELEIRA PVC BRANCA

ARMÁRIO VIENA 42X50 COM

ESPELHEIRA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

10074 BRANCO/PRETO

UN

09914 010801002

UN

06998 4010

UN

08518 62X17X5,6CM

UN

10073 BRANCO

UN

ARMÁRIO VIX 65X60 COM ESPELHEIRA

ARMÁRIO VIX 65X60 COM ESPELHEIRA

ARMÁRIO VIX 65X60 COM ESPELHEIRA

ARMÁRIO VIX 65X60 COM ESPELHEIRA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

10075 BRANCO

UN

10076

BRANCO/PRETO

UN

10078 CASTANHO/BRANCO

UN

10077 NOGUEIRA/BRANCO

UN

CABIDE PLÁSTICO COM 1 GANCHO

CABIDE PLÁSTICO COM 3 GANCHOS

GANCHO COM VENTOSA 4 PEÇAS

GANCHO PLÁSTICO 3 PEÇAS COM

BRANCO

BRANCOS

ADESIVO DE FIXAÇÃO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08579 502-2

UN

08578 501-2

UN

08577 2581

UN

08574 2502

UN

14

CENTRAL DE RELACIONAMENTO • 27 3089.3888

HIDRÁULICA

GANCHO PLÁSTICO CROMADO 3 PEÇAS

DUCHA HIGIÊNICA FLEXÍVEL EM AÇO

DUCHA HIGIÊNICA FLEXÍVEL EM AÇO

DUCHA HIGIÊNICA FLEXÍVEL LISO PVC

COM ADESIVO DE FIXAÇÃO

INOX 1,20M

INOX 1,20M

1,20MT

Cód. Ref.

Un.

08580 PR2572

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08581 PR2574

UN

02374 220910-412

UN

08470 220911-412

UN

06872 220916-412

UN

DUCHA HIGIÊNICA 1/4" VOLTA TRIO

DUCHA HIGIÊNICA MVS PERTUTTI

DUCHA HIGIÊNICA PVC 1/4 VOLTA

DUCHA HIGIÊNICA PVC 1/4 VOLTA

ALAVANCA 1,20M BRANCA

ALAVANCA 1/2 1,20M CROMADA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07757 00502606

UN

06532 00455706

UN

09328 3283

UN

09327 3287

UN

KIT ACESSÓRIO 5 PÇS ABS VERSÁTIL

KIT ACESSÓRIO METAL 5 PÇS

GATILHO PARA DUCHA HIGIÊNICA

SUPORTE PARA DUCHA HIGIÊNICA

FUNZIONALE

UNIVERSAL

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08452 PR1022

UN

08440 PR2802

UN

02372 240203-412

UN

02373 200104-41

UN

MANGUEIRA PARA DUCHA HIGIÊNICA

MANGUEIRA PARA DUCHA HIGIÊNICA

MANGUEIRA PARA DUCHA HIGIÊNICA

PORTA PAPEL HIGIÊNICO RESISTENZA

AÇO INOX 1,20M

AÇO INOX 1,20M

PVC BRANCA 1,20M

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06873 210901-412

UN

09321 210905-41

UN

02375 211201-41

UN

08441 PR2811

UN

ROLETE PARA PAPEL HIGIÊNICO

BARRA DE APOIO 40CM METAL

BARRA DE APOIO 40CM PLÁSTICO

ASSENTO SANITÁRIO ALMOFADADO

13,5X2,4CM

CROMADO

BRANCO

BRANCO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08454 PR1000

UN

08889 5776

UN

07528 36MMX40CM

UN

09144 BRANCO

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

15

HIDRÁULICA

ASSENTO SANITÁRIO UNIVERSAL

ASSENTO SANITÁRIO UNIVERSAL

ASSENTO SANITÁRIO UNIVERSAL

ASSENTO SANITÁRIO UNIVERSAL

ALMOFADADO

PREMIER

PREMIER

PREMIER

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05017 BRANCO

UN

04304 BEGE

UN

04301 BRANCO

UN

04303

CINZA CLARO

UN

ASSENTO SANITÁRIO UNIVERSAL NOVO

ASSENTO SANITÁRIO UNIVERSAL SOFT

ASSENTO SANITÁRIO UNIVERSAL SOFT

ASSENTO SANITÁRIO UNIVERSAL SOFT

BRANCO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08396 BRANCO

UN

04236 BRANCO

UN

09902 BRANCO

UN

09903

CINZA CLARO

UN

ASSENTO SANITÁRIO PERFECTO MULTI

ASSENTO SANITÁRIO THEMA

SIFÃO UNIVERSAL DUPLO PLÁSTICO

SIFÃO UNIVERSAL DUPLO PLÁSTICO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09900 BRANCO

UN

09904 BRANCO

UN

05107 BRANCO

UN

02371 BRANCO

UN

SIFÃO UNIVERSAL DUPLO PLÁSTICO

SIFÃO UNIVERSAL SIMPLES PLÁSTICO

SIFÃO UNIVERSAL SIMPLES PLÁSTICO

SIFÃO UNIVERSAL SIMPLES PLÁSTICO

1,50CM

72CM

72CM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08733 BRANCO

UN

08471 BRANCO

UN

02370 CROMADO

UN

02369 BRANCO

UN

SIFÃO UNIVERSAL SIMPLES PLÁSTICO

SIFÃO UNIVERSAL SIMPLES PLÁSTICO

VÁLVULA PIA AMERICANA METAL

VÁLVULA PIA AMERICANA INOX

73CM

STANDARD

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05926 BRANCO

UN

08732 BRANCO

UN

08895 3/5"

UN

04431 3/5"

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

17

HIDRÁULICA

VÁLVULA PIA AMERICANA INOX

ENGATE INOX

ENGATE PLÁSTICO

TAMPÃO PARA VÁLVULA DE LAVATÓRIO

DOMINUS

Cód. Ref.

Un.

03355 1MX1/2

PT05

Cód. Ref.

Un.

02294 30CMX1/2

PT20

07578

30CM X 1/2"

UN

02295 40CMX1/2

PT20

Cód. Ref.

Un.

07579

40CM X 1/2”

UN

03353 50CMX1/2

PT20

Cód. Ref.

Un.

10070 3/5"

UN

07580

60CM X 1/2”

UN

03354 60CMX1/2

PT20

02241 T1

PT100

ADAPTADOR PARA VÁLVULA PIA E

VÁLVULA PARA LAVATÓRIO METAL

VÁLVULA PARA TANQUE

VÁLVULA PARA LAVATÓRIO E PIA

LAVATÓRIO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04001 Nº2

PT50

08894

V2 1"

UN

02239

V1

PT20

02240 V8

PT20

REGULADOR VAZÃO STANDARD RRV

VÁLVULA RETENÇÃO COM FILTRO PARA

VÁLVULA RETENÇÃO UNIVERSAL

VÁLVULA RETENÇÃO VERTICAL

PVC

POÇO ABS

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

03371 1"

PT06

Cód. Ref.

Un.

07744 1"

UN

09608 13030023

UN

03370 3/4”

PT06

07745 3/4"

UN

07743 3/4”

UN

VÁLVULA SUCÇÃO

CAIXA COLETORA DE GORDURA GRANDE CAIXA DE GORDURA QUADRADA GRELHA PARA RALO E CAIXA

QUADRADA BRANCA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07742 1"

UN

Cód. Ref.

Un.

04477

250X172X50 N21

UN

03362

100X100 N50

PT12

07741 3/4”

UN

09925

UN

04478

250X230X75 N22

UN

03363

150X150 N52

PT12

PORTA GRELHA QUADRADA BRANCA

RALO QUADRADO SIFONADO

RALO REDONDO SIFONADO

CAIXA SIFONADA QUADRADA COM

3 ENTRADAS

Cód. Ref.

Un.

03366

100X100 N58

PT12

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

03367

150X150 N61

PT12

02243

100X40 N43

UN

03361

100X38X40 N37

UN

02242

100X100X50 N05

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

19

HIDRÁULICA

CAIXA SIFONADA QUADRADA COM 7

GRELHA QUADRADA COM CAIXILHO

GRELHA ROTATIVA QUADRADA COM

GRELHA ROTATIVA QUADRADA COM

ENTRADAS

INOX

DISPOSITIVO DE VEDAÇÃO BRANCA

DISPOSITIVO DE VEDAÇÃO CROMADA

Cód. Ref.

Un.

Cód. Ref.

Un.

08890 10X10

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

03360

150X150X50 N13

UN

08891 15X15

UN

05063 10X10

UN

06476 15X15

UN

RALO QUADRADO COM CAIXILHO INOX

BALCÃO COZINHA FLEX 1,20M

CUBA INOX SEM POLIMENTO AÇO 430

PIA INOX LISA AÇO 430

SEM VÁLVULA 3/5"

SEM VÁLVULA 3/5"

Cód. Ref.

Un.

Cód. Ref.

Un.

08892 10X10

UN

10071 BRANCO/PRETO

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

08893 15X15

UN

10072 BRANCO

UN

07059

Nº3 40X34CM

UN

05279

1,20MT 37X34CM

UN

PIA INOX 1,05M AÇO 430

PIA INOX 1,20M AÇO 430

PIA INOX 2,00M AÇO 430

TANQUE PLÁSTICO 15 LITROS

SEM VÁLVULA 3/5"

SEM VÁLVULA 3/5"

SEM VÁLVULA 3/5"

Cód. Ref.

Un.

04421

1,20MT 37X34CM

UN

04424

1,40MT 37X34CM

UN

Cód. Ref.

Un.

04425

1,50MT 37X34CM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

04419

1,05MT 37X34CM

UN

04426

1,60MT 37X34CM

UN

04428

2,00MT 37X34CM

UN

05035

TQ0*BR1 49X43X28CM

UN

TANQUE LOUÇA MÉDIO 31 LITROS

COLUNA PARA TANQUE

TANQUE INOX SOBREPOR SEM ESPELHO

BACIA CONVENCIONAL FIT

23 LITROS VS3

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06867

53,3X 48,5CM

UN

06868 1512030010200

UN

04595 51,5X44X26

UN

10064 BRANCO

UN

BACIA CONVENCIONAL PARATI

BACIA CONVENCIONAL THEMA PLUS

BACIA PARA CAIXA PARATI

CAIXA PARA ACOPLAR PARATI

ECOFLUSH 3/6L

Cód. Ref.

Un.

Cód. Ref.

Un.

06838 BRANCO

UN

05290 BRANCO

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

07622

CINZA CROMO

UN

09603 BRANCO

UN

20

CENTRAL DE RELACIONAMENTO • 27 3089.3888

PRODUTOS PRA

em.com.br

COLOCAR

www.fabricadeimag

SUA LOJA NO

topo DE VENDAS

www.mgmmoveis.com.br

Avenida dos Moveleiros, 1.580 - Polo Moveleiro

Linhares/ES · CEP 29909-120 · Tel: (27) 3372-0270

https://www.facebook.com/MGMGabinetes/

HIDRÁULICA

CAIXA PARA ACOPLAR PARATI

BACIA COM CAIXA FIT ECOFLUSH

BACIA COM CAIXA PARATI

CUBA DE APOIO THEMA 50X36CM

3/6 LITROS

ECOFLUSH 3/6L

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09602 BRANCO

UN

Cód. Ref.

Un.

06837 BRANCO

UN

10068 BRANCO

UN

10033

CINZA CROMO

UN

07588 BRANCO

UN

CUBA DE APOIO FIT

CUBA EMBUTIR OVAL 49X32CM

LAVATÓRIO PARA COLUNA FIT 47X42CM

COLUNA PARA LAVATÓRIO FIT

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

10065 BRANCO

UN

06842 BRANCO

UN

10067 BRANCO

UN

10066 BRANCO

UN

LAVATÓRIO PARA COLUNA PARATI

COLUNA PARA LAVATÓRIO PARATI

LAVATÓRIO PARA COLUNA PARATI

COLUNA PARA LAVATÓRIO PARATI

47X42CM

47X42CM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06839 BRANCO

UN

06840 BRANCO

UN

07624

CINZA CROMO

UN

07625

CINZA CROMO

UN

LAVATÓRIO SUSPENSO GUARAPARI

TAMPA PARA CAIXA ACOPLADA TP

LAVATÓRIO PLÁSTICO 36X26CM

MICTÓRIO CONVENCIONAL 01

46X34CM

BRANCO PARATI

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06841 BRANCO

UN

07600 BRANCO

UN

05969 BRANCO

UN

08286 BRANCO

UN

TORNEIRA COM FILTRO PAREDE C50

TORNEIRA COM FILTRO PAREDE C33

TORNEIRA COM FILTRO PAREDE

TORNEIRA COM FILTRO PAREDE PLUS

PRÁTICA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08864 ABS/METAL

UN

08863 ABS/METAL

UN

04222 ABS/BRANCA

UN

04221 ABS/BRANCA

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

23

HIDRÁULICA

TORNEIRA COM FILTRO PAREDE

TORNEIRA COZINHA MESA 1/4

TORNEIRA COZINHA MESA 1/4

TORNEIRA COZINHA MESA MVS

ACQUABELLA

DE VOLTA RIVA

DE VOLTA TRIO

PERTUTTI

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06928 BRANCA

UN

07766 00489606

UN

07763 00512206

UN

06527 00266306

UN

TORNEIRA COZINHA MESA MVS ABS/

TORNEIRA COZINHA MESA MVS ABS/

TORNEIRA COZINHA MESA 1/4 VOLTA

TORNEIRA COZINHA MESA 1/4 VOLTA

METAL C33

METAL C50

ABS/BRANCA C31

ABS/CROMADO C31

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08869 1168

UN

08870 1168

UN

08540 PR2422-2

UN

08529 PR2422

UN

TORNEIRA COZINHA MESA 1/4 VOLTA

TORNEIRA COZINHA MESA 1/4 VOLTA

TORNEIRA COZINHA MESA MVS ABS/

TORNEIRA COZINHA PAREDE MVS

ABS/BRANCA C50

ABS/CROMADO C50

BRANCA PLUS

METAL PERTUTTI

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08535 PR2402-2

UN

08522 PR2402

UN

02991 2756

UN

06529

1/2" 3/4"

UN

TORNEIRA COZINHA PAREDE MVS ABS/

TORNEIRA COZINHA PAREDE 1/4 VOLTA

TORNEIRA COZINHA PAREDE 1/4 VOLTA

TORNEIRA COZINHA PAREDE 1/4 VOLTA

METAL C50

METAL C50

ABS/BRANCA C31

ABS/CROMADO C31

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08868 1167

UN

08866 1167

UN

08539 PR2421-2

UN

08528 PR2421

UN

TORNEIRA COZINHA PAREDE 1/4 VOLTA

TORNEIRA COZINHA PAREDE MVS ABS/

TORNEIRA COZINHA PAREDE MVS ABS/

TORNEIRA COZINHA PAREDE MVS ABS/

ABS/CROMADO C50

METAL C33

BRANCA PLUS

METAL C33

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08521 PR2401

UN

08867 1167

UN

02990 2750

UN

08865 1150

UN

24

CENTRAL DE RELACIONAMENTO • 27 3089.3888

HIDRÁULICA

TORNEIRA COZINHA PAREDE 1/4 VOLTA

TORNEIRA COZINHA PAREDE 1/4 VOLTA

TORNEIRA COZINHA PAREDE

TORNEIRA COZINHA PAREDE JATO

ABS/CROMADO C31

ABS/CROMADO C50

CHUVEIRINHO 15CM BRANCA

SIMPLES 18CM BRANCA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08530 PR2423

UN

08523 PR2403

UN

05558 1159

PT12

00993 1113

PT12

TORNEIRA LAVATÓRIO BRANCA

TORNEIRA LAVATÓRIO PLUS BRANCA

TORNEIRA LAVATÓRIO METAL

TORNEIRA LAVATÓRIO PRESSMATIC

COMPACT

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

00994 1195

PT12

02992 1193

UN

05211 1193

UN

06539 PRESSÃO

UN

TORNEIRA LAVATÓRIO MVS

TORNEIRA LAVATÓRIO MVS

TORNEIRA LAVATÓRIO 1/4 VOLTA

TORNEIRA LAVATÓRIO 1/4 VOLTA

ABS/METAL C33

ABS/METAL C50

ALAVANCA ABS/BRANCA ALAVANCA

ALAVANCA ABS/CROMADA ALAVANCA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08874 1193

UN

08875 1193

UN

08537 PR2406-2

UN

08525 PR2406

UN

TORNEIRA LAVATÓRIO MVS

TORNEIRA LAVATÓRIO MVS

TORNEIRA LAVATÓRIO MVS

TORNEIRA LAVATÓRIO 1/4 DE VOLTA

ABS/METAL C33

ABS/METAL C50

ABS/METAL C50

TRIO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08872 1198

UN

08873 1198

UN

08871 1198

UN

07758 1198

UN

TORNEIRA LAVATÓRIO MVS PERTUTTI

TORNEIRA LAVATÓRIO 1/4 VOLTA ABS/

TORNEIRA LAVATÓRIO 1/4 VOLTA ABS/

TORNEIRA LAVATÓRIO 1/4 VOLTA ABS/

BRANCA C31

CROMADA C31

CROMADA C50

Cód. Ref.

Un.

Cód. Ref.

Un.

08541 PR2425-2

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

06528 1198

UN

08531 PR2425

UN

08524 PR2405

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

25

HIDRÁULICA

TORNEIRA PAREDE LONGA PERTUTTI

TORNEIRA TANQUE 10CM 1/2 BRANCA

TORNEIRA TANQUE 15CM 1/2 BRANCA

TORNEIRA TANQUE 10CM COM BICO

PARA MANGUEIRA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06531 1158

UN

00989 1126

PT12

00990 1158

PT12

06499 1120

PT12

TORNEIRA TANQUE 15CM COM BICO

TORNEIRA TANQUE 1/4 VOLTA ABS

TORNEIRA TANQUE 1/4 VOLTA ABS

TORNEIRA JARDIM PAREDE BICO PARA

PARA MANGUEIRA

CROMADO C31

CROMADO C50

MANGUEIRA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06500 1124

PT12

08533 PR2428

UN

08527 PR2408

UN

00988 1128

PT12

TORNEIRA JARDIM PAREDE PRETA

TORNEIRA JARDIM PAREDE DE ESFERA

TORNEIRA JARDIM PAREDE METAL 3/4

TORNEIRA JARDIM PAREDE METAL 3/4

BRANCA

MVS AMARELA

MVS CROMADA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05147

1/2" 3/4"

PT12

03358

1/2" 3/4"

PT06

08876 1130

UN

08877 1130

UN

TORNEIRA JARDIM PAREDE METAL COM

TORNEIRA MÁQUINA LAVAR DE ESFERA

TORNEIRA MÁQUINA LAVAR E TANQUE

TORNEIRA TANQUE MÁQUINA LAVAR

BICO PERTUTTI

CROMADA

COM BICO

ABS/METAL C33

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06533 1130

UN

Cód. Ref.

Un.

06876 190101-21

UN

08920 1992

UN

08878 7236

UN

TORNEIRA TANQUE MÁQUINA LAVAR

TORNEIRA TANQUE MÁQUINA LAVAR 1/4

TORNEIRA TANQUE MÁQUINA LAVAR 1/4

TORNEIRA TANQUE MÁQUINA LAVAR 1/4

COM BICO PERTUTTI

VOLTA ABS/BRANCA C31

VOLTA ABS/CROMADO C31

VOLTA ABS/BRANCA C50

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06530 00251706

UN

08589 PR2427-2

UN

08532 PR2427

UN

08538 PR2407-2

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

27

Torneiras Plásticas

Torneiras Plásticas

Tanques e Lavatórios

Linha de

Torneiras de Filtro

Produtos

Purificadores

Chuveiros

de Água

Armários para

Banheiro

Porta-shampoos

Fita Veda Rosca e

Adesivo Plástico

Registros de Esfera

Registros de Pressão

Suporte para

Garrafão

Caixas Sifonadas e Ralos

Acessórios e Complementos

Assento Thema

Assento Almofadado

Assento Envolvente

Assento Econômico

Torneiras de Serviço

Torneiras Premium Linha Branca

Linha

Premium

Torneiras

Chuveiro

Conjunto de Grelhas

Acessórios

Registros para

Máquina de Lavar

Linha

Derivadores e Esguichos Reguláveis

Jardinagem

Irrigadores

Engates, Conectores e Reparadores

Suporte para Mangueira

HIDRÁULICA

TORNEIRA TANQUE MÁQUINA LAVAR 1/4

VELA REFIL PARA FILTRO MART PLAST

VELA REFIL PARA PURIFICADOR

TORNEIRA PARA FILTRO BR 3/8”

VOLTA ABS/CROMADO C50

DE ÁGUA 1/2

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08526 PR2407

UN

08899 17783

UN

04449 2904

UN

00996 2702

PT12

TORNEIRA PARA FILTRO MR/PT 3/8”

TORNEIRA PARA FILTRO SUPER

TORNEIRA PARA FILTRO

TORNEIRA PARA FILTRO GELÁGUA BR

BRANCA/AZUL 3/8”

BRANCA/PRETA 5/8”

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05560 2700

PT12

05559 1115

PT12

02356 1104

PT12

05561 2772

PT12

TORNEIRA PARA FILTRO GELÁGUA

SUPORTE PARA GARRAFÃO BRANCO

ADAPTADOR PARA TORNEIRA FILTRO

BOMBA D'ÁGUA 1/2HP QB60

BRANCA/AZUL

(PERIFÉRICA)

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09628 127/220V-60HZ

UN

05562 2771

PT12

05568 3374-CX04

UN

08919 3372

PT12

09629 220V-60HZ

UN

BOMBA D'ÁGUA SUBMERSA "L"

BOMBA D'ÁGUA SUBMERSA "L"

BOMBA D'ÁGUA SUBMERSA "L"

BOMBA D'ÁGUA SUBMERSA

750 3/4” 127 V

850 3/4” 127

950 1" 127 V

PUMP 660 3/4” 127 V

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07749 B7512

UN

07751 B8512

UN

Cód. Ref.

Un.

07753 B9512

UN

07747 B6612

UN

BOMBA D'ÁGUA SUBMERSA

REGULADOR AUTOMÁTICO

CAIXA D'ÁGUA POLIETILEN

BRAÇO PARA CHUVEIRO BRANCO

PUMP 660 3/4” 220 V

DE NÍVEL 25 A

MONOCANO

Cód. Ref.

Un.

02849

2010004 310L

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

02850

2010005 500L

UN

Cód. Ref.

Un.

07746 B6622

UN

07754 AC1222

UN

02851

2010007 1000L

UN

09490 752002

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

29

HIDRÁULICA

BRAÇO PARA CHUVEIRO EXTRA POLIDO

CHUVEIRO 4" COM BRAÇO 36CM FRIO

CHUVEIRO 4" SEM BRAÇO FRIO BRANCO

CHUVEIRO COM BRAÇO COM REGISTRO

BRANCO

Cód. Ref.

Un.

07555

30CM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07556 40CM

UN

05149 0750

UN

05162 0751

UN

05639 5"

PT06

CHUVEIRO COM BRAÇO COM REGISTRO

CHUVEIRO COM BRAÇO SEM REGISTRO

CHUVEIRO COM BRAÇO SEM REGISTRO

DUCHA ADVANCED MULTI

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

01003 7”

UN

01002 7”

UN

05638 5"

PT06

08709

127/5500

UN

DUCHA ADVANCED TURBO MULTI

DUCHA MAXI DUCHA

DUCHA TOP JET MULTI 127/5500

RESISTÊNCIA

Cód. Ref.

Un.

06929

127/4600 W

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

09370

127/5500 W

UN

Cód. Ref.

Un.

06931

127V 4600W

UN

08722 127/5500

UN

06930

220/5500 W

UN

08723 127/5500

UN

09293

127V 5000W

UN

RESISTÊNCIA ADVANCED TRB

ANEL DE VEDAÇÃO PARA ESGOTO

ANEL DE VEDAÇÃO PARA ESGOTO

ADAPTADOR SOLDÁVEL CURTO COM

BOLSA E ROSCA

Cód. Ref.

Un.

Cód. Ref.

Un.

02293 DN100

PT25

02185 20MMX1/2

PT50

02290 DN40

PT50

02186 25MMX3/4

PT50

Cód. Ref.

Un.

02291 DN50

PT50

03373 32MMX1

PT25

08724

220/5500 W

UN

03352 DN150

PT15

Cód. Ref.

Un.

03223 40MMX1.1/4

PT10

08725 3055-O

UN

02292 DN75

PT25

08391 DN200

PT05

02187 50MMX1.1/2

PT25

ADAPTADOR SOLDÁVEL PARA CAIXA

BUCHA REDUÇÃO LONGA ESGOTO

BUCHA REDUÇÃO ROSCÁVEL

BUCHA REDUÇÃO SOLDÁVEL CURTA

D´ÁGUA COM BORRACHA

Cód. Ref.

Un.

02188

20X1/2

PT12

Cód. Ref.

Un.

02189 25X3/4

PT12

02192 25X20MM

PT50

03225 32X1

PT06

Cód. Ref.

Un.

03228 32X25MM

PT50

02191 50X1.1/2

PT06

Cód. Ref.

Un.

03885 1X3/4

PT24

03229 40X32MM

PT10

03226 40X1.14

PT06

02222 DN50X40

PT25

03221 3/4X1/2

PT50

03230 50X40MM

PT10

CENTRAL DE RELACIONAMENTO • 27 3089.3888

31

HIDRÁULICA

BUCHA REDUÇÃO SOLDÁVEL LONGA

CAIXA DE CENTRO PARA LAJE

CAP ESGOTO PRIMÁRIO E SECUNDÁRIO

CAP ESGOTO PRIMÁRIO E SECUNDÁRIO

Cód. Ref.

Un.

03231 32X20MM

PT15

03232 40X20MM

PT15

Cód. Ref.

Un.

03233 40X25MM

PT10

07771 250CM

PT10

03234 40X25MM

PT10

07772 300CM

PT10

02193 50X25MM

PT25

02224 40MM

PT

Cód. Ref.

Un.

03235 50X32MM

PT25

02227 50MM

PT

02245 100MM

PT

Cód. Ref.

Un.

03896 60X32MM

PT10

02244 75MM

PT

02246 150MM

UN

07595 200MM

UN

CAP ROSCÁVEL

CAP SOLDÁVEL

COLAR DE TOMADAS

CURVA 90° CURTA ESGOTO

PRIMÁRIO E SECUNDÁRIO

Cód. Ref.

Un.

02194

20MM

PT50

Cód. Ref.

Un.

Cód. Ref.

Un.

02195

25MM

PT50

02250 100MM

PT10

04885 1"

PT15

03236

30MM

PT25

Cód. Ref.

Un.

02247 40MM

PT25

04883 1/2”

PT30

03238

40MM

PT10

07349

50MM X 1/2

PT10

02248 50MM

PT20

04884 3/4”

PT30

02196

50MM

PT10

07350

60MM X 1/2

PT10

02249 75MM

PT10

CURVA 90° LONGA ESGOTO

CURVA 90° LONGA ESGOTO

CURVA 90° SOLDÁVEL

CURVA 90° CURTA COLUNA SÉRIE

REFORÇADA (AZUL)

Cód. Ref.

Un.

02197 20MM

PT20

Cód. Ref.

Un.

02198 25MM

PT10

06559 40MM

PT10

03239 32MM

PT10

06560 50MM

PT12

Cód. Ref.

Un.

03240 40MM

PT10

Cód. Ref.

Un.

06561 75MM

PT10

06562 100MM

PT08

02200 50MM

PT10

09388 100MM

PT10

CURVA DE TRANSPOSIÇÃO SOLDÁVEL

JOELHO 45° ESGOTO

JOELHO 45° ESGOTO

JOELHO 45º SOLDÁVEL

PRIMÁRIO E SECUNDÁRIO

PRIMÁRIO E SECUNDÁRIO

Cód. Ref.

Un.

Cód. Ref.

Un.

02254 100MM

PT10

02201 20MM

PT50

02255 150MM

UN

02202 25MM

PT50

Cód. Ref.

Un.

02252 50MM

PT25

03241 32MM

PT10

07768 20MM

PT20

02251 40MM

PT25

03242 40MM

PT10

07769 25MM

PT20

Cód. Ref.

Un.

02253 75MM

PT10

07596 200MM

UN

02203 50MM

PT10

JOELHO 90º BRANCO COM ANEL

JOELHO 90º ESGOTO PRIMÁRIO SN

JOELHO 90º ESGOTO PRIMÁRIO E

JOELHO 90º ESGOTO PRIMÁRIO E

SECUNDARIO

SECUNDARIO

Cód. Ref.

Un.

02260 150MM

UN

02256 40MM

PT50

Cód. Ref.

Un.

Cód. Ref.

Un.

02257 50MM

PT25

Cód. Ref.

Un.

07770

DN 40X40

PT25

07360 100MM

PT20

08121 75MM

PT20

07599 200MM

UN

32

CENTRAL DE RELACIONAMENTO • 27 3089.3888

OPORTUNIDADE ÚNICA,

PREÇOS ESPECIAIS.

APROVEITE!

MAXI DUCHA

TOP JET MULTITEMPERATURAS

dispositivo para regulagem da inclinação

4 T

ia

e

aq

m

ue

p

ci

e

me

r

nto e economia

aturas - conforto e econom

D.R.I.

compatível com aquecimento solar

compatível com

m

aquecimento solar

aior área de banho

3 TEMPERATURAS

COMANDO MULTITEMPERATURAS

Aquecimento e economia

4 temperaturas - Conforto e economia

GRANDE ESPALHADOR

HASTE DE COMANDO COM 30 CM

Troca de temperatura ao alcance das mãos (uso opcional)

NÃO ACOMPANHA BRAÇO

GRANDE ESPALHADOR

Maior área de banho

RESISTÊNCIA DE TROCA RÁPIDA

VERSÕES:

Resistência disponível

3055-P Resistência 127V5500W

VERSÃO:

055 Resistência 127V4600W

127V - 4600W

MD/J3/T43

MD/J3/T43

Resistência disponível

220V - 5500W

127V - 5500W

ADVANCED TURBO MULTITEMPERATURAS

ADVANCED MULTITEMPERATURAS

4

4

T

ia

ia

e

T

m

em

pe

p

ra

e

t

r

u

a

ra

t

s

u

- conforto e econom

ras - conforto e econom

aum

c

co

e

o

n

m

m

ta

p

p

o

a

a

v

t

o

t

í

l

í

v

u

v

m

e

e e a pressão da água

el co

l

m

c

aquecimento solar

om aquecimento solar

COMANDO MULTITEMPERATURAS

COMANDO MULTITEMPERATURAS

4 temperaturas - Conforto e economia

4 temperaturas - Conforto e economia

GRANDE ESPALHADOR

GRANDE ESPALHADOR

Maior área de banho

Maior área de banho

RESISTÊNCIA DE TROCA RÁPIDA

RESISTÊNCIA DE TROCA RÁPIDA

3055-P Resistência 127V5500W

PRESSURIZADOR EMBUTIDO

VERSÃO:

3055-P Resistência 127V5500W

VERSÃO:

MD/J3/T43

Resistência disponível

Aumenta o volume e a pressão da água

127V - 5500W

MD/J3/T43

Resistência disponível

127V - 5500W

PURIFICADOR DE ÁGUA VITALE

PURIFICADOR ACQUA BELLA

EFICIENTE PROCESSO COM 3 ETAPAS DE PURIFICAÇÃO

EFICIENTE PROCESSO COM 3 ETAPAS DE PURIFICAÇÃO

ELIMINA partículas sólidas como bar o, limo e fer ugem.

ELIMINA partículas sólidas como bar o, limo e fer ugem.

Excesso de cloro, gostos e odores desagradáveis.

Excesso de cloro, gostos e odores desagradáveis.

BASE PARA PIA

Você escolhe como instalar o produto, na parede ou sobre a pia.

Base acompanha o produto

CAPACIDADE DE PURIFICAR

CAPACIDADE DE PURIFICAR

1.000 litros

=

1.000 litros

=

1

50

1

50

Galões de 20 litros

Galões de 20 litros

HIDRÁULICA

JOELHO 90 ROSCAVÉL

JOELHO 90º SOLDÁVEL BUCHA LATÃO

JOELHO 90º SOLDÁVEL ROSCA (LR)

JOELHO 90º SOLDÁVEL

Cód. Ref.

Un.

02204 20MM

PT50

02205 25MM

PT50

Cód. Ref.

Un.

Cód. Ref.

Un.

03319 32MM

PT25

Cód. Ref.

Un.

02297 20X1/2

PT20

02229 20X1/2

PT30

03320 40MM

PT10

02171 1/2

PT20

02299 25X1/2

PT20

02231 25X1/2

PT30

02206 50MM

PT25

02173 3/4

PT20

02298 25X3/4

PT20

02230 25X3/4

PT30

03321 60MM

PT10

JOELHO 90º ESGOTO VIS.

VÁLVULA RETENÇÃO ESGOTO

JUNÇÃO 45º ESGOTO PRIMÁRIO E

JUNÇÃO 45º REDUÇÃO SIMP.

SECUNDÁRIO

ESGOTO PRIMÁRIO

Cód. Ref.

Un.

02262 40X40

PT25

02263 50X50

PT10

02264 75X75

PT10

Cód. Ref.

Un.

Cód. Ref.

Un.

02265 100X100

PT10

Cód. Ref.

Un.

02261 100X50MM

PT10

06869 DN100MM

PT10

03903 150X150

UN

02266 75X50

PT10

JUNÇÃO 45º REDUÇÃO SIMP.

JUNCAO DUPLA ESGOTO PRIMÁRIO

LUVA CORRER PARA TUBO ESGOTO

LUVA CORRER PARA TUBO SOLDÁVEL

ESGOTO PRIMÁRIO

Cód. Ref.

Un.

Cód. Ref.

Un.

02277 100MM

PT10

02211 20MM

PT12

02276 75MM

PT10

02213 25MM

PT12

Cód. Ref.

Un.

02275 50MM

PT10

03325 32MM

PT06

09392 150X100

UN

Cód. Ref.

Un.

02274 40MM

PT10

03326 40MM

PT06

02267 100X50

PT10

09391 100X100

PT05

03904 150MM

UN

02214 50MM

PT08

LUVA ESGOTO PRIMÁRIO E SECUNDÁRIO

LUVA ESGOTO PRIMÁRIO E SECUNDÁRIO

LUVA REDUÇÃO ROSCÁVEL

LUVA REDUÇÃO ROSCÁVEL

Cód. Ref.

Un.

02269 40MM

PT25

02270 50MM

PT25

02271 75MM

PT10

Cód. Ref.

Un.

02272 100MM

PT10

Cód. Ref.

Un.

Cód. Ref.

Un.

02215 25X20MM

PT50

02273 150MM

UN

07597 200MM

UN

03887 34X12MM

PT25

03328 32X25MM

PT20

LUVA ROSCÁVEL

LUVA SIMPLES ESGOTO SÉRIE

LUVA SOLDÁVEL

LUVA SOLDÁVEL BUCHA LATÃO

REFORÇADA (AZUL)

Cód. Ref.

Un.

02208 20MM

PT50

02209 25MM

PT50

03322 32MM

PT25

Cód. Ref.

Un.

Cód. Ref.

Un.

03323 40MM

PT10

02300 20X1/2

PT20

02174 1/2"

PT50

Cód. Ref.

Un.

02210 50MM

PT10

02302 25X1/2

PT20

02176 3/4”

PT50

09389 100MM

PT10

03324 60MM

PT10

02301 25X3/4

PT20

34

CENTRAL DE RELACIONAMENTO • 27 3089.3888

HIDRÁULICA

LUVA SOLDÁVEL ROSCÁVEL (LR)

NÍPEL ROSCÁVEL

PLUG ROSCÁVEL

PROLONGAMENTO CAIXA SIFONADA

Cód. Ref.

Un.

02232 20X1/2

PT50

02234 25X1/2

PT50

02233 25X3/4

PT50

Cód. Ref.

Un.

Cód. Ref.

Un.

03339 32X1

PT20

02177 1/2"

PT50

02179 1/2"

PT50

Cód. Ref.

Un.

03340 50X1.1/2

PT10

02178 3/4”

PT50

02180 3/4”

PT50

03913 150X150MM

UN

REDUÇÃO EXC. ESGOTO PRIMÁRIO

REGISTRO DE ESFERA ROSCA INTERNA

REGISTRO DE PRESSÃO SOLDÁVEL

REGISTRO ESFERA ROSCA EXTERNA

Cód. Ref.

Un.

02278

75X50

PT10

02279 100X50

PT10

02280 100X75

PT10

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

02281 100X75

UN

08921 1/2"

PT

02843 20MM

PT12

02351 1/2"

PT12

07598 200X150

UN

08922 3/4”

PT

02844 25MM

PT12

05564 3/4”

PT12

REGISTRO ESFERA ROSCÁVEL EXTERNA

REGISTRO ESFERA SOLDÁVEL

REGISTRO ESFERA SOLDÁVEL COM

TÊ DE INSPEÇÃO ESGOTO

UNIÃO

Cód. Ref.

Un.

06017 20MM

PT06

Cód. Ref.

Un.

06018 25MM

PT06

02212 20MM

PT10

Cód. Ref.

Un.

06019 32MM

PT04

02216 25MM

PT10

03348 1/2"

PT20

06049 40MM

PT03

03341 32MM

PT05

Cód. Ref.

Un.

03349 3/4”

PT20

06020 50MM

PT03

02219 50MM

PT02

09390

100X75

PT12

TÊ ESGOTO SECUNDÁRIO

TÊ ESGOTO PRIMÁRIO

TÊ REDUÇÃO PARA ESGOTO PRIMÁRIO

TÊ REDUÇÃO SOLDÁVEL

Cód. Ref.

Un.

02285 100X100

PT10

Cód. Ref.

Un.

Cód. Ref.

Un.

02283 50X50

PT10

02288 100X50

PT10

02221 25X20MM

PT20

02284 75X75

PT10

02287

75X50

PT10

03332 32X25MM

PT20

Cód. Ref.

Un.

02286 150X150

UN

02289 100X75

PT10

02223 50X25MM

PT10

02282 40MM

PT25

08314 200X200

UN

03351 150X100

UN

03335 50X32MM

PT06

TÊ ROSCÁVEL

TÊ SOLDÁVEL

TÊ SOLDÁVEL BUCHA LATÃO

TÊ SOLDÁVEL ROSCÁVEL (LR)

Cód. Ref.

Un.

02217 20MM

PT50

02218 25MM

PT50

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

03329 32MM

PT25

02303

20X1/2

PT20

02235

20X1/2

PT20

02181 1/2"

PT20

03330 40MM

PT10

02305 25X1/2

PT20

02237 25X1/2

PT20

02182 3/4”

PT20

02220 50MM

PT10

02304 25X3/4

PT20

02236 25X3/4

PT20

CENTRAL DE RELACIONAMENTO • 27 3089.3888

35

HIDRÁULICA

UNIÃO ROSCÁVEL

UNIÃO SOLDÁVEL

TUBO PARA CAIXA DESCARGA LONGO

TUBO DESCARGA CURTO COM JOELHO

COM CURVA

AZUL

Cód. Ref.

Un.

02225 20MM

PT20

02226 25MM

PT20

Cód. Ref.

Un.

03337 32MM

PT10

03892 1.1/2"

PT10

03338 40MM

PT10

02183 1/2”

PT20

02228 50MM

PT10

Cód. Ref.

Un.

Cód. Ref.

Un.

02184 3/4”

PT20

03901 60MM

PT

02296

PT10

03854

PT20

TUBO PVC ESGOTO PRIMÁRIO E

TUBO PVC SOLDÁVEL

SECUNDÁRIO

Cód. Ref.

Un.

Cód. Ref.

Un.

05960 40MM

UN

05951 20MM

6MT

05961 50MM

UN

05952 25MM

6MT

05962 75MM

UN

05953 32MM

6MT

05963 100MM

UN

05954 40MM

6MT

05964 150MM

UN

05955 50MM

6MT

05965 200MM

UN

05957 60MM

6MT

A entrega mais rápida do mercado.

36

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ADESIVOS E FITAS

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

DUREPOXI

SUPER BONDER

ADESIVO DE CONTATO PULVI VINIL

FIXADOR EPOXI 15 MIN POLYHOBBY

Cód. Ref.

Un.

Cód. Ref.

Un.

01556

100 GRAMAS

CX12

01577

3 GRAMAS

CX24

Cód. Ref.

Un.

Cód. Ref.

Un.

01555

50 GRAMAS

CX12

08117

2 GRAMAS

CX24

06753

17 GRAMAS

UN

08979

24 GRAMAS

UN

ADESIVO EPOXI BI POLYEPOX

ADESIVO FIXA CUBA

ADESIVO FIXA CUBA

ADESIVO FIXA ESPELHO MULTIFIX

Cód. Ref.

Un.

05117

100 GRAMAS

PT12

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05118

50 GRMAS

PT12

09020

280 GRAMAS

UN

09927

380 GRAMAS

UN

09076

280 GRAMAS

UN

ADESIVO FIXA ESPELHO

ADESIVO FIXA PREG0 FÁCIL BASE

ADESIVO FIXA PREGO FÁCIL BASE

ADESIVO FIXA SEM PREGO

D’ÁGUA

DÁGUA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09021

85 GRAMAS

UN

09934

389 GRAMAS

UN

09931

140 GRAMAS

UN

09930

420 GRAMS

UN

08623

400 GRAMAS

UN

ADESIVO FIXA/TRAVA PARAFUSOS

ADESIVO FIXA/TRAVA PARAFUSOS AZUL

ADESIVO MULTIFIX "RODÁPE E SANCA"

ADESIVO PARA PVC COM PINCEL

VERMELHO

BRANCO

APLICADOR

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09933

10 GRAMAS

UN

09932

10 GRAMAS

UN

08622

400 GRAMAS

UN

05872

175 GRAMAS

UN

ADESIVOS E COLAS • FITAS • PROTETOR ANTI-IMPACTO • SELANTES E SILICONES • MASSAS ADESIVAS • QUÍMICOS

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

37

ADESIVOS E FITAS

ADESIVO PARA PVC COM PINCEL

ADESIVO PARA PVC COM PINCEL

ADESIVO PARA PVC

ADESIVO PARA PVC

APLICADOR

APLICADOR

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09372

175 GRAMAS

UN

08049

175 GRAMAS

UN

05870

17 GRAMAS

UN

09374

17 GRAMAS

UN

ADESIVO PARA PVC

ADESIVO PARA PVC

ADESIVO PARA PVC

ADESIVO PARA PVC

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

00828

17 GRAMAS

UN

05871

75 GRAMAS

UN

09373

75 GRAMAS

UN

00829

75 GRAMAS

UN

ADESIVO PARA PVC

ADESIVO PARA PVC

ADESIVO PLÁSTICO

CATALISADOR INCOLOR PARA MASSA

PLÁSTICA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09371

850 GRAMAS

UN

09074

850 GRAMAS

UN

09576

75 GRAMAS

UN

07348

12 GRAMAS

UN

COLA 793 INSTANTÂNEO BICO

COLA 793 INSTANTÂNEO BICO

COLA AZULEJO E PASTILHA MASSAPLIC

COLA BRANCA

ANTIENTUPIMENTO

ANTIENTUPIMENTO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08621

1,5 KG

UN

00843

1 KG

UN

09982

100 GRAMAS

UN

09273

20 GRAMAS

UN

08620

700 GRAMAS

UN

00842

500 GRAMAS

UN

COLA BRANCA EXTRA CASCOREZ

COLA BRANCA EXTRA CASCOREZ

COLA BRANCA UNIVERSAL

COLA BRANCA EXTRA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05078

250 GRAMAS

UN

Cód. Ref.

Un.

00840

500 GRAMAS

UN

01547

1 KG

UN

01546

500 GRAMAS

UN

05633

500 GRAMAS

UN

00841

1 KG

UN

38

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ADESIVOS E FITAS

COLA BRANCA EXTRA

COLA DE CONTATO

COLA DE CONTATO CASCOLA S/TOLUOL

COLA DE CONTATO CASCOLA S/ TOLUOL

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

01548

195 GRAMAS

UN

05635

30 GRAMAS

UN

09015

5 KG

UN

08984

2,8 KG

UN

02071

2,8 KG

UN

01549

400 GRAMAS

UN

COLA DE CONTATO CASCOLA S/ TOLUOL

COLA DE CONTATO S/ TOLUOL

COLA DE CONTATO S/ TOLUOL

COLA DE CONTATO S/ TOLUOL

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

01550

730 GRAMAS

UN

09018

195 GRAMAS

UN

09017

30 GRAMAS

UN

09019

730 GRAMAS

UN

COLA INSTANTÂNEA SUPER COLA

COLA MADEIRA

COLABOND INSTANTÂNEO

EPOXI SUPER LIQ 10 MIN ALUM (8G+8G)

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

00847

100 GRAMAS

UN

09016

3 GRAMAS

CX24

Cód. Ref.

Un.

09944

2 GRAMAS

UN

00848

250 GRAMAS

UN

09441

3 GRAMAS

CX96

09946

2X8G BISNAGA

UN

EPOXI SUPER LIQ 10 MIN (3G+3G)

ESPONJA MÁGICA MR. STRONG

ESPUMA EXPANSIVA BRICOLAGEM

ESPUMA EXPANSIVA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09945

6G SERINGA

UN

09075

UN

06989

430ML / 280GR

UN

06988 230/140GR

UN

ESPUMA EXPANSIVA CONSTRUÇÃO

FITA ANTIDERRAPANTE PRETA

FITA ANTIDERRAPANTE PRETA

FITA ANTIDERRAPANTE TRANSPARENTE

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

00838 500ML/360GR

UN

07175

50MMX5M

UN

09965

50MMX5M

UN

09966

50MMX5M

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

39

F030_REV00_88_v4.pdf 1 31/03/16 17:37

W W W . T E K B O N D . C O M . B R

Adesivos Instantâneos

Bico tipo A

Colas à base de Cianoacrilato, um dos adesivos mais

versáteis e resistentes que existem. Ideal para a colagem de borracha, metais, madeira, compensados, papel, papelão,

concreto, cortiça, couro, alguns plásticos e uma infinidade de ICO TIPO A

outros materiais.

B

793

E P

MÉDIA VISCOSIDADE:

OT

Mais versátil da linha. Adere a

quase todos os tipos de superfície.

Tampa

com pino

N Ã O EN

de metal

EMBALAGENS DE 20G / 100G

CX. 10 UNIDADES

C

M

Y

TRAVAS ANAERÓBICAS - 120

Bumpers e Feltros Adesivos

CM

Travamento de parafusos, porcas e prisioneiros

MY

de grande porte que necessitam de montagem

Linha de bumpers e feltros adesivos

permanente. Muito utilizado em maquinários

CY

anti-impacto que absorvem o impacto de

agrícolas, usinas, montadora de autos,

batidas ou quedas e previnem problemas com

CMY

mecânica etc.

riscos, protegendo objetos, pisos, paredes,

K

BLISTER 10G - CX. 12 UNIDADES

móveis e diferentes superfícies com eficiência,

de forma prática e rápida.

TRAVAS ANAERÓBICAS - 115

ADESIVO ANTI-IMPACTO

Travamento de parafusos, porcas, borboletas

e prisioneiros que necessitam de média

resistência à desmontagem. Muito utilizado

nas indústrias, no setor de manutenção.

BLISTER 10G - CX. 12 UNIDADES

Gota P

Gota M

Gota G

Redondo M

Ø 8mm

Ø 10mm

Ø 15,7mm

Ø 19,1 mm

EPÓXI LÍQUIDO

SUPER COLA INSTANTÂNEA

25 Unid.

15 Unid.

10 Unid.

8 Unid.

Adesivo bicomponente,

A favorita do consumidor.

FELTRO PROTETOR ADESIVO

recomendado para a

Cola para uso doméstico e

colagem dos mais diversos

colagens em geral com alta

tipos de substratos,

velocidade de cura, pois

especialmente concreto e

adere a uma ampla variedade

metais. Ideal para reparos

de materiais como madeira,

que necessitem de grande

borracha, metal, plástico,

resistência e também

Y 24 UNIDADES

cerâmica, porcelana etc.

Redondo

Redondo

Quadrado

Quadrado

trabalhos artísticos.

Ø 20mm -

Ø 30mm -

22 X 22mm -

30 X 30mm -

24 Unid.

12 Unid.

16 Unid.

12 Unid.

Branco / Preto

Branco / Preto

Branco / Preto

Branco / Preto

SERINGA - 6G - CX. COM 12 UNID.

2g BLÍSTER

CX. DISPLA

TUBO - 16G - CX. COM 12 UNID.

TODOS POSSUEM CAIXA COM 12 BLÍSTERES PARA VENDA

ADESIVOS E FITAS

FITA CREPE MASK

FITA CREPE NORFLEX AUTOMOTIVA

FITA CREPE 18 X 50 AUTOMOTIVA

FITA CREPE 24 X 50 USO GERAL

SANFONADA

Cód. Ref.

Un.

04964 18X50

PT06

03095

24X50

PT05

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04966 48X50

PT02

09257 18X50

PT

01521 18X50

UN

01523

24X50

UN

FITA CREPE 48 X 50 AUTOMOTIVA

FITA CREPE 18 X 50 USO GERAL

FITA CREPE 48 X 50 USO GERAL

FITA CREPE PACOTE COM 5 UNIDADES

SANFONADA PT 06

PREMIUM AZUL

Cód. Ref.

Un.

03593 18X50

PT

Cód. Ref.

Un.

02982

24X50

PT

Cód. Ref.

Un.

Cód. Ref.

Un.

01524 48X50

UN

02978 48X50

PT

07584 48X50

UN

09935 18X50

PT05

FITA CREPE PACOTE COM 5 UNIDADES

FITA CREPE

FITA DE DEMARCAÇÃO AMARELA

FITA DE DEMARCAÇÃO BRANCA

Cód. Ref.

Un.

09947 18X50

UN

Cód. Ref.

Un.

09948

24X50

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

09936

24X50

PT05

09949 48X50

UN

09962 48MMX15M

UN

09963 48MMX15M

UN

FITA DE DEMARCAÇÃO VERDE

FITA DE DEMARCAÇÃO VERMELHA

FITA DUPLA FACE

FITA DUPLA FACE ACRÍLICA INTERNA

BLISTER

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

01527

12MM X 20M

UN

Cód. Ref.

Un.

09964 48MMX15M

UN

09961 48MMX15M

UN

01526

12MM X 3M

UN

09950 12MMX2M

UN

FITA DUPLA FACE ACRÍLICA INTERNA

FITA DUPLA FACE ACRÍLICA EXTERNA

FITA DUPLA FACE ESPUMA

FITA DUPLA FACE ESPUMA BLISTER

BLISTER

BLISTER

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09953 12MMX2M

UN

09956

12MMX1,5M

UN

09951

19MMX2M

UN

09954

19MMX2M

UN

Cód. Ref.

Un.

09958 19MMX1,5M

UN

09952 25MMX2M

UN

09955 25MMX2M

UN

09957 12MMX10M

UN

09959 24MMX1,5M

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

41

ADESIVOS E FITAS

FITA DUPLA-FACE FIXA PRO ESPUMA

FITA DUPLA-FACE FIXA PRO MASSA

FITA DUPLA-FIXA FORTE SCOTCH

FITA ISOLANTE IMPERIAL SLIM

ACRÍLICA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05141 18MMX20M

UN

04970 12X2MM

UN

05114 12X2MM

UN

05597

12MM X 1,5MT

UN

05139 18MMX05M

UN

06536 19X2MM

UN

05113 19X2MM

UN

05602

12MM X 2MT

UN

05140 18MMX10M

UN

FITA ISOLANTE 33 + SCOTCH

FITA ISOLANTE

FITA PARA EMBALAGEM MARROM

FITA PARA EMBALAGEM TRANSPARENTE

Cód. Ref.

Un.

07140 19MMX05M

PT10

Cód. Ref.

Un.

07141 19MMX10M

PT10

Cód. Ref.

Un.

Cód. Ref.

Un.

05138 19MMX20MT

UN

07142

19MMX20M

PT10

04968 48X45

PT04

04967 48X45

PT04

FITA ROLO ADESIVO 21 FLS

FITA SILVER PRATA

FITA SILVER TAPE PRATA

FITA VEDA-ROSCA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09938

76MM REF M

UN

Cód. Ref.

Un.

09659 12MMX10M

UN

09661 18MMX50M

UN

09937

100MM REF M

UN

09960 48MMX5M

UN

04973

48X5M

UN

09660

18MMX25M

UN

FITA VEDA-ROSCA

FITA VEDA-ROSCA

FITA VEDA-ROSCA

FITA ZEBRADA PRETA/AMARELA

Cód. Ref.

Un.

09524

12MMX 05 M

UN

09525

12MM X 10 M

UN

Cód. Ref.

Un.

09527

18MM X 05 M

UN

Cód. Ref.

Un.

06012 12MMX10M

UN

09528

18MM X 10 M

UN

07138 12MMX10M

PT10

06013

18MMX10M

UN

09529

18MM X 25 M

UN

Cód. Ref.

Un.

07139

18MMX25M

PT10

06014

18MMX25M

UN

09530

18MM X 50 M

UN

07735 65MMX200M

UN

PROTETOR BUMPER ANTI-IMPACTO

PROTETOR BUMPER ANTI-IMPACTO

PROTETOR FELTRO QUADRADO PRETO

PROTETOR FELTRO REDONDO BRANCO

GOTA

REDONDO

Cód. Ref.

Un.

09975

G 15,7MM

CT10

Cód. Ref.

Un.

Cód. Ref.

Un.

09974

M 10MM

CT15

Cód. Ref.

Un.

09980 22MM

CT16

09978 22MM

CT24

09973

P 8MM

CT25

09972

M 19,1MM

CT08

09981 30MM

CT12

09979 30MM

CT12

42

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ADESIVOS E FITAS

PROTETOR FELTRO REDONDO PRETO

PU FLEXÍVEL CINZA - BISNAGA 400GR

PU FIX - BRANCO - CARTUCHO

PU FIX - CINZA - CARTUCHO

387G/280ML

387G/280ML

Cód. Ref.

Un.

09976 22MM

CT24

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09977 30MM

CT12

02923 497354

UN

09420 21071038700

UN

09421 21081038700

UN

PU FIX CINZA SACHET 552G/400ML

PU FLEX CONSTRUÇÃO 400G CINZA

SILICONE ACÉTICO ALTA TEMPERATURA

SILICONE ACÉTICO ALTA TEMPERATURA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09926 21081055200

UN

09142 040013

UN

09941

PRETO 50GR

UN

09942

CINZA 50GR

UN

SILICONE ACÉTICO ALTA TEMPERATURA

SILICONE ALTA TEMPERATURA

SILICONE AQUÁRIOS TRANSPARENTE

SILICONE ACÉTICO USO GERAL

VERMELHO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09943

VERMELHO 50GR

UN

08986

VERMELHO 50GR

UN

08987

TRANSPARENTE 50GR

UN

09284

BRANCO 280GR

UN

SILICONE ACÉTICO USO GERAL

SILICONE ACÉTICO USO GERAL

SILICONE ACÉTICO USO GERAL

SILICONE ACÉTICO USO GERAL

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09077

BRANCO 280GR

UN

06032

TRANSPARENTE 280GR

UN

09272

TRANSPARENTE 280GR

UN

01409

TRANSPARENTE 280GR

UN

SILICONE ACÉTICO USO GERAL BLISTER

SILICONE ACÉTICO USO GERAL BLISTER

SILICONE ACÉTICO USO GERAL COLMEIA SILICONE ACÉTICO USO GERAL BLISTER

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09940

BRANCO 50GR

UN

09311

TRANSPARENTE 50GR

UN

09274

TRANSPARENTE 50GR

CX24

08619

TRANSPARENTE 50GR

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

43

ADESIVOS E FITAS

SILICONE NEUTRO CONCRETO/PEDRA/

SILICONE NEUTRO USO GERAL

SILICONE SPRAY

SILICONE MULTIUSO SPRAYON

PLÁSTICO

Cód. Ref.

Un.

08626

TRANSPARENTE 280GR

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08625

BRANCO 280GR

UN

09419

TRANSPARENTE 280GR

UN

02949 300ML/170G

UN

00622 300ML/170G

UN

VEDA-CALHA ALUMÍNIO

VEDA-JUNTA

VEDA-TRINCA BRANCO

SELA-TRINCA SILICONE SELADOR

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

02981

270GR 300ML

UN

05596 73GR

UN

06993

300ML / 450GR

UN

09939 420/280ML

UN

MASSA ADESIVA PLÁSTICA BRANCA 1KG

MASSA ADESIVA PLÁSTICA BRANCA

MASSA ADESIVA PLÁSTICA CINZA 1KG

MASSA ADESIVA PLÁSTICA CINZA 400G

400G

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07331

UN

07330

UN

07333

UN

07332

UN

MASSA LEVE 340G

MASSA LEVE 90G

MASSA LIGHT 500G

MASSA PARA CALAFETAR 350G

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09310 AT279/2

UN

09309 AT279/1

UN

07342

UN

00837 UA002

UN

Mais de 5 mil produtos e muito mais variedade para sua loja.

www.otimaatacado.com.br

44

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ADESIVOS E FITAS

Na ÓTIMA você tem

facilidade de pagamento.

Sempre novidades,

o melhor mix

e ótimos preços

Tudo que cola... é Adelbras!

45

CENTRAL DE RELACIONAMENTO • 27 3089.3888

CENTRAL

AUTOMOTIVOS E QUÍMICOS

DE RELACIONAMENTO

27 3089.3888

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

BATIDA DE PEDRA PRETO 900ML

PANO POLIMENTO MICROFIBRA PARA

CONVERTEDOR DE FERRUGEM 100ML

CONVERTEDOR DE FERRUGEM 100ML

POLIMENTO 40X40

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

00826

UN

04497 226262

UN

01402 4MA031

QT

09872 8MP056

UN

00827

UN

04498 29440

UN

CONVERTEDOR DE FERRUGEM 500ML

DESENGRIPANTE MUNDIAL MP1 LUB

DESENGRIPANTE MUNDIAL STO 300ML

LUB-GIN ANTIFERRUGEM

300ML SPRAY

SPRAY

Cód. Ref.

Un.

04499 29424

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04500 29432

UN

09294 AE03000019

UN

08436 TE00000689

UN

00623

TB

DESENTUPIDOR DE PIA 1LT LÍQUIDO

GRAFITE EM PÓ 25G

GRAFITE SPRAY 200ML/115G

GRAXA (CA-2) 100/ 500 GR-CX12

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04516 CX12

UN

05470

FARDO 06

UN

09145 789.831.531.001.

UN

02924 3165

UN

05418 CX12

UN

LIMPA-CONTATO 300ML SPRAY

LUBRIFICANTE P/ CORRENTES

PENTOX SUPER AEROSSOL 400ML

PENTOX SUPER INCOLOR GALÃO 3,6L

200ML / 100G

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05771

QUARTO 0,900ML

QT

09308 33257

UN

06991 3388

UN

05774 SPRAY

UN

05772

GALÃO 3,6 LITROS

GL

QUÍMICOS • DESENGRIPANTE • GRAXA • DESENTUPIDOR • CIMENTO BRANCO • GESSO

46

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

AUTOMOTIVOS E QUÍMICOS

PISO CLEAN 1L

PRIMER PU 51 750ML + 150ML

PRIMER UNIVERSAL 900ML

REMOVEDOR DE TINTA SPRAY

CATALISADOR

400ML / 250G

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04512 CX6

UN

08058 2MG021

UN

01397 2MA015

QT

06992 6262

UN

REMOVEDOR PASTOSO 1KG

SODA CÁUSTICA 500G

SOLDA EM TUBO 25G

SOLUÇÃO DESENGRAXANTE 900ML

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

01573 2MS001

QT

04514 CX12

UN

09146 SA

UN

03153 7MP007

QT

VASELINA SÓLIDA 100G

VEDA-CAPO MAXIVED 400G +

VERNIZ 8.1 800ML + CATALISADOR

WD-40 300ML SPRAY

CATALISADOR 60G

100ML

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05420 CX12

UN

01399 4MG040

UN

08053 3MA024

UN

04528

UN

MASSA ANTIRRUÍDO 1,3KG

MASSA DE POLIR N°2 BASE D´ÁGUA 1KG MASSA DE POLIR Nº2 TRADICIONAL

MASSA PLÁSTICA CINZA 1KG

490G

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

01400 3MG035

QT

08055 6MH020

UN

08056 6MH010

UN

08052 1MG046

UN

MASSA POLIÉSTER 900G

MASSA ULTRA LIGHT 495G

CIMENTO BRANCO 1KG FARDO 10KG

GESSO RÁPIDO 1KG - FARDO COM 10KG

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

03148 1MG019

QT

08059 1MG095

UN

06477

004278 FD10

SCP

06478

009130 FD10

FD

CENTRAL DE RELACIONAMENTO • 27 3089.3888

47

CENTRAL

ABRASIVOS

DE RELACIONAMENTO

27 3089.3888

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

ESCOVA CIRCULAR (A) 3X3/8 C/ HASTE

ESCOVA CIRCULAR (A) 4X1/2X1/2 AÇO

ESCOVA COPO 2" C/ HASTE 1/4 AÇO

ESCOVA COPO 4" ONDULADA AÇO

1/4" AÇO CARBONO

CARBONO

CARBONO

CARBONO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07193 6326003140

UN

07194 6326004120

UN

07191 6326002000

UN

07197 6326040140

UN

ESCOVA TIPO COPO TORCIDA 3" DWT

ESCOVA COPO 4" TORCIDA AÇO

ESCOVA DE AÇO 3 FILEIRAS CORPO E

ESCOVA DE AÇO 3 FILEIRAS CORPO E

ROSCA M14 X 2,0MM

CARBONO

CABO MADEIRA AÇO CARBONO

CABO PLÁSTICO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09447

9225 030140

UN

07195 63.26.004140

UN

04761 CX12

UN

00501 1840/3

UN

ESCOVA DE AÇO 3 FILEIRAS CORPO E

ESCOVA DE AÇO 6 FILEIRAS S/ CABO

ESCOVA DE AÇO CORPO PLÁSTICO S/

ESCOVA DE AÇO ECONÔMICA 3 FILEIRAS

CABO PLÁSTICO

CORPO MADEIRA AÇO CARBONO

CABO 177X55MM

CABO PLÁSTICO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08305 415315

UN

04763 CX12

UN

08306 40710

UN

09557 AT1820/3

UN

ESCOVA DE AÇO ECONÔMICA 6 FILEIRAS

PEDRA DE AFIAR AMOLADOR TIPO

PEDRA DE AFIAR COMBINADA JB6

DISCO CORTE BNA 12

CABO PLÁSTICO

CANOA JT911

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

02169 4,5"

UN

09556 AT1820/6

UN

06816 69083139305

UN

09550

JB6 CX 50

UN

05066 7”

UN

ESCOVAS DE AÇO • QUÍMICOS • DISCOS • LIXAS • PONTAS MONTADAS • PEDRAS DE AFIAR

48

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

ABRASIVOS

DISCO CORTE CLASSIC AR 102

DISCO CORTE CLASSIC AR 302

DISCO CORTE CLASSIC T41

DISCO CORTE MULTICORTE C60T

Cód. Ref.

Un.

Cód. Ref.

Un.

01659

4,5" 115X3,0X22,23

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

08011

4,5" (115X1,0X22,23)

UN

09606

7” (180X3,0X22,23)

UN

08012

7" (180X1,6X22,23)

UN

09256

4,5" (115X1,0X22,23)

UN

DISCO CORTE SUPER AÇO AR 312

DISCO DESBASTE SUPER BDA 640

DISCO DIAMANTADO CONTÍNUO

DISCO DIAMANTADO CONTÍNUO D1

Cód. Ref.

Un.

03590 7"

UN

Cód. Ref.

Un.

09551 7”

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

03586

7" (180,0X3,0X22,23)

UN

09552 4,5”

UN

09433 110MM

UN

04681 110MM

UN

DISCO DIAMANTADO CONTÍNUO

DISCO DIAMANTADO CONTÍNUO PRO

DISCO DIAMANTADO SEGMENTADO

DISCO DIAMANTADO SEGMENTADO

CLASSIC

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08013 110MM

UN

01677 110MM

UN

09434

UN

04682 105MM

UN

DISCO DIAMANTADO SEGMENTADO

DISCO DIAMANTADO SEGMENTADO PRO

DISCO DIAMANTADO TURBO

DISCO DIAMANTADO TURBO 110MM

CLASSIC

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08014 110MM

UN

01671 110MM

UN

09435 UN

04701 110MM

UN

DISCO DIAMANTADO TURBO CLASSIC

DISCO DIAMANTADO TURBO PRO

DISCO SERRA CIRCULAR COM VIDEA 4

DISCO SERRA CIRCULAR VIDEA 110MM

110MM

3/8 24 DENTES

24DENTES

Cód. Ref.

Un.

08015 110X22,23MM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

10022 110X20MM

UN

01520 110MM

UN

04689

UN

04700

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

49

ABRASIVOS

DISCO SERRA CIRCULAR MULTICORTE

DISCO SPEED GRIP G125 COM FURO

DISCO FLAP DISC R-822

DISCO FLAP DISC R-822

110MM 24 COM DENTES MC-500

Cód. Ref.

Un.

03553

040 115X22

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

03554

050 115X22

UN

03556

080 115X22

UN

07045

UN

09553

040 152X0X6

UN

03555

060 115X22

UN

03557

120 115X22

UN

DISCO LIXA A-275 CHAMPAGNE

DISCO LIXA A-219 SPEED-GRIP SEM

DISCO LIXA A290

DISCO LIXA F-212 METALITE

FUROS

Cód. Ref.

Un.

00720

080 152X0X6

UN

01646

120 152X0X6

UN

00721

150 152X0X6

UN

01647

180 152X0X6

UN

00722

220 152X0X6

UN

01648

280 152X0X6

UN

00723

320 152X0X6

UN

01649

400 152X0X6

UN

01650

600 152X0X6

UN

Cód. Ref.

Un.

01651

800 152X0X6

UN

03558

16 DS 7" 180X22

PT10

01658

1500 152X0X0

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

00543

24 DS 7” 180X22

PT

01657

1200 152X0X6

UN

05468 180

UN

09554

P0040 152X0X6

UN

00544

36 DS 7” 180X2

PT10

DISCO LIXA F-224 METALITE

DISCO LIXA F-247 METALITE

DISCO LIXA F-425 DURITE

LIXA A-290 040 F 230X280

Cód. Ref.

Un.

02884

24 DS 4,5" 115X22

PT10

02885

36 DS 4,5” 115X22

PT10

07313

24 DS 7” 180X22

PT10

Cód. Ref.

Un.

07314

36 DS 7” 180X22

PT10

02890

100 DS 180X22 7"

PT10

02886

050 DS 115X22 4,5”

PT10

00545

050 DS 180X22 7”

PT10

Cód. Ref.

Un.

02887

060 DS 115X22 4,5”

PT10

00546

060 DS 180X22 7”

PT10

03563

120 180X22 7"

PT10

02888

080 DS 115X22 4,5”

PT10

00547

080 DS 180X22 7”

PT10

03560

024 180X22 7”

PT10

Cód. Ref.

Un.

02889

100 DS 115X22 4,5”

PT10

03559

120 DS 180X22 7”

PT10

03561

036 180X22 7”

PT10

09921

040 F 230X280

PT50

LIXA D’ÁGUA T-401

LIXA CHAMPAGNE A-275

LIXA MADEIRA A-237

LIXA MASSA A-257

Cód. Ref.

Un.

00715

0080 F 230X28

PT50

06881

0100 F 230X28

PT50

06885

0120 F 230X28

PT50

00716

0150 F 230X28

PT50

Cód. Ref.

Un.

Cód. Ref.

Un.

06880

0180 F 230X28

PT50

00535

0050 F 225X275

PT50

00527

0050 F 225X275

PT50

00717

0220 F 230X28

PT50

00536

0060 F 225X275

PT50

00528

0060 F 225X275

PT50

00718

0320 F 230X28

PT50

00537

0080 F 225X275

PT50

00529

0080 F 225X275

PT50

Cód. Ref.

Un.

00719

0400 F 230X28

PT50

00538

0100 F 225X275

PT50

00530

0100 F 225X275

PT50

04524

1200 F 230X280

PT50

01411

0600 F 230X28

PT50

00539

0120 F 225X275

PT50

00531

0120 F 225X275

PT50

04525

1500 F 230X280

PT50

00787

0800 F 230X28

PT50

00540

0150 F 225X275

PT50

00532

0150 F 225X275

PT50

04526

2000 F 230X280

PT50

00788

1000 F 230X28

PT50

00541

0180 F 225X275

PT50

00533

0180 F 225X275

PT50

04527

2500 F 230X280

PT50

01652

1200 F 230X28

PT50

00542

0220 F 225X275

PT50

00534

0220 F 225X275

PT50

LIXA FERRO K-246

LIXA NO-FILL A-219

LIXA D’ÁGUA T-223

Cód. Ref.

Un.

Cód. Ref.

Un.

00507

0080 F 225X275

PT50

02490

0036 F 225X275

PT25

00508

0100 F 225X275

PT50

02491

0040F 225X275

PT25

Cód. Ref.

Un.

00509

0120 F 225X275

PT50

02492

0050 F 225X275

PT25

00802

P0100 F 225X275

PT50

00510

0150 F 225X275

PT50

02493

0060 F 225X275

PT25

00803

P0080 F 225X275

PT50

00511

0180 F 225X275

PT50

02494

0080 F 225X275

PT25

00804

P0120 F 225X275

PT50

00512

0220 F 225X275

PT50

02495

0100 F 225X275

PT25

00805

P0150 F 225X275

PT50

00513

0280 F 225X275

PT50

02496

0120 F 225X275

PT25

00806

P0180 F 225X275

PT50

00514

0320 F 225X275

PT50

02497

0150 F 225X275

PT25

00807

P0220 F 225X275

PT50

02168

0360 F 225X275

PT50

02498

0180 F 225X275

PT25

00809

P0280 F 225X275

PT50

00515

0400 F 225X275

PT50

02499

0220 F 225X275

PT25

00810

P0320 F 225X275

PT50

00516

0600 F 225X275

PT50

50

CENTRAL DE RELACIONAMENTO • 27 3089.3888

CENTRAL

FERRAMENTAS

DE RELACIONAMENTO

ELÉTRICAS

27 3089.3888

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

MARTELETE PERFURADOR MPD-810

ESMERILHADEIRA ANGULAR 4.1/2

ESMERILHADEIRA ANGULAR WS08-115

FURADEIRA DE IMPACTO 500W 1/2"

810W 127V/ 3 JAULES

1.010W WS10-115T 127V

860W 127V/11000 RPM 4.1/2" 115MM

127V

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08394

UN

08226

UN

07437

UN

07840

UN

FURADEIRA DE IMPACTO FIA-012R 500W FURADEIRA DE IMPACTO SBM-500 500W FURADEIRA DE IMPACTO SBM-780 780W FURADEIRA FIA 038R 300W 127V/2800

127V/2800 RPM ½" (13MM)

127V/ 2800 RPM 1/2" (13MM)

1,5-13MM 127V

RPM 3/8" (10MM) - RED

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07451

UN

07432 UN

07452

UN

07476 UN

FURADEIRA IMP 1/2" SBM-810T 127V

PARAFUSADEIRA E FURADEIRA A

PARAFUSADEIRA E FURADEIRA ED-280

POLITRIZ OP13-180 127V 1300W/1000-

810W CARCAÇA ALUMÍNIO

BATERIA ABS-9,6V/ 3,8" (10MM)

280W/ 3,8" (10MM)

3000 RPM DISCO BORRACHA 7" 180MM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09364

UN

07434

UN

07435

UN

07441

UN

SERRA MÁRMORE MS-115 1400W 127V

SERRA MÁRMORE SMA-1300S 1300W

LIXADEIRA OSCILANTE ESS-200 - 127V

LIXADEIRA PLÁSTICA MANUAL

S/DISCO 12000 RPM 4.1/2" 115MM

-127 V /13000 RPM - VERDE

200W/11000 RPM (105X115MM)

220X80MM PRETA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09367 UN

08393 UN

07442

UN

08304

UN

MARTELETES • ESMERILHADEIRAS • FURADEIRAS • PARAFUSADEIRAS • POLITRIZ • SERRAS • LIXADEIRAS • MANDRIL • BROCAS • ACESSÓRIOS

52

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

FERRAMENTAS ELÉTRICAS

MANDRIL

SOPRADOR TÉRMICO STD-1500N -

ELETRODO 6013 2,50MM CAIXA COM

BROCA AÇO RÁPIDO

1500W 127V - 2 ESTÁGIOS

5KG

Cód. Ref.

Un.

04698 1/8"

UN

04782 1/16”

UN

04783 5/14”

UN

04784 3/32”

UN

04785 7/64”

UN

04786 9/64”

UN

04787 5/32”

UN

04788 11/64”

UN

04789 3/16”

UN

04790 13/64”

UN

04791 7/32”

UN

04699 1/4”

UN

04792 9/32”

UN

Cód. Ref.

Un.

04793 5/16”

UN

Cód. Ref.

Un.

08628

2,50MM

CX 5KG

04794 3/8”

UN

04742

10MM-3/8" ROSCA 3/8"

UN

Cód. Ref.

Un.

08629

3,20MM

CX 5KG

04795 7/16”

UN

04743

13MM-1/2” ROSCA 1/2”

UN

07443

UN

08630

4,00MM

CX 5KG

04796 1/2”

UN

BROCA CONCRETO DIN 8039

BROCA FIBROCIMENTO E MOURÃO

BROCA AÇO RÁPIDO

BROCA CHATA 150MM

Cód. Ref.

Un.

01807 1/16"

PT10

01808 5/64”

PT10

01809 3/32”

PT10

01810 7/64”

PT10

01809 3/32”

PT10

01811 1/8”

PT10

01812 9/64”

PT10

Cód. Ref.

Un.

01813 5/32”

PT10

04671

4.0 MM

UN

01814 11/64”

PT10

04670

3.0 MM

UN

01815 3/16”

PT10

04672

5.0 MM

UN

01816 13/64”

PT10

04673

6.0 MM

UN

01810 7/64”

PT10

Cód. Ref.

Un.

04675

7.0 MM

UN

01817 7/32”

PT10

01798

6 X 1/4"

UN

04676

8.0 MM

UN

01819 1/4”

PT10

Cód. Ref.

Un.

01822 3/8”

PT05

01805

6 X 3/4”

UN

04678

10.0 MM

UN

04653

1/4 X 18"(457MM)

UN

01823 7/16”

PT05

01801

6 X 3/8”

UN

04679

12.0 MM

UN

04655

5/16 X 18”(457MM)

UN

01821 5/16”

PT05

01804

6 X 5/8”

UN

BROCA CHATA"ATC"157MM

BROCA CONCRETO STANDARD

BROCA ESCAL. PARA TELHA

BROCA FIBROCIMENTO E MOURÃO

1/4"X250MM

Cód. Ref.

Un.

01777

100 X 6MM

PT10

02557

75 X 3MM

PT10

01775

75 X 4MM

PT10

Cód. Ref.

Un.

01776

90 X 5MM

PT10

01797 3/4"

UN

01779

120 X 8MM

PT10

01793 3/8”

UN

01780

120 X 8MM

PT05

01793 3/8”

UN

01781

150 X 10MM

PT05

Cód. Ref.

Un.

Cód. Ref.

Un.

01796 5/8”

PT10

01782

150 X 12MM

PT05

01806 213X6.3X9,4MM

UN

05736 1/4"X250MM

UN

BROCA SDS PLUS SPEEDHAMMER

BROCA WIDEA EXTERNA LONGA

BROCA WIDEA LONGA

BROCA AÇO RÁPIDO

Cód. Ref.

Un.

08268 3/32"

PT10

10036 1/16”

PT10

10039 5/64”

PT10

08269 7/64”

PT10

08270 1/8”

PT10

Cód. Ref.

Un.

08271 9/64”

PT10

08272 5/32”

PT10

08078 05X110X40

UN

08273 11/64”

PT10

08084 10X160X90

UN

08274 3/16”

PT10

08085 10X210X140

UN

10038 13/64”

PT10

08086 12X160X90

UN

08275 7/32”

PT10

08079 05X160X90

UN

08276 1/4”

PT10

08080 06X160X90

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

10037 9/32”

PT10

08277 5/16”

PT05

08081 06X210X140

UN

01786

330 X 6MM

UN

01783

150 X 6MM

UN

08278 3/8”

PT05

08082 08X160X90

UN

01788

330 X 10MM

UN

01785

250 X 10MM

UN

08279 7/16’

PT05

08083 08X210X140

UN

01787

330 X 8MM

UN

01784

250 X 8MM

UN

08280 1/2”

PT10

BROCA CHATA PARA MADEIRA

BROCA CONCRETO

BROCA SDS PLUS

ACESSÓRIO PARA MICRORETÍFICAS ARA

208 PEÇAS RED

Cód. Ref.

Un.

10052 10X150X210MM

UN

Cód. Ref.

Un.

10053 10X150X210MM

UN

10046 1"

UN

Cód. Ref.

Un.

10047 5X50X110MM

UN

10043 1/2”

UN

08262

4MM X 75MM

PT10

10049 6X100X160MM

UN

10040 1/4”

UN

08263

5MM X 85MM

PT10

10048 6X50X110MM

UN

10045 3/4”

UN

08264

6MM X 100MM

PT10

10050 8X100X160MM

UN

10042 3/8”

UN

08266

10MM X 150MM

UN

10054 12X150X210MM

UN

10041 5/16”

UN

08267

12MM X 150MM

UN

10055 12X210X260MM

UN

Cód. Ref.

Un.

10044 5/8”

UN

08265

8MM X 120MM

PT10

10051 8X150X210MM

UN

07458

9268 208000

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

53

FERRAMENTAS MANUAIS

www.otimaatacado.com.br

/otimaatacadoes

/otimaatacado

CAIXA FERRAMENTAS 14,5" C/ 2 BAND.

CAIXA FERRAMENTAS 15" C/

CAIXA FERRAMENTAS 17" C/ 6 BAND. 36

CAIXA FERRAMENTAS POLIPROPILENO

ARTICULADAS E 12 COMPART.

ORGANIZADORES E BANDEJA

DIVISÕES + 2 MINIESTOJOS

20X40 PRETA

REMOVÍVEL

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09175 EF-391

UN

09174 EF-383

UN

09176 EF-376

UN

09911 013601008

UN

ESTOJO MULTIUSO PROFISSIONAL

CHAVE DE FENDA COM PONTEIRAS

JOGO CHAVES COMBINADAS 12 PEÇAS

JOGO CHAVES DE FENDA 6 PÇS 4/2

12 COMPARTIMENTOS

7 PEÇAS

PHILLIPS AÇO CARBONO BLISTER

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09173 EF-340

UN

06611 UN

07848 41128/212

UN

07174 3072406000

UN

JOGO CHAVES DE FENDA 6 PEÇAS

JOGO CHAVES DE FENDA 6 PEÇAS

JOGO CHAVES DE FENDA 7 PEÇAS

JOGO CHAVES PRECISÃO 6 PEÇAS

41110/506

41516/507

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08019 41110/506

UN

08020 41516/507

UN

08031 43408/115

UN

08025 41905/306

UN

JOGO DE TARRAXA 1/2" A 1" PARA

JOGO SERRA COPO 1" 25MM AÇO

JOGO SERRA COPO 2" 50MM AÇO

MALA P/ FERRAMENTA EM LONA

CANOS

CARBONO

CARBONO

400X200X300MM DB 016

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05039

UN

04890

UN

04891

UN

07168

UN

CAIXAS DE FERRAMENTAS • JOGOS DE CHAVES • FERRAMENTAS DE APERTO • FERRAMENTAS DE CONSTRUÇÃO • FERRAMENTAS DE GOLPE • FERRAMENTAS DE MEDIÇÃO • FERRAMENTAS DE CORTE

FERRAMENTAS DE FLUXO E MOVIMENTAÇÃO

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

55

FERRAMENTAS MANUAIS

MALETA COM SOQUETES E ACES.

CHAVE AJUSTÁVEL 10"

CHAVE AJUSTÁVEL INGLESA 8" 200MM

CHAVE ALLEN JOGO 7 PEÇAS 2 A 8MM

1/2" 22PC

AÇO CARBONO CROMADA

SUPORTE CROMO-VANÁDIO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07875 43600/022

UN

06329

CINGI10 CX12

UN

05400

UN

07188

UN

CHAVE ALLEN JOGO 8 PEÇAS JG

CHAVE BIELA

CHAVE BIELA

CHAVE COMBINADA

1,5A8,0MM ARGOLA CROMO-VANÁDIO

Cód. Ref.

Un.

01910

10 MM

UN

01911

11 MM

UN

01912

12 MM

UN

01913

13 MM

UN

01914

14 MM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

01965

15 MM

UN

07855

8 MM

UN

07861

15 MM

UN

01915

16 MM

UN

07861

15 MM

UN

07844

18 MM

UN

Cód. Ref.

Un.

07856

9 MM

UN

07862

17 MM

UN

07845

19 MM

UN

07187

UN

07857

10 MM

UN

07858

12 MM

UN

08026

19 MM

UN

07846

22 MM

UN

07859

13 MM

UN

08027

19 MM

UN

07847

24 MM

UN

CHAVE FENDA AMARELA

CHAVE PHILLIPS AÇO CARBONO

CHAVE PHILLIPS AMARELA

CHAVE GRIFO AÇO FORJADO STILLSON

Cód. Ref.

Un.

01870 1/4X4"

UN

01871 1/4X5”

UN

01872 1/4X6”

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

01864 1/8X4”

UN

05576 1/4X4

UN

03698 1/4X4

UN

01867

3/16X3”

UN

10069

1/4”X 8

UN

03702 1/4X6

UN

01868 3/16X4”

UN

05577 1/4X6

UN

01858 1/4X8

UN

01869 3/16X5”

UN

05578 1/8X3

UN

03700 1/8X3

UN

Cód. Ref.

Un.

03666 3/16X6”

UN

05579 1/8X5

UN

03699 1/8X5

UN

04615

10" X 250MM

UN

07853 5/16X6”

UN

05580 3/16X4

UN

03701 3/16X4

UN

04616

12” X 300MM

UN

01878 5/16X8”

UN

05581 3/16X6

UN

01855 3/16X6

UN

04614

14” X 350MM

UN

CHAVE PARA MANDRIL (13MM - 1/2") E

ALICATE CORTE DIAGONAL MAYLE 6"

ALICATE BICO MEIA CANA 6" AÇO

ALICATE BICO MEIA CANA RETO 6" AÇO

(10MM - 3/8")

ISOLADO

CARBONO ISOLADO

CARBONO NIQUELADO CB ISOLAD

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04744 6671002000

UN

09731 119124M

UN

07835 41008/106

UN

Cód. Ref.

Un.

04591 3625615005

UN

ALICATE BICO REDONDO 6" AÇO

ALICATE BICO REDONDO 7" CABO

ALICATE BICO RETO 6" NIQUELADO

ALICATE BOMBA D'ÁGUA 10" AÇO

CARBONO NIQUELADO CABO ISOLADO

EMBORRACHADO CROMO-VANÁDIO

CARBONO CR FRISO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04593 3625615004

UN

08071 1864058

UN

06323 ABR6P-CX06

UN

04599 3625100100

UN

56

CENTRAL DE RELACIONAMENTO • 27 3089.3888

FERRAMENTAS MANUAIS

ALICATE CORTE DIAGONAL 6" AÇO

ALICATE CORTE DIAGONAL 6" AÇO

ALICATE DE PRESSÃO 10" AÇO CARBONO ALICATE DE PRESSÃO 10" MORDENTE

CARBONO CABO ISOLADO

CARBONO ISOLADO

NIQUELADO BLISTER

EM "V"

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04592 CX06

UN

07834 41006/106

UN

04600 CX10

UN

08066 1809681

UN

ALICATE DE PRESSÃO 10" MORDENTE

ALICATE DESENCAPAR FIOS 0,2 A

ALICATE MEIA-CANA CURTO MAYLE 6"

ALICATE REBITADOR MANUAL

TRIANGULAR AÇO CARBONO

2,5MM²

ISOLADO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04977

41070/110 CX/12

UN

05399 3662006120

UN

09733 119141M

UN

04715 CX06

UN

ALICATE UNIVERSAL 7" AÇO CARBONO

ALICATE UNIVERSAL 8" AÇO CARBONO

ALICATE UNIVERSAL 8" AÇO CARBONO

ALICATE UNIVERSAL 8" AÇO CARBONO

BASIC AZUL

ISOLADO AMARELO

NIQUELADO CABO ISOLADO

POLIDO CABO ISOLADO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08017 41002/107

UN

04976

41001/108 CX/12

UN

05834 3625820000

UN

05844 3625800000

UN

ALICATE UNIVERSAL 8" CABO ISOLADO

ALICATE UNIVERSAL MAYLE 8 ISOLADO

ALICATE CORTA CABO 8" S/ ISOLAMENTO DESEMPENADEIRA DE AÇO DENTADA CABO FECHADO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04590 3625000830

UN

09735 119122M

UN

08067 10505518

UN

09665 AT145

UN

DESEMPENADEIRA DE AÇO LISA CABO

DESEMPENADEIRA DE AÇO LISA CABO

DESEMPENADEIRA PLÁSTICA P/

DESEMPENADEIRA DE AÇO COM DENTES

ABERTO

FECHADO

TEXTURA

12X24

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09662 133

UN

09664 143

UN

09667 165

UN

03866

CX12 4.04.004-0

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

57

FERRAMENTAS MANUAIS

DESEMPENADEIRA DE AÇO COM DENTES DESEMPENADEIRA DE AÇO COM DENTES DESEMPENADEIRA DE AÇO COM DENTES DESEMPENADEIRA DE AÇO DENTADA 12X48 TÉCNICA

25,5X12CM

272X120MM

CABO ABERTO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05391 801002

UN

08291 19550

UN

07780 77376/115

UN

09663 135

UN

DESEMPENADEIRA DE AÇO LISA 12X24

DESEMPENADEIRA DE AÇO LISA 12X48

DESEMPENADEIRA DE AÇO LISA

DESEMPENADEIRA DE AÇO LISA

TÉCNICA

25,5X12CM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07778 272X120MM

UN

03865

CX12 4.04003-1

UN

05390

25,5X12CM

UN

08290 25,5X12CM

UN

07779 480X120MM

UN

DESEMPENADEIRA DE MADEIRA

DESEMPENADEIRA PLÁSTICA C/

DESEMPENADEIRA PLÁSTICA C/

DESEMPENADEIRA PVC CORRUGADA

ESPUMA 14X27CM

ESPUMA 17X30CM

14X27/ 17X30

Cód. Ref.

Un.

Cód. Ref.

Un.

02860

17X27

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

03867

CX12 4.06.0148

UN

01754 19X29

UN

09918 011803009

UN

09919 011803010

UN

03868

CX12 4.06.0180

UN

DESEMPENADEIRA PVC CORRUGADA

DESEMPENADEIRA PVC LISA 14X24/

DESEMPENADEIRA PVC LISA PEQUENA

DESEMPENADEIRA PVC PARA GRAFIATO

PEQUENA 15X24 / 17X29 PRETA

17X30

15X24 / 17X29 PRETA

17X30

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06604 148

UN

07038

CX 12 4.06.114

UN

08928 29

UN

Cód. Ref.

Un.

06605 136

UN

02880 406118

UN

06606 30

UN

07627

CX 12 4.16.017

UN

DESEMPENADEIRA TEXTURADORA

DESENTUPIDOR FURACÃO 10M

ESQUADRO CABO ALUMÍNIO 12"

ESQUADRO CABO PLÁSTICO 12"

17X30MM

Cód. Ref.

Un.

Cód. Ref.

Un.

06327

DES 10M CX05

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

05130 166

UN

06326

DES 5M CX10

UN

08301 91250

UN

08300 91210

UN

58

CENTRAL DE RELACIONAMENTO • 27 3089.3888

FERRAMENTAS MANUAIS

ESQUADRO CABO PVC 30CM

ESQUADRO CABO ZAMAC 30CM

ESTILETE 18MM ES183

ESTILETE LEVE PROFISSIONAL

18X172MM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

02878

CX06 012-3

UN

03386

CX06 012-8

UN

04705 CX12

UN

08089 2086102

UN

ESTILETE PROFISSIONAL 6

ESTILETE TRAPEZ STANDARD 170MM

FORMÃO CABO MADEIRA CHANFRADO

FUNIL PLÁSTICO PRETO FLEXÍVEL

165MM

Cód. Ref.

Un.

06665 1"

UN

06662 1/2”

UN

06664 3/4”

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

06661 3/8”

UN

Cód. Ref.

Un.

07874 43390/301

UN

05822 2082101

UN

06663 5/8”

UN

05397

UN

FORMÃO CABO MADEIRA CHANFRADO

GRAMPEADOR MANUAL

GRAMPO

GRAMPO TIPO C

CROMO-VANÁDIO

Cód. Ref.

Un.

01849 1"

UN

01842 1/2”

UN

01847 3/4”

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

03665 3/8”

UN

Cód. Ref.

Un.

04798

6MM VR-6

CX1000

04734 4"

UN

01848 5/8”

UN

04706

UN

04799

8MM VR-8

CX

04735 6”

UN

GROSA MEIA CANA 10"

LÂMINA ESTILETE 18MM TUBETE COM

LÂMINA PARA ROÇADEIRA

LÂMINA SERRA CIRCULAR 4.3/8"

10 UNIDADES

(110MM) FURO 20MM 24 DENTES

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09617 1"

CX03

Cód. Ref.

Un.

08023 41710/310

UN

04797 PT10

PT10

09616 3/4”

CX03

07341 9180111224

UN

LÁPIS CARPINTEIRO CAIXA COM 72

LÁPIS DE CARPINTEIRO LUFKIN CAIXA

CANETA MARCAÇÃO PERMANENTE

RISCADOR PARA PISO E AZULEJO AZUL

UNIDADES

72PC

INDUSTRIAL

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05975 PRETA

UN

01832 130MM

UN

04667 3340100072

UN

09801 LC072C

UN

05974 VERMELHA

UN

05846 130MM

PT-12

60

CENTRAL DE RELACIONAMENTO • 27 3089.3888

FERRAMENTAS MANUAIS

RODEL PINO CORTE DUPLO UNIVERSAL

LIMA K&F ENXADA 8"

LIMA PARA ENXADA 8" C/ CABO BLISTER

LIMA PARA FACÃO DESTRO K&F

Cód. Ref.

Un.

01830 5871

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

01831 1682

UN

08975 08992BC

UN

08021 41702/308

UN

08978 08994D

UN

LIMA PARA MOTOSSERRA

LINHA PARA PEDREIRO LISA

LINHA PARA PEDREIRO TRANÇADA

MACHADINHA AÇO CUNHA 32CM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08977 8"X7/32"

PT03

02015

PT C/12

UN

02013

50 METROS

UN

Cód. Ref.

Un.

09821 8”X3/16”

PT03

02014

100 METROS

UN

02012

100 METROS

UN

02865

50 METROS

UN

MACHADINHA COM UNHA 450G

MACHADO SOLDADO 3.5 C/ CABO 100CM MARRETA COM CABO

MARRETA OITAVADA

Cód. Ref.

Un.

02866

1,5 KG

UN

02868

500G

UN

Cód. Ref.

Un.

02867

1 KG

UN

07829 500G

UN

03387

2 KG

UN

07830

1 KG

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

03388

3 KG

UN

07831

1,5 KG

UN

07833 40560/001

UN

07777 77322/533

UN

03389

5 KG

UN

07832

2 KG

UN

MARTELO UNHA POLIDO

MARTELO AÇO POLIDO

MARTELO BORRACHA BRANCA

MARTELO BORRACHA PRETO

Cód. Ref.

Un.

06083

29 CM

UN

06079

23 CM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06082

25 CM

UN

03879

40 MM

UN

02869

40 MM

UN

04731

29 MM

UN

06080

27 CM

UN

02871

60 MM

UN

02870

50 MM

UN

MARTELO UNHA B.B

MARTELO POLIDO CABO MADEIRA

MARTELO UNHA MASTER

MARTELO UNHA CABO MADERITE NAVAL

Cód. Ref.

Un.

07826

18 CM

UN

05412

20 CM

UN

01838

23 CM

UN

01839

25 CM

UN

01840

27 CM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

03664

29 CM

UN

Cód. Ref.

Un.

04640

29 CM

UN

04645

29 CM

UN

07827

34 CM

UN

08016

29 CM

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

61

FERRAMENTAS MANUAIS

MARTELO PENA 5OG

CABO MARRETA MADEIRA

CABO MARTELO 25CMX295MM

NÍVEL DE ALUMÍNIO 12"

30CMX300MM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07828 40443/001

UN

03381

EMB06 040-9

UN

03860

204031 CX06

UN

02874

CX06 6.18.012-4

UN

NÍVEL DE ALUMÍNIO 350MM 14"

NÍVEL DE ALUMÍNIO MAGNÉTICO 300MM 12"

NÍVEL DE MADEIRA 12"

PLAINA HB02-82 - 127V - 710W/ 14500

RPM LARG CORTE 82MM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07863 43100/014

UN

07865 43105/012

UN

02875

CX06 6.02.012-7

UN

07450 131954

UN

PLAINA MANUAL Nº4

PLAINA MANUAL Nº5

PONTEIRO REDONDO

PRUMO DE AÇO PAREDE 400GR 1020

Cód. Ref.

Un.

03882

400 GR

UN

Cód. Ref.

Un.

02876

500 GR

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

04774 10"

UN

03881

700 GR

UN

10002 3677140000

UN

04781 350MMX62MM

UN

04775 12”

UN

03859

1 KG

UN

RÉGUA BI-TUB COM. 45MMX20,8MM

RÉGUA BI-TUB EXTRA 2"X1" TAMPA

RÉGUA FRISADA 2"X1" TAMPA AMARELA

ROÇADEIRA DE GRAMA A GÁSOLINA

TAMPA VERDE - 2M - NAT

VERMELHA - 2M - NAT

- 2M - NAT

40CC

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07566

UN

07567

UN

07568

UN

09032 G1835BR

UN

ARCO DE SERRA FIXO 12"

ARCO DE SERRA FIXO 12" AMARELO

ARCO DE SERRA FIXO 12" FERRO AS100

ARCO DE SERRA FIXO POP P1001

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08294 18955

UN

01841

43301/012 CX/12

UN

04664 3565000100

UN

06320 P1001-CX50

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

63

FERRAMENTAS MANUAIS

ARCO DE SERRA MINI MAC 2005

ARCO DE SERRA MONOBLOCO MAC 2100

ARCO DE SERRA REGULÁVEL 12" CABO

ARCO DE SERRA REGULÁVEL CABO

ERGONÔMICO

VERMELHO MAC 2000

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06341 MAC2005

UN

09922 MAC2100

UN

08295 18850

UN

06319 MAC2000

UN

SERRA BIMETAL EXTRAFLEX K&F 18

SERROTE PROFISSIONAL

SERROTE 20" AMADOR CABO MADEIRA

SERROTE DE PODA 12"

DENTES

(5 DENT. P/ POL.) CABO MADEIRA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08028 18"

UN

07213 208020

UN

Cód. Ref.

Un.

09809 KF1218B

UN

08029 20”

UN

07212 208608

UN

08030 43290/012

UN

SERROTE DRYWALL 9"

SERROTE FAST JACK CABO

TALHADEIRAS CHATAS

TESOURA PARA CHAPAS 10"

ERGONÔMICO

Cód. Ref.

Un.

06074 18"

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

01833 20”

UN

10005 10"

UN

Cód. Ref.

Un.

07873 43282/309

UN

01834 22”

UN

10006 12”

UN

05615

3585105100 CX6

UN

TORQUÊS ARMADOR 12" AÇO CARBONO

TORQUÊS ARMADOR 12" LARANJA

TORQUÊS CARPINTEIRO 10" AÇO

METRO DE MADEIRA NATURAL DUPLO

CARBONO

CM. POL. 2MT

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07837 41052/112

UN

04736 3633122000

UN

07836 41050/110

UN

03869

CX06 1.02.003

UN

TRENA LUFKIN L500 SHELF

TRENA LONGA ABERTA FIBRA

TRENA EMBORRACHADA COM TRAVA

TRENA EMBORRACHADA COM TRAVA

Cód. Ref.

Un.

09818

3 METROS

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

09819

5 METROS

UN

07190

50M X 12,5MM

UN

06338

3M X 16MM

UN

Cód. Ref.

Un.

09820

8 METROS

UN

07189

30M X 12,5MM

UN

06339

5M X 16MM

UN

09241

5M X 19MM

UN

64

CENTRAL DE RELACIONAMENTO • 27 3089.3888

FERRAMENTAS MANUAIS

TRENA COLOR COM TRAVA

TRENA BLISTER

TRENA DE AÇO

CORTADOR DE PISO PREMIUM

Cód. Ref.

Un.

Cód. Ref.

Un.

07866

3M X 16MM

UN

Cód. Ref.

Un.

09234

50 CM

UN

07867

5M X 19MM

UN

10007

3M X 13MM

UN

10009

7,5M X 25MM

UN

Cód. Ref.

Un.

07869

7,5M X 25MM

UN

10008

5M X 19MM

UN

06749

50 CM

UN

09240

3M X 16 MM

UN

07868

10M X 25MM

UN

10009

7,5M X 25MM

UN

09235

90 CM

UN

CORTADOR DE PISO PROFISSIONAL MAC CORTADOR DE PISO E AZULEJO SPEED

PÁ DE BICO COM CABO 120CM

PÁ DE BICO Nº03 COM CABO 71CM

SÉRIE 300

Cód. Ref.

Un.

01829

50 CM

UN

Cód. Ref.

Un.

01978

75 CM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

06750

75 CM

UN

05735

90 CM

UN

08034 77459/544

UN

03921

77459/949 CX06

UN

PÁ DE BICO VIAT 3

PÁ DE BICO Y METÁLICO 4

PÁ QUADRADA Nº03 C/CABO 71CM

PÁ QUADRADA VIAT 3

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09531 313963

UN

09541 200423

UN

03922

77464/434 CX06

UN

09532 313970

UN

PÁ QUADRADA Y METÁLICO 4

CAVADEIRA ARTICULADA 110CM COM

CAVADEIRA ARTICULADA 120CM COM

CAVADEIRA ARTICULADA 140CM COM

CABO MADEIRA

CABO METÁLICO

CABO MADEIRA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09542 200485

UN

07790 77559/524

UN

07791 77562/803

UN

03856

EMB02 909140

UN

CAVADEIRA RETA 08 120CM CABO

CAVADEIRA RETA 09 120CM CABO

CAVADEIRA RETA 09 S/ CABO

COLHER DE PEDREIRO CANTO RETO

MADEIRA, OLHO 35MM

METÁLICO E SOCADOR

Cód. Ref.

Un.

09533 7"

UN

09534 8”

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09535 9”

UN

07788 77550/585

UN

07789 77550/895

UN

01727

77550/085 CX12

UN

09536 10”

UN

66

CENTRAL DE RELACIONAMENTO • 27 3089.3888

FERRAMENTAS MANUAIS

COLHER DE PEDREIRO CANTO RETO

COLHER DE PEDREIRO CANTO RETO

COLHER DE PEDREIRO CANTO RETO

ENXADA DUAS CARAS 2,5 LG GOIVADA

SEM CABO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04800 7"

UN

03864 7"

UN

05406 7"

UN

04801 8”

UN

02858 8”

UN

05407 8”

UN

Cód. Ref.

Un.

04803 10”

UN

03383 9”

UN

05408 9”

UN

09545 101652

UN

ENXADA LARGA GOIVADA 28CM VIAT

ENXADA LARGA 2,5 COM CABO

ENXADA LARGA 2,5 SEM CABO GOIVADA

ENXADA LARGA CANAVIAL 1,5 COM

SEM CABO

CABO 130CM

Cód. Ref.

Un.

Cód. Ref.

Un.

06817 150CM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

09538

321128 CX-6

UN

08786 130CM

UN

03918

77215/254 CX06

UN

08032 77215/654

UN

ENXADA LARGA GOIVADA 28CM C/CABO

ENXADÃO DUAS CARAS 3,0 ESTREITO

ENXADÃO DUAS CARAS 3,0 LARGO

ENXADÃO ESTREITO 2,5 BELLOTA

VIAT 1.5M

COM CABO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09537 321104

UN

09547

101744 CX -06

UN

09546

101768 CX-06

UN

09544 253115

UN

ENXADÃO ESTREITO 2,5 BELLOTA

ENXADÃO ESTREITO 2,5 S/ CABO

ENXADÃO ESTREITO FORJADO 2,5

ENXADÃO LARGO FORJADO 2,5 COM

SEM CABO

COM CABO 130CM

CABO 130CM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09543

254099 CX-6

UN

03920

77272/254 CX06

UN

07782 77272/754

UN

08367 77270/754

UN

PICARETA CHIBANCA 4LB COM CABO

PICARETA CHIBANCA 4LB SEM CABO

PICARETA ESTREITA 4LB COM CABO

PICARETA ESTREITA 4LB SEM CABO

90CM

90CM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07776 77305/543

UN

02172

77305403 CX06

UN

07775 77300/543

UN

01725

77300/403 CX06

UN

68

CENTRAL DE RELACIONAMENTO • 27 3089.3888

FERRAMENTAS MANUAIS

FACÃO PARA MATO CABO DE MADEIRA

FACÃO PARA MATO

FACÃO PARA MATO CABO PLÁSTICO

FOICE ROÇADEIRA COM CABO 120CM

Cód. Ref.

Un.

Cód. Ref.

Un.

01714 14"

UN

07180 14"

UN

01715 16”

UN

Cód. Ref.

Un.

07181 16”

UN

01716 18”

UN

10061 14"

UN

Cód. Ref.

Un.

07182 18”

UN

01717 20”

UN

09997 16”

UN

07792

120 COM

UN

FOICE ROÇADEIRA SEM CABO

CARRINHO DE MÃO CAÇAMBA METÁLICA CARRINHO DE MÃO PRETO 50L

CARRINHO DE MÃO CAÇAMBA PLÁSTICA

FUNDA 65L

FUNDA 55L

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

03923

SEM CADO

UN

10035 77707/435

UN

10034 77704/434

UN

08035 77717/431

UN

CARRINHO DE MÃO EXTRA FORTE 65L

CÂMARA DE AR 3,25 X 8

PNEU 3,25 X 8 DUAS LONAS

BOMBA DE AR PEDAL

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07793 77714/435

UN

05614

6111032580 CX50

UN

05603 6111325082

UN

09230 878

UN

BOMBA DE AR USO GERAL 1/8" X 1.1/2"

BOMBA PARA PNEUS COM PEDAL

BALDE CONCRETO DE AÇO INTEIRIÇO

BALDE CONCRETO EMBORRACHADO

10L PRETO

SUPERFLEX 12L PRETO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04707 3598018000

UN

07170 35.98.000100

UN

09905 021102001

UN

09901 011101028

UN

BALDE CONCRETO PLÁSTICO ALÇA EM

BALDE EXTRA FORTE PRETO

BALDE PARA CONCRETO 12L PLÁSTICO

BALDE REFORÇADO POLIPROPILENO 12L

AÇO 12L PRETO

C/ ALÇA PLÁSTICO C/ PEGADA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09907 011101018

UN

09710 608P

UN

08303 39510

UN

09908 011101025

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

69

FERRAMENTAS MANUAIS

CAIXA DE MASSA PRETA 20L

CAIXA DE MASSA REFORÇADA

CAIXA MASSA POLIPROPILENO

PENEIRA ARO 55 PLÁSTICO LARANJA

20L PRETA

20L

Cód. Ref.

Un.

06618 AREIA

UN

06619 ARROZ

UN

06620 CAFÉ

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06621

CAL E FUBÁ

UN

05925

2313 20LTS EMB12

UN

08302 40110

UN

09913 011001013

UN

06622 FEIJÃO

UN

PRÓ

SERVIÇO DE PÓS-VENDA

• Treinamentos • Layout de lojas • Merchandising

Assistência técnica • Ações promocionais

SUA LOJA

70

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ACESSÓRIOS PARA PINTURA

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

BROXA STANDARD 15X5,6/18X8CM

TACO LIXADOR GRANDE

TACO PARA LIXA BORRACHA PVC

PAD PARA RECORTE EM PINTURAS

Cód. Ref.

Un.

00469

800/1

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

00470 800/2

UN

01532 05539544818

UN

05135 100/1

UN

09558 AT750/70

UN

ABRETRINCA

BANDEJA PARA PINTURA 15CM

BANDEJA PARA PINTURA 23CM PRETA

BANDEJA PARA PINTURA 23CM

PEQUENA PRETA 1415P

MÉDIA 1523P

VERMELHA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05134 375

UN

00502 1415P

UN

00504 1523P

UN

00503 1523

UN

BANDEJA PINTURA POLIPROPILENO

BALDE PINTURA POLIPROPILENO ALÇA

CAÇAMBA 11L PRETA

ESPÁTULA CABO MADEIRA LÂMINA AÇO

GRANDE 1,5L/ 4L PRETA

EM AÇO 15L PRETO

Cód. Ref.

Un.

07982 6CM

UN

Cód. Ref.

Un.

07983 8CM

UN

09909 014902003

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

07984 10CM

UN

09910 014901003

UN

09906 012501017

UN

09709 610P

UN

07985 12CM

UN

ESPÁTULA CABO MADEIRA LÂMINA AÇO

ESPÁTULA CABO PLÁSTICO LÂMINA EM

ESPÁTULA DE AÇO INOX PARA GESSO

ESPÁTULA DE CANTO

AÇO CARBONO

Cód. Ref.

Un.

00505 6CM

UN

Cód. Ref.

Un.

00506 8CM

UN

Cód. Ref.

Un.

07986 20CM

UN

00499 10CM

UN

09631 10CM

UN

Cód. Ref.

Un.

07987 25CM

UN

09630 8CM

UN

09632 12CM

UN

07989 AT150/1

UN

ACESSORIOS PARA PINTURA • ROLOS • TRINCHAS

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

71

ACESSÓRIOS PARA PINTURA

ESPÁTULA MULTIUSO LÂMINA AÇO

ESPÁTULA PLÁSTICA

ESPÁTULA PLÁSTICA LISA

ESPÁTULA CABO PLÁSTICO 4" LÂMINA

REFORÇADO E CABO EMBORRACHADO

EM AÇO

Cód. Ref.

Un.

09670 10CM

UN

09668

6 CM

UN

Cód. Ref.

Un.

09669 8CM

UN

Cód. Ref.

Un.

03105

13 CM

UN

09671

20 CM

UN

Cód. Ref.

Un.

07988 AT195/1

UN

09635 4,5CM

UN

09671

20 CM

UN

08309

10 CM

UN

EESPÁTULA CABO MADEIRA

ESPÁTULA CABO PLÁSTICO

ESPÁTULA PLÁSTICA

ESPÁTULA CABO MADEIRA RIGIDA

LÂMINA AÇO

LÂMINA EM AÇO

LÂMINA AÇO

Cód. Ref.

Un.

03872

10 CM

CX12

Cód. Ref.

Un.

03871 8CM

CX12

01749

10 CM

UN

03883

12 CM

CX12

01747

6 CM

UN

05393

6 CM

CX06

Cód. Ref.

Un.

03385 8CM

UN

05394 8CM

CX06

03655

6 CM

UN

01750

12 CM

UN

05395

10 CM

CX06

Cód. Ref.

Un.

03656 8CM

UN

03870

6 CM

CX12

05396

12 CM

CX06

01530 5539544817

UN

03657

10 CM

UN

ESPÁTULA CABO PLÁSTICO FLEXÍVEL

ESPUMA (CAMURÇA) MULTIUSO

GARFO GAIOLA PROFIMAX

GARFO PARA ROLO DE PINTURA 23CM

PRETO LÂMINA EM AÇO

23CM - 46MM

SIMPLES

Cód. Ref.

Un.

03659

6 CM

UN

03660 8CM

UN

03661

10 CM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

03662

12 CM

UN

08116

13 X 20 X 6CM

UN

09112 AT546/23

UN

08292 12050

UN

GARFO PARA ROLOS 330/23SR SEM

GARFO PARA ROLOS 400/23 COM

GARFO PARA ROLOS 400/23 SEM ROSCA KIT ANTIRESPINGO ECONÔMICO 3

ROSCA SEM GAIOLA

ROSCA COM GAIOLA

COM GAIOLA

PECAS

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

00493 330/23SR

UN

06755 AT400/23R

UN

00494 AT400/23SR

UN

09693 2003

UN

KIT C/ROLO DE LÂ 3 PCS

KIT PINTURA 3 PEÇAS

KIT PINTURA 5 PEÇAS

KIT ROLO DE LA 4 PCS + GARFO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09694 428/22

UN

00801 1001

UN

04412 AT1002

UN

09688 4328

UN

72

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ACESSÓRIOS PARA PINTURA

MINI DESEMPENADEIRA PLÁSTICA P/

MINI ROLO DE LÃ 5 CM

MINI ROLO FÁCIL 5CM

MISTURADOR DE TINTA GRANDE 60CM

TEXTURA

COMPRIMENTO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09666 164

UN

09686 AT328/5

UN

09690 AT705/5

UN

05132 176/2

UN

MISTURADOR DE TINTA MANUAL

MISTURADOR DE TINTA PEQUENO 40CM

PROLONGADOR EXTENSOR AJUSTÁVEL

PROLONGADOR PROFIMASTER 5M

PLÁSTICO

COMPRIMENTO

2M/3M

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

00495 1600

UN

Cód. Ref.

Un.

08010 AT176/3

UN

05131 176/1

UN

00496 1700

UN

09708 18005

UN

PROLONGADOR TRAVA FÁCIL 4M

RASPADOR 6CM

REFIL PARA PAD PARA RECORTE

ROLINHO DE ESPUMA CZ 05/09/15/23CM

EM PINTURAS

Cód. Ref.

Un.

00489 406/5

UN

00490 406/9

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

00491 406/15

UN

08009 AT18004

UN

09672 275/6

UN

09559 AT750/35

UN

00492 406/23

UN

ROLO "MINIROLO" DE ESPUMA

ROLO ANTIGOTA PROFIMAX 23CM

ROLO ANTIRESPINGO 23CM

ROLO ANTIRESPINGO ECONÔMICO 23CM

5/9CM CINZA

BRASILEIRINHO

Cód. Ref.

Un.

09579 AT607/5

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09580 AT607/9

UN

09111 AT321/46

UN

08285 AT2014

UN

04434 773/10

UN

ROLO DE LÃ

ROLO DE LÃ ANTIGOTA

ROLO DE LÃ ANTIGOTA

ROLO DE LÃ ANTIGOTA

Cód. Ref.

Un.

00480

09 CM

UN

Cód. Ref.

Un.

00481

15 CM

UN

Cód. Ref.

Un.

00497

09 CM

UN

Cód. Ref.

Un.

00482

23 CM

UN

08612

05 CM

UN

00498

15 CM

UN

00484

23 CM

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

73

ACESSÓRIOS PARA PINTURA

ROLO DE LÃ EXTRA 23CM

ROLO DE LÃ MISTA 23CM

ROLO DE LÃ POLIÉSTER ECONÔMICO

ROLO DE LÃ SINTÉTICA RESIMAX

23CM

Cód. Ref.

Un.

08007

05 CM

UN

08005

09 CM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08006

15 CM

UN

00479 322/22

UN

00485 228/22

UN

02977 773/19

UN

08004

23 CM

UN

ROLO DE LÃ SINTÉTICA ECONÔMICO

ROLO DE LÃ SUPER 23CM

ROLO DE PELE

ROLO EFEITO JEANS 10CM

23CM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09685

15 CM

UN

Cód. Ref.

Un.

00486 723/19

UN

00483 1000

UN

09684

09 CM

UN

05128 110/10

UN

ROLO EPOXI INDUSTRIAL 23CM

ROLO EXTRA PROFIMAX 23CM

ROLO MAGIEFEITO 23CM

ROLO MAXILÃ PROFIMAX 23CM

Cód. Ref.

Un.

03542 1107

UN

03543 1110

UN

03541 1163

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

03546 1166

UN

09110 AT328/46

UN

03042 326/5

UN

09673 AT322/46

UN

03548 1170

UN

09687 AT328/25

UN

ROLO PARA TEXTURA EXTRA RÚSTICA

ROLO PARA TEXTURA FINA 110/75 23CM

ROLO PARA TEXTURA MÉDIA

ROLO PARA TEXTURA RÚSTICA 1155

110/55 23CM

110/65 23CM

23CM VERMELHO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

00487 110/55

UN

00488 110/75

UN

05129 110/65

UN

00478 1155

UN

ROLO PINTA CANTO 5CM

ROLO RENDE PLUS

ROLO RENDEPLUS (MICROFIBRA) 23CM

ROLO ROLA-FÁCIL

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09634

15 CM

UN

Cód. Ref.

Un.

09692

15 CM

UN

08731 AT406/1

UN

09633

09 CM

UN

03840 327/23

UN

09691

09 CM

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

75

ACESSÓRIOS PARA PINTURA

ROLO VELUDO

SUPORTE MANUAL PARA LIXA

TRINCHA 319

TRINCHA 395

Cód. Ref.

Un.

Cód. Ref.

Un.

00464

1 1/2"

PT12

00474

1 1/2"

PT12

00461

1/2”

PT12

00471 1/2”

PT12

00462 3/4”

PT12

00472 3/4”

PT12

00463 1”

PT12

00473 1”

PT12

Cód. Ref.

Un.

00465 2”

PT12

00475 2”

PT12

06859

05 CM

UN

00466

2 1/2”

PT12

00476

2 1/2”

PT12

09689

09 CM

UN

Cód. Ref.

Un.

00467 3”

PT12

00459 3”

PT12

08231

15 CM

UN

05136 100/2

UN

00468 4”

PT12

00460 4”

PT12

TRINCHA 396 CERDAS BRANCAS

TRINCHA 417/41 CERDAS GRIS

TRINCHA AT315/ PLUMA TEK

TRINCHA SEDA TEK

Cód. Ref.

Un.

07996 1/2"

PT12

Cód. Ref.

Un.

07997 3/4”

PT12

09654 1"

PT12

07998 1”

PT12

Cód. Ref.

Un.

09655

1 1/2”

PT12

07999

1 1/2”

PT12

06667 1/2"

PT12

09652 1/2”

PT12

08000 2”

PT12

06668 3/4”

PT12

09657

2 1/2”

PT12

08001

2 1/2”

PT12

06669 1”

PT12

09656 2”

PT12

08002 3”

PT12

Cód. Ref.

Un.

06670

1 1/2”

PT12

09658 3”

PT12

08003 4”

PT12

05907 1/2"

PT12

06671 2”

PT12

09653 3/4”

PT12

ESTOPA 150G

ALGODÃO P/ POLIMENTO 100G

BOINA DE PELE DUPLA-FACE COM

BOBINA PLÁSTICA PRETA 4X100

ROSCA 8”

Cód. Ref.

Un.

Cód. Ref.

Un.

00567

4X100 (15KG)

RL

05496

10131 PT 50 UND

UN

02806

4X100 (24 KG)

RL

05497

10132 PT 50 UND

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

04637

4X100 (30 KG

RL

05498

10134 PT 25 UND

UN

01531 66261087582

UN

01529 66254460587

UN

04639

4X50 (10 KG)

RL

Na ÓTIMA você tem

facilidade de pagamento.

76

CENTRAL DE RELACIONAMENTO • 27 3089.3888

CENTRAL

EPI

DE RELACIONAMENTO

27 3089.3888

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

MÁSCARA RESPIRADORA PFF1 COM

MÁSCARA RESPIRADORA PFF3 COM

MÁSCARA RESPIRADORA PFF1 SEM

MÁSCARA RESPIRADORA PFF3 SEM

VÁLVULA AZUL

VÁLVULA AZUL

VÁLVULA AZUL

VÁLVULA AZUL

Cód. Ref.

Un.

Cód. Ref.

Un.

04805

PFF1

UN

Cód. Ref.

Un.

04804

PFF1

UN

Cód. Ref.

Un.

03682 PFF2

UN

07715 PFF3

UN

03681 PFF2

UN

07714 PFF3

UN

MÁSCARA RESPIRADORA PFF2 SEM

ÓCULOS SKY FUMÊ

ÓCULOS SKY INCOLOR

ÓCULOS SUMMER FUMÊ

VÁLVULA CARVÃO AZUL

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07716 PFF2

UN

07717 0203

UN

07718 0206

UN

07722 0252

UN

ÓCULOS SUMMER INCOLOR

PEDESTAL PRETO/AMARELO

PROTETOR AURICULAR PLUG

PROTETOR AURICULAR PLUG SILICONE

COPOLÍMETRO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07720 0254

UN

07740 1932

UN

07729 0150

UN

07723 0151

UN

PROTETOR FACIAL 10" INCOLOR CC

BOTA PVC BRANCA CURTA

BOTA PVC BRANCA EXTRA CURTA

BOTA PVC PRETA EXTRA CURTA

Cód. Ref.

Un.

Cód. Ref.

Un.

07941

Nº 38

PAR

07950

Nº 38

PAR

Cód. Ref.

Un.

07942

Nº 39

PAR

07974

Nº 39

PAR

07960

Nº 38

PAR

07943

Nº 40

PAR

07975

Nº 40

PAR

07961

Nº 39

PAR

Cód. Ref.

Un.

07945

Nº 41

PAR

07976

Nº 41

PAR

07962

Nº 40

PAR

07762 WPS711

UN

07946

Nº 42

PAR

07977

Nº 42

PAR

07966

Nº 44

PAR

EPI • EQUIPAMENTOS DE PROTEÇÃO INDIVIDUAL

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

77

EPI

BOTA PVC PRETA/AMARELO CURTA

BOTINA SEGURANÇA SEM BICO DE AÇO

BOTINA USAFE COM BICO DE AÇO

BOTINA USAFE SEM BICO NR 38

Cód. Ref.

Un.

07951

Nº 38

PAR

Cód. Ref.

Un.

Cód. Ref.

Un.

07952

Nº 39

PAR

05943

Nº 38

PAR

07923

Nº 38

PAR

07953

Nº 40

PAR

05944

Nº 39

PAR

07924

Nº 39

PAR

07954

Nº 41

PAR

05945

Nº 40

PAR

07925

Nº 40

PAR

07955

Nº 42

PAR

05946

Nº 41

PAR

07926

Nº 41

PAR

07956

Nº 43

PAR

05947

Nº 42

PAR

Cód. Ref.

Un.

07927

Nº 42

PAR

07957

Nº 44

PAR

09107

Nº 43

PAR

07934

Nº 40

PAR

07928

Nº 43

PAR

07958

Nº 45

PAR

05949

Nº 44

PAR

07936

Nº 42

PAR

07930

Nº 45

PAR

07959

Nº 46

PAR

05068

Nº 45

PAR

07938

Nº 44

PAR

07931

Nº 46

PAR

Pode contar com a ÓTIMA

Maior variedade: mais de 5 mil produtos.

Melhor logística: seu pedido em até 24 horas.

78

CENTRAL DE RELACIONAMENTO • 27 3089.3888

JARDIM E PISCINA

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

ESGUICHO COM ENGATES ROSQUEADOS

ESGUICHO EM POTE 25 PEÇAS

ESGUICHO HIDROP. EM CARTELA

ESGUICHO HIDROP. JATO CONTROLÁVEL

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

03924 78514/000

UN

07800 78515/750

PO

08041 78535/400

UN

07801 78520/501

UN

ESGUICHO HIDROP. METÁLICA EM

ESGUICHO PISTOLA REGULÁVEL

ESGUICHO RETO REGULÁVEL 1/2 OU 3/4

ADAPTADOR PARA MANGUEIRA JARDIM

CARTELA

1/2 OU 3/4

- POTE 25 PEÇAS

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08042 78535/401

UN

05065 3501

UN

05064 3504

UN

08038 78502/740

PO

ADAPTADOR PARA MANGUEIRA JARDIM

ANCINHO 14D ESTAMPADOS SEM CABO

ANCINHO LEVE 14D COM CABO 150CM

APARADOR DE GRAMA 127 V AP1000

- POTE 75 PEÇAS

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07798 78502/750

PO

03917

77110/144 CX/12

UN

07773 77101/644

UN

07804 79632/102

UN

ASPERSOR CIRCULAR EM CARTELA

ASPERSOR ESTÁTICO EM CARTELA

COLHEDOR DE FRUTAS S/ CABO

CONJUNTO P/ JARDINAGEM CABO

MADEIRA 3 PEÇAS

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07803 78529/400

UN

07802 78523/500

UN

08036 77819/151

UN

07796 78102/801

UN

JARDINAGEM E PISCINA

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

79

JARDIM E PISCINA

CONJUNTO PARA IRRIGAÇÃO EM

EMENDA PARA MANGUEIRA 1/2"

CONECTOR PLÁSTICO P/ MANGUEIRA

ENGATE RÁPIDO 1/2" PASSAGEM LIVRE

CARTELA

FÊMEA (ROSCA INTERNA)

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08043 78580/610

UN

04745 CX60

UN

04757 3197120007

UN

04747 CX60

UN

ENGATE RÁPIDO MANGUEIRA JARDIM

ENGATE RÁPIDO MANGUEIRA JARDIM

ENGATE RÁPIDO PARA MANG 1/2

FIO DE NYLON P/JARDIM 1,8MM 20M

EM"POTE" COM 15 PEÇAS

EM POTE COM 40 PEÇAS

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08039 78506/740

PO

07799 78506/750

PO

06023

78506/000 CX24

UN

08045 78796/284

UN

MANGUEIRA JARDIM CRISTAL

MANGUEIRA CRISTAL (NÍVEL) ROLO 50M MANGUEIRA CRISTAL TRANÇADA MANGUEIRA CRISTAL TRANÇADA

TRANÇADA 7/16X1,7"

200LBS

200LBS

Cód. Ref.

Un.

05486

10 METROS

RL

Cód. Ref.

Un.

05487

15 METROS

RL

08446

1/2"X 2"

RL

05930

10 METROS

RL

06612 3/8”X1,5

RL

Cód. Ref.

Un.

05931

15 METROS

RL

05474 5/16”X1

RL

05549

1/2"X2

RL 50M

Cód. Ref.

Un.

05932

20 METROS

RL

05475 5/16”X1,5

RL

06615 1/2”X2

RL100M 05550

3/4"X2,5

RL 50M

MANGUEIRA DUPLA-FACE RECAPADA

MANGUEIRA ENTRADA PARA MÁQUINA

MANGUEIRA IRRIGAFLEX CINZA

MANGUEIRA JARDIM PREMIUM PLUS

1/2"X1,7 50M AZUL

DE LAVAR CRISTAL 1,20M

SILICONADA LARANJA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05401

1/2" X 2

RL 50M

08447

1/2X 1,7

RL 200M

05480 JD13001

RL

05493 MQ15002

UN

04749

3/4” X 2

RL 50M

05478

1/2”X2

RL 50M

MANGUEIRA MULTIUSO TRANÇADA

MANGUEIRA SUPERFLEX LARANJA

PAZINHA ESTREITA CABO MADEIRA

REGADOR PLÁSTICO 10L PRETO

CRISTAL AMARELADA

UNIVERSAL

Cód. Ref.

Un.

Cód. Ref.

Un.

08448

1/2" X 1,8

RL 50M

Cód. Ref.

Un.

Cód. Ref.

Un.

05476

3/8"X2,5

RL 50M

05758

3/4” X 2

RL 50M

01736 77908/001

UN

09923 013202002

UN

80

CENTRAL DE RELACIONAMENTO • 27 3089.3888

JARDIM E PISCINA

REGADOR PLÁSTICO 6L AZUL

SACHO CORAÇÃO COM CABO 43CM

SUPORTE FIXO PARA MANGUEIRA

TESOURA 12" DE GRAMA

PROFISSIONAL

(JARDIM)

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09924 013201025

UN

07794 77800/201

UN

03667

78592/000 CX12

UN

01738

78330/125 CX12

UN

TESOURA DE PODA

TESOURA DE PODA PROFISSIONAL

ADAPTADOR FÊMEA ROSCA DE 3/4 E

ALGICIDA DE CHOQUE GL 1 LITRO

RED 1/2 PT12

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

01737 78300/001

UN

07797 78304/501

UN

06022 78502/000

PT

07464 15290003

UN

ALGICIDA DE MANUTENÇÃO GL 1 LITRO

BARRILHA LEVE PT 2KG

CLARIFICANTE FLOCULANTE E

CLORO GRANULADO BALDE

DECANTADOR 2 EM 1

(FLÓCOLUS) 1L

Cód. Ref.

Un.

07463

BD 10KG

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07462

PT 2KG

UN

07465 15280003

UN

07470 15270004

UN

07466 015310004

UN

07480

PT 5KG

UN

CLORO MULTIAÇÃO BALDE 10KG

CLORO MULTIAÇÃO PT 1KG

DIMINUIDOR DE PH E ALCALINIDADE GL

ESTABILIZADOR DE PH PT 2KG

1 LITRO

Cód. Ref.

Un.

Cód. Ref.

Un.

07459

PT 1 KG

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

07461

BD 10KG

UN

07460

PT 5 KG

UN

07469 015300004

UN

07472 015010028

UN

KIT TESTE AQUACHECK

LIMPA BORDAS GL 1 LITRO

PASTILHA MULTIAÇÃO PT 200GR

SULFATO DE ALUMÍNIO PT 2KG

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07474 015100007

UN

07473 015090006

UN

07478 015440001

UN

07467 015260001

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

81

FERRAGENS

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

NÚMERO ALUMÍNIO ESP. (APTO) - 05 CM

NÚMERO ALUMÍNIO ESPELHADO 15CM

TUCANO CROMADO GRANDE 2059 -

VEDANTE PARA PORTA

JOMARCA KITS

Cód. Ref.

Un.

Cód. Ref.

Un.

07611 0

UN

07601 0

UN

07612 1

UN

07602 1

UN

07613 2

UN

07603 2

UN

07614 3

UN

07604 3

UN

07615 4

UN

07605 4

UN

07616 5

UN

07606 5

UN

07616 5

UN

07607 6

UN

07617 6

UN

07608 7

UN

07618 7

UN

Cód. Ref.

Un.

07609 8

UN

07619 8

UN

Cód. Ref.

Un.

07569

0,80M - NAT

UN

07610 9

UN

07620 9

UN

09004 2059

UN

07570

0,90M - NAT

UN

RODÍZIO SILICONE COM TRAVA

RODÍZIO SILICONE SEM TRAVA

GANCHO DE REDE PAREDE ZINCADO

GANCHO PARA REDE PAREDE

PARAFUSO

SOBREPOR SIMPLES PT-02

Cód. Ref.

Un.

Cód. Ref.

Un.

08998 35MM

UN

09000 35MM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

08999 50MM

UN

09001 50MM

UN

08307 3050

UN

02328

1371 ZI

PR

CADEADO ENCARTELADO PAR MESMO

CADEADO ENCARTELADO PAR MESMO

CADEADO INDIVIDUAL

CADEADO INDIVIDUAL

SEGRED0

SEGRED0

Cód. Ref.

Un.

09680

25 MM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09681

30 MM

UN

09674

20 MM

UN

09676

30 MM

UN

09679

20 MM

UN

09682

35 MM

UN

09675

25 MM

UN

09677

35 MM

UN

CADEADO TETRA INDIVIDUAL

CADEADO DE LATÃO

CADEADO DE LATÃO

CADEADO LATÃO HASTE LONGA

Cód. Ref.

Un.

Cód. Ref.

Un.

04323

20 MM

UN

04327

40 MM

UN

04324

25 MM

UN

04328

45 MM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

04325

30 MM

UN

04329

50 MM

UN

04433

30/50 MM

UN

09678

50 MM

UN

04326

35 MM

UN

04330

60 MM

UN

04432 35/75MM

UN

FERRAGENS • CADEADO • FECHADURAS • TRAVAS, TRINCOS E FECHOS • FIXADORES • LONAS E CORDAS • PENEIRAS • CHAPAS DE ALUMÍNIO • ARAMES • CERCAS E TELAS

82

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

FERRAGENS

CANTONEIRA ARREDONDADA

CANTONEIRA L POLIDO

CANTONEIRA MÃO FRANCÊSA LEVE

CANTONEIRA METÁLICA

PODIUM

Cód. Ref.

Un.

Cód. Ref.

Un.

04685

20 MM

UN

Cód. Ref.

Un.

07557

1"

3 M

04687

25 MM

UN

06332 10X12MM

UN

07558

1/2”

3 M

04688

30 MM

UN

06333

12X14MM

UN

Cód. Ref.

Un.

07559

3/4”

3 M

04644

35 MM

UN

06330

6X8MM

UN

07561

3 METROS

07560

5/8”

3 M

04684

40 MM

UN

06331 8X10MM

UN

CANTONEIRA SEXTAVADA ALTA POLIDO

DOBRADIÇA CURVA COM CALCO

CILINDRO 48MM COM ROSCA E

TRAVA DE SEGURANÇA BRONZE BL

PARAFUSO CROMADO

(TETRA CHAVE)

Cód. Ref.

Un.

09008

35 MM

PT10

Cód. Ref.

Un.

09005

26 MM

PT10

Cód. Ref.

Un.

Cód. Ref.

Un.

07562

3 METROS

UN

09007

35 MM

PT10

02323 C-400

UN

03836

F-2000 41359

UN

FECHADURA BANHEIRO HOME ROSETA

FECHADURA BANHEIRO INOX PREMIUM

FECHADURA EXTERNA INOX PREMIUM

FECHADURA BANHEIRO QUADRATTA

RED CIL 55 BROCA 40MM 4153 CR

ROS RED CIL 55 BROCA 40MM CR

ROS RED CIL 55 BROCA 40MM CR

ROS QUAD CIL 55 BROCA 40MM 4203CR

Cód. Ref.

Un.

08022 BANHEIRO

UN

07972 EXTERNA

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07973 INTERNA

UN

07136 BANHEIRO

UN

07134 EXTERNA

UN

07971 BANHEIRO

UN

FECHADURA EXTERNA QUADRATTA ROS

FECHADURA BANHEIRO INOX PREMIUM

FECHADURA EXTERNA INOX PREMIUM

FECHADURA INTERNA INOX PREMIUM

QUAD CIL 55 BROCA 40MM 4201CR

ESP QUAD CIL 55 BROCA 40MM CR

ESP QUAD CIL 55 BROCA 40MM CR

ESP QUAD CIL 55 BROCA 40MM CR

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07969 EXTERNA

UN

09009 BANHEIRO

UN

02316 EXTERNA

UN

09010 INTERNA

UN

FECHADURA BANHEIRO INOX PREMIUM

FECHADURA INTERNA INOX PREMIUM

FECHADURA BANHEIRO POP ESP RED

FECHADURA INTERNA POP ESP RED CIL

ESP RED CIL 55 BROCA 40MM CR

ESP RED CIL 55 BROCA 40MM CR

CIL 55 BROCA 40MM BRONZE

55 BROCA 40MM BRONZE

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

02964 BANHEIRO

UN

Cód. Ref.

Un.

02318 BANHEIRO

UN

02317 INTERNA

UN

02952 EXTERNA

UN

02931 INTERNA

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

83

Untitled-1 1

11/04/16 19:18

FERRAGENS

FECHADURA BANHEIRO POP ESP RED

FECHADURA EXTERNA POP ESP RED CIL

FECHADURA INTERNA POP ESP RED CIL

FECHADURA BANHEIRO POP TACO GOLF

CIL 55 BROCA 40MM CR

55 BROCA 40MM CR

55 BROCA 40MM CR

ESP RED CIL 55 BROCA 40MM CR

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

02939 BANHEIRO

UN

02938 EXTERNA

UN

02958 INTERNA

UN

07287 BANHEIRO

UN

FECHADURA EXTERNA POP TACO GOLF

FECHADURA BANHEIRO TACO GOLF ESP

FECHADURA EXTERNA TACO GOLF ESP

FECHADURA INTERNA TACO GOLF ESP

ESP RED CIL 55 BROCA 40MM CR

RED CIL 55 BROCA 40MM BRONZE

RED CIL 55 BROCA 40MM BRONZE

RED CIL 55 BROCA 40MM BRONZE

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07288 EXTERNA

UN

02321 BANHEIRO

UN

02319 EXTERNA

UN

02320 INTERNA

UN

FECHADURA INTERNA MILLENIO ESP

TRAVA DE SEGURANÇA INOX IP (TETRA

FECHADURA PARA GAVETA 22MM

FECHADURA SOBREPOR PARA PORTÃO

RED CIL 55 BROCA 40MM BRONZE

CHAVE)

100MM PRETA BRILHANTE

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09998 3263000220

UN

Cód. Ref.

Un.

03101 INTERNA

UN

03835

F-2000 25298

UN

07166 32.63.320000

UN

02322 F-1500/100

UN

FECHO CHATO 3.1/2" ZC P/ PORTÃO

FECHO PEGA LADRÃO AÇO CROMADO

FECHO REDONDO 4" ZC PACOTE 12

FIXADOR DE PORTA FP-555 MAGNÉTICO

PACOTE12

EM ALUMÍNIO

Cód. Ref.

Un.

07146 32.19.312000

PT-12

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07147 32.19.400000

PT-12

07143 32.14.012000

UN

07150 32.21.400000

PT-12

07171 35.99.200555

UN

FIXADOR DE PORTA P/ RODAPÉ FPD0050

MAÇANETA DE ALAVANCA CROMADA

MOLA AÉREA PRATA POTONCIA 2

MOLA AÉREA PRETA POTENCIA 2

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07161 32.63.000050

UN

02324

86617 CR

UN

07198 3291200100

UN

07199 3291200101

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

85

FERRAGENS

PORTA CADEADO 4”/5" ZC PT12

PUXADOR ALÇA 102MM

TRINCO FIO REDONDO 2 1/2" FG - ISERO

TRINCO UNIVERSAL 12CM LO - ISERO

Cód. Ref.

Un.

Cód. Ref.

Un.

09177 3222500000

PT

07163 32.63.000102

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

10003 3290340000

PT

07164 32.63.000120

UN

05249

14C-FGAL BLISTER

CTL

05238

1323V BLISTER

UN

OLHO MAGICO C/VISOR CROM. 35 A

BARRA ROSCADA ZINCADA

BUCHA PARA GESSO/DRY WALL

BUCHA PLÁSTICA Nº10 S/ ANEL PT 500

50MM

Cód. Ref.

Un.

05704

Nº 5

PT1000

05705

Nº 6

PT1000

Cód. Ref.

Un.

05706

Nº 7

PT1000

03027

1/4" X 1MT

PT10

Cód. Ref.

Un.

05707

Nº 8

PT1000

Cód. Ref.

Un.

03029

3/8” X 1MT

PT10

05712

GDP 1

PT50

05708

Nº 10

PT500

05398

327520020 BLISTE

UN

04628

5/16” X 1MT

PT10

05713

GDP 2

PT50

05709

Nº 12

PT250

ESCÁPULA COM BUCHA

ESPAÇADOR CERÂMICO 2MM

GANCHO COM BUCHA

PARAFUSO A.A PANELA FENDA RETA ZI

Cód. Ref.

Un.

08948 3,9X32MM

PT500

Cód. Ref.

Un.

Cód. Ref.

Un.

08949 4,2X38MM

PT500

05833

Nº 6

PT100

Cód. Ref.

Un.

06368

Nº 6

PT100

08950 4,8X45MM

PT500

05842

Nº 8

PT100

08925 2MM

PT100

05843

Nº 8

PT100

08951 5,5X50MM

PT200

05832

Nº 10

PT100

06602 3MM

PT100

06369

Nº 10

PT100

08952 6,3X50MM

PT200

PARAFUSO COM BUCHA MAD. SEXT.

PARAFUSO COM BUCHA MAD. SEXT.

PARAFUSO COM BUCHA MAD. CAB.

PARAFUSO COM BUCHA A.A PANELA

ROSCA SOBERBA

ROSCA SOBERBA

CHATA FENDA ZI

FENDA RETA ZI

Cód. Ref.

Un.

08938 5"

PT200

08939 6”

PT200

Cód. Ref.

Un.

08940 7”

PT200

08934

6" 3,9X32MM

PT200

Cód. Ref.

Un.

Cód. Ref.

Un.

08941 8”

PT200

08935

7” 4,2X38MM

PT200

08944

8" 3/16X45MM

PT100

08946

10" 1/4X65MM

PT

08943 12”

PT50

08937

9” 6,3X50MM

PT50

08945

10” 1/4X50MM

PT100

08947

12” 5/16X70MM

PT50

08942 10”

PT100

08936

10” 5,5X50MM

PT100

PARAFUSO FRANCÊS UNC COM PORCA ZI

PARAFUSO MADEIRA CABEÇA CHATA

PARAFUSO MADEIRA SEXTAVADO

PARAFUSO PARA VASO B08

FENDA ZI

ROSCA SOBERBA ZI

Cód. Ref.

Un.

08963 3/16X1.1/2

PT200

08969 1/4X3

PT100

08968 1/4X4

PT100

08966 1/4X4

PT100

Cód. Ref.

Un.

08964 3/16X2

PT200

08953 2,8X25MM

PT500

08967 3/16X2.1/2

PT100

08954 3,5X30MM

PT500

08972 5/16X2

PT100

08955 3,8X40MM

PT500

Cód. Ref.

Un.

08970 5/16X2.1/2

PT100

08956 4,5X45MM

PT200

08959 3/16X45MM

PT200

08971 5/16X3

PT100

09577 4,8X65MM

PT200

08960 1/4X50MM

PT100

08973 5/16X3.1/2

PT100

08957 5,5X50MM

PT200

08961 1/4X65MM

PT100

Cód. Ref.

Un.

08974 5/16X5

PT100

08958 6,1X65MM

PT100

08962 5/16X70MM

PT100

09322 13633

PT

86

CENTRAL DE RELACIONAMENTO • 27 3089.3888

FERRAGENS

PARAFUSO PARA VASO B10

PARAFUSO PARA VASO B12

PARAFUSO PARA VASO LATÃO ESPECIAL

PITÃO COM BUCHA

Cód. Ref.

Un.

06370 8"

PT

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06371 10”

PT

05151 8"

PT

09323 1201

PT

09324 13071

PT

06372 12”

PT

05831 10”

PT

PREGO POLIDO EM AÇO

PARAFUSO PARA TELHA COM VEDAÇÃO

KIT VEDAÇÃO E FIXAÇÃO DE TELHAS

ARRUELA MOLE PARA TELHA

PVC

Cód. Ref.

Un.

09436

17X21

PT 1KG

09437

18X24

PT 1KG

09438

18X27

PT 1KG

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09439

19X36

PT 1KG

06315 5/16X110MM

CX100

09450 10080

UM

05194

AMP 0501

PT1000

LONA POLIETILENO LARANJA

CORDA ECO ROPE 03MM BRANCA

CORDA ECO ROPE 04MM BRANCA

CHAPA ALUMÍNIO TRADICIONAL ROLO

CARRETEL COM 400M

CARRETEL COM 220M

COM 27,5M

Cód. Ref.

Un.

07423 0,30CMX0,4MM

UN

Cód. Ref.

Un.

07424 0,40CMX0,4MM

UN

09427

04 MM

RL 220M

07425 0,50CMX0,4MM

UN

Cód. Ref.

Un.

09429

06 MM

RL 150M

07426 0,60CMX0,4MM

UN

04750

3 X 3MT

UN

09428

05 MM

RL 190M

07427 0,70CMX0,4MM

UN

04752

4 X 4MT

UN

09430

08 MM

RL 240M

07428 0,80CMX0,4MM

UN

04753

5 X 4MT

UN

Cód. Ref.

Un.

09431

10 MM

RL 165M

07429 1,00MTX0,4MM

UN

04751

4 X 3MT

UN

09426

03 MM

RL 400M

09432

12 MM

RL 105M

07430 1,20MTX0,4MM

UN

ABRAÇADEIRA ROSCA SEM FIM

ABRAÇADEIRA TIPO U

ARRUELA ZAMAC

BUCHA ZAMAC

Cód. Ref.

Un.

Cód. Ref.

Un.

09089 1/2”

PT100

09097 1/2”

PT100

Cód. Ref.

Un.

Cód. Ref.

Un.

09091 1”

PT100

09099 1”

PT100

09084

5/16 X 3/8 9,5MM

PT100

09078 1/2”

PT100

09093 1.1/2”

PT50

09101 1.1/2”

PT50

09125

1/2 X 3/4 9,5MM

PT100

09080 1”

PT100

09092 1.1/4”

PT50

09100 1.1/4”

PT50

09086

3/8 X 1/2 9,5MM

PT100

9082 1.1/2”

PT50

09094 2”

PT50

09102 2”

PT50

09085

5/16 X 1/2 9,5MM

PT100

09081 1.1/4”

PT50

09090 3/4”

PT100

09103 2.1/2”

PT25

09088

5/8 X 8/4 9,5MM

PT100

09083 2”

PT50

09095 2.1/2”

PT25

09104 3”

PT25

09087

1/2 X 5/8 9,5MM

PT100

09079 3/4”

PT100

09096 3”

PT25

09098 3/4”

PT100

ENGATE FLEXÍVEL AÇO INOX PARA GÁS

ENGATE FLEXÍVEL AÇO INOX PARA GÁS

REGULADOR DE GÁS 1KG BRUTO

REGULADOR DE GÁS COM MANÔMETRO

F X F

COM ADAPTADOR INTEGRADO

1KG BRUTO

Cód. Ref.

Un.

08106 0,80CM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08107 100CM

UN

08110 100CM

UN

02325 504/01

UN

04632 504/01

UN

88

CENTRAL DE RELACIONAMENTO • 27 3089.3888

FERRAGENS

REGULADOR DE GÁS 1KG BRUTO

REGULADOR DE GÁS COM MANGUEIRA

REGULADOR DE GÁS COM MANGUEIRA

REGULADOR DE GÁS 2KG BRUTO

1,20M + ABRAÇADEIRA

80CM + ABRAÇADEIRA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

02592 505/01

UN

08050 505/01

UN

04587 505/01

UN

04629 506/01

UN

KIT P/ INST. DE GÁS C/FLEXÍVEL 1,20M

REGISTRO PARA GÁS 90º COM

ADAPTADOR BRUTO PARA INSTALAÇÃO

ADAPTADOR BRUTO PARA INSTALAÇÃO

AÇO INOX ADAP. E REGISTRO

FECHAMENTO EM ESFERA

DE GÁS (ROSCA EXT)

DE GÁS (ROSCA INT)

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08091 180302-41

UN

08095 180205-21

UN

06874 180106-21

UN

08105 180107-21

UN

ADAPTADOR RETO PARA INSTALAÇÃO

ADAPTADOR RETO PARA INSTALAÇÃO

ARAME FARPADO DYNO 400M

ARAME FARPADO NELORE 250M

DE GÁS (ROSCA EXT)

DE GÁS (ROSCA INT)

Cód. Ref.

Un.

Cód.

Ref. Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08109 180103-21

UN

08108 180104-212

UN

09822 1183

RL

09823

100 METROS

RL

ARAME FARPADO NELORE 250M

ARAME FARPADO NELORE 500M

GRAMPO POLIDO AROEIRA BWG

GRAMPO ZINCADO AGRICULTOR

9X1 X 1KG

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09987

BWG 9X1 X 1 KG

PT

09824

250 METROS

RL

09825

500 METROS

RL

09986 1500

PT

09988

BWG 9X7/8 X 1 KG

PT

ARAME OVALADO SEM FARPAS

ARAME PARA CERCA ELÉTRICA ACO

ARAME PARA CERCA ELÉTRICA AÇO

PANTANAL PG 17X15

ZINCADO ELECTRO14 ZN3 500M

ZINCADO ELECTRO 15

ARAME PARA CERCA ELÉTRICA AÇO

ZINCADO ELECTRO 15

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09826

1000 METROS

RL

10010 0001658

RL

09828

500 METROS

RL

09827

1000 METROS

RL

90

CENTRAL DE RELACIONAMENTO • 27 3089.3888

FERRAGENS

ARAME RECOZIDO BWG 18 1,25MM 1KG

ARAME RECOZIDO PRETO BWG 18 FIO

ARAME ZINCADO MACIO

1,24MM 1KG

Cód. Ref.

Un.

09830

BWG 12 FIO 2,77MM 1 KG

RL

09831

BWG 14 FIO 2,11MM 1 KG

RL

09832

BWG 16 FIO 1,65MM 1 KG

RL

09833

BWG 18 FIO 1,24MM 1 KG

RL

Cód. Ref.

Un.

Cód. Ref.

Un.

09834

BWG 20 FIO 0,89MM 1 KG

RL

09425 00180

PT

09829

RL

09835

BWG 22 FIO 0,71MM

RL

CERCA FARPADA CONCERTINA NÃO

TELA CHIQUEIRO HEXAGONAL PIAU

TELA GALINHEIRO HEXAGONAL COLEIRA

TELA GALINHEIRO HEXAGONAL COLEIRA

CLIPADA

TIPO 3

BRANCA TIPO 2

BRANCA TIPO 2

Cód. Ref.

Un.

Cód. Ref.

Un.

09836

BTO22

RL 10M

09839

BWG16 X 1,00M X 50M

RL

Cód. Ref.

Un.

Cód. Ref.

Un.

09837

BTO22

RL 08M

09840

BWG16 X 1,50M X 50M

RL

09842

BWG18 X 1,50M X 50M

RL

09844

BWG22 X 1,50M X 50M

RL

09838

CBT30

RL 10M

09841

BWG18 X 1,50M X 50M

RL

09843

BWG18 X 1,80M X 50M

RL

09845

BWG22 X 1,80M X 50M

RL

TELA PINTEIRO HEXAGONAL COLEIRA

TELA SEGURANÇA MALHA

TELA SEGURANÇA MALHA

TELA VIVEIRO HEXAGONAL COLEIRA

BRANCA TIPO 1

100X050MMX1,90MM

100X050MMX1,90MM

BRANCA 1/2

Cód. Ref.

Un.

Cód. Ref.

Un.

09849 1,00MX25M

RL

Cód. Ref.

Un.

Cód. Ref.

Un.

09846

BWG22 X 1,00M X 50M

RL

09850 1,20MX25M

RL

09853 1,00MX25M

RL

09857

BWG24 X 1,00M X 50M

RL

09847

BWG22 X 1,50M X 50M

RL

09851 1,50MX25M

RL

09854 1,20MX25M

RL

09858

BWG24 X 1,50M X 50M

RL

09848

BWG24 X 1,00M X 50M

RL

09852 1,80MX25M

RL

09856 1,80MX25M

RL

09859

BWG26 X 1,00M X 50M

RL

Distribuidor

CENTRAL DE RELACIONAMENTO • 27 3089.3888

91

MUNDO CASA

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

KIT VARÃO PARA CORTINA BRANCO COM KIT VARÃO PARA CORTINA C/3 SUP. C/

KIT VARÃO PARA CORTINA C/2 SUP.

SUPORTE PARA CORTINA BANHEIRO

2 SUPORTES PRATIKO

ENC. PRATIKO

PRATIKO

110CM A 200CM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09035 2,00M

UN

09037

3,00M BRANCO

UN

09258

2,00M CROMADO

UN

Cód. Ref.

Un.

09033 1,50M

UN

09038

3,00M PALHA

UN

09259

3,00M CROMADO

UN

08552 PR2782

UN

CORTINA PARA BOX POLIÉSTER LUXO

EXTENSOR PARA CORTINA BOX

TUBO EXTEN. PRONTO FIX 1,35 A 1,48M

TUBO EXTENSOR PRONTO FIX 1,20 A

180X180 CM

BANHEIRO 0,90/1,40M

1,50 A 1,63M

1,33 M

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07563

1,40M -

UN

05220 1336/6

UN

Cód. Ref.

Un.

08550 PR2731

UN

07564

2,30M -

UN

05174 1335/6

UN

05219 1334/6

UN

VARAL CHÃO ALUMÍNIO RENOVAR 90CM

VARAL DE CHÃO RENOVAR COM ASAS

VARAL SANFONADO AÇO RENOVAR

VARAL TETO RENOVAR 1,20 X 0,50 M

EM AÇO 150CX50LX90A

1,00 M

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05179 12-H-M

UN

05212 24-H-M

UN

05215 25-C-L

UN

05213 27-C-L

UN

GRADE PROTEÇÃO PARA PORTA

PORTA SANFONADA PVC BRANCO

PISTOLA DE COLA QUENTE 60W BIVOLT

LIXEIRA MULTIUSO 6L BRANCA

LARGURA 70CM X ALTURA 80CM

PC0060

23X25CM

SAFE MAX

Cód. Ref.

Un.

09281

20130 0,60cm

UN

Cód. Ref.

Un.

09282

20121 0,72cm

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

05217 3741

UN

09283

20132 0,84cm

UN

07179 3099600100

UN

08543 1014-2

UN

ORGANIZAÇÃO • ESCADA • LIMPEZA

92

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

MUNDO CASA

LIXEIRA REDONDA COM BASCULANTE

LIXEIRA RETANGULAR COM PEDAL 6L

CABIDE P/ ROUPAS CRISTAL ADULTO

CABIDE P/ ROUPAS PRETO ADULTO LEVE

4,3L BRANCA 20,2X19,3CM

BRANCA 20,6X22,6X28CM

LEVE 6 PAGUE 5 40CM

6 PAGUE 5 42CM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08547 PR1017-2

UN

08545 PR1016-2

UN

08587 PR115-6

UN

08585 103-6

UN

REFIL PISTOLA COLA QUENTE 8X100

PULVERIZADOR 350ML PD350

PULVERIZADOR 500ML PU500

ESCOVA MULTIUSO

CARTELA C/9

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

10060 1602008100

CTL

04748 6240100350

UN

10004 6240000500

UN

09646 AT2032

UN

ESCOVA MULTIUSO COM ALÇA

ESCOVA SANITÁRIA

PALHA DE AÇO

PALHA DE AÇO

Cód. Ref.

Un.

Cód. Ref.

Un.

06555

N°0 PT20

PT

09711

N°0 PT20

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

06556

N°1 PT20

PT

09712

N°1 PT20

UN

09645 AT114

UN

09647 AT566

UN

06557

N°2 PT20

PT

09713

N°2 PT20

UN

FACA PEIXEIRA

FACA ESPORTE INOX 5 FISH

FACA ESPORTE INOX 5 OUTDOOR

CANIVETE 11 FUNÇÕES INOX 2 1/3

Cód. Ref.

Un.

07809 5"

UN

07810 6”

UN

07811 7”

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07812 8”

UN

07816 26051/105

UN

07815 26010/105

UN

07818 26366/102

UN

CANIVETE INOX 3 - CARTELA C/ 6 UNID.

CANIVETE INOX 3 LÂMINA

ESCADA ALUMÍNIO 3 DEGRAUS

ESCADA ALUMÍNIO

RETANGULAR "CARTELA" COM 6

RESIDENCIAL (BANQUETA)

UNIDADE

Cód. Ref.

Un.

08237

3- 42X94X140CM

UN

Cód. Ref.

Un.

08238

6- 44X112X158CM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

07817 26300/003

CTL

08239

7- 45X131X178CM

UN

07819 26301/003

CTL

08236 35X63CM

UN

08240

8- 47X150X196CM

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

93

MUNDO CASA

ESCADA ALUMÍNIO PROFISSIONAL

PÁ DE LIXO COM CABO

RODO PEQUENO

RODO MÉDIO

ARTICULADA

Cód. Ref.

Un.

08241

7- 590X2361 ALT

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08242

8- 590X2661 ALT

UN

09648 AT150

UN

09644

AT1272

UN

09642

AT1282A

UN

RODO GRANDE

08296

20550 PRETA

UN

VASSOURA MULTIUSO

VASSOURA DE AÇO PARA JARDIM

VASSOURA LIMPEZA PESADA

REGULÁVEL 18 DENTES COM CABO

1,20M

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09643 AT1212

UN

Cód. Ref.

Un.

09638 AT3020

UN

09637 AT2003

UN

VASSOURA P/ JARDIM METÁLICA 22

VASSOURA PARA CANTOS

VASSOURA PLÁSTICA PARA JARDIM

VASSOURA PLÁSTICA PARA JARDIM 22

DENTES C/CABO 1,20M

18D. C/CABO 1,20M

DENTES C CABO 1,20M

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

03663

77831/721 CX/06

UN

09639 AT888

UN

04978

77850/681 CX/06

UN

08297

13310 PRETA

UN

VASSOURA PLÁSTICA PARA JARDIM 26

VASSOURA TIPO ESCOVÃO

VASSOURA TIPO PELO

VASSOURÃO DE CERDAS RÍGIDAS SEM

DENTES COM CABO 1,20M

CABO

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07795 77855/761

UN

09641 AT1182

UN

09640 AT3030

UN

09650 AT9005D

UN

VASSOURÃO GARI

VASSOURÃO GARI MADEIRA 375X65MM

CABO PARA VASSOURÃO

TIJOLO DE VIDRO INCOLOR CLOUDY

COM CABO 1,20M - MAX

19X19X08 CX06 - ECB

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09651 AT9007A

UN

08299 33105

UN

09649 AT9012A

UN

10079 19X19X08

CX06

94

CENTRAL DE RELACIONAMENTO • 27 3089.3888

MUNDO CASA

CONSTRUINDO CONHECIMENTO

Cursos e palestras

para contribuir com

o crescimento de

nossos clientes.

www.otimaatacado.com.br

Assento Sanitário Alumasa

Caixa de Massa

Caixa de Descarga

Escadas Extensivas

Escadas

s Residenciais

Banqueta Escada

008.756/2014

003.633/2014

OCP 0041

OCP 0041

95

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ELÉTRICA

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

ABRAÇADEIRA NYLON BRANCA

ABRAÇADEIRA NYLON BRANCA

CABEÇOTE ALUMÍNIO

PROLONGADOR PARA CAIXA

OCTOGONAL AMARELO

Cód. Ref.

Un.

04095

2,5" 10CM

PT100

Cód. Ref.

Un.

00949

2,5” 10CM

PT100

04717

4,8” 28CM

PT100

06081

2,5” 14CM

PT100

04096

2,5" 15CM

PT100

Cód. Ref.

Un.

04718

2,5” 20CM

PT100

04101

3,6” 30CM

PT100

07652 1.1/2"

UN

00950

3,6” 14CM

PT100

04098

4,8” 30CM

PT100

07662 1.1/4”

UN

00951

3,6” 20CM

PT100

04103

4,8” 40CM

PT100

07651 1”

UN

04719

3,6” 28CM

PT100

04099

4,8” 50CM

PT100

07654 2.1/2”

UN

04716

4,8” 20CM

PT100

04102

7,2” 30CM

PT100

07653 3”

UN

04100

2,5” 20CM

PT100

08365

7,2” 50CM

PT100

07655 3/4”

UN

Cód. Ref.

Un.

04094

3,6” 20CM

PT100

07650 CAC601

UN

06030

PT12

CAIXA LUZ 4X4 OCTOGONAL AMARELA

CAIXA LUZ 4X2 AMARELA PACOTE 20

CAIXA LUZ 4X2 PRETA

CAIXA LUZ 4X4 AMARELA PACOTE 20

PACOTE12

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06029 1255

PT-12

06027 1265

PT20

09912 012401002

UN

06028 1266

PT20

TUBO ELETRODUTO DE PVC RÍGIDO

LUVA PARA ELETRODUTO

CURVA CURTA 90º PARA ELETRODUTO

ELETRODUTO PVC FLEX CORRUGADO

ROSCÁVEL

ROSCÁVEL PRETA

ROSCÁVEL

AMARELO

Cód. Ref.

Un.

Cód. Ref.

Un.

04307 1”

UN

04315 1”

PT30

04305 1/2”

UN

04313 1/2”

PT50

04306 3/4”

UN

04314 3/4”

PT50

Cód. Ref.

Un.

Cód. Ref.

Un.

04308 1.1/2”

UN

04316 1.1/2”

PT08

05159 1”

PT12

05700

25MM50M

ROLO

05156 1.1/4”

UN

05157 1.1/4”

PT10

05160 1/2”

PT24

05699

20MM50M

ROLO

04309 2”

UN

04317 2”

PT08

05161 3/4”

PT24

05701 32MM²5M

ROLO

ELETRODUTO PVC FLEX CORRUGADO

CAPACITOR MET. DUPLO 3 FIOS

CAPACITOR MET. SIMPLES 2 FIOS

CONTROLE PARA VENTILADOR E

LARANJA REFORÇADO

LÂMPADA DESLIZANTE BIVOLT

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05413

10UF + 10%

UN

06524

32MM²5M

ROLO

05415

3 + 7UF + 10%

UN

05414

12UF + 10%

UN

Cód. Ref.

Un.

06523 25MM50M

ROLO

05416

4 + 8UF + 5%

UN

05388

4UF + 10%

UN

07377

QV36 QUALITRONIX

UN

ABRAÇADEIRA • ACESSORIOS ELETRICA • QUADROS E DISPOSITIVOS DE PROTEÇÃO • DISJUNTORES • ADAPTADORES E EXTENSÕES ELETRICAS • MÓDULOS, PLACAS E PLUGUES • SENSORES

INTERRUPTORES E TOMADAS • FIOS E CABOS

96

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

ELÉTRICA

CONTROLE PARA VENTILADOR E

CONTROLE PARA VENTILADOR OU

HASTE TERRA COBREADA ESPECIAL

TERMINAL DE PRESSÃO REFORÇADO

LÂMPADA ROTATIVO BIVOLT

LUMINOSIDADE BIVOLT

FUNDIDO

Cód. Ref.

Un.

Cód. Ref.

Un.

09027

3/8"X1,00M

UN

07646

10 A 16MM

PT10

09028

3/8”X1,20M

UN

07647

16 A 25MM

PT10

Cód. Ref.

Un.

Cód. Ref.

Un.

09029 3/8”X1,50M

UN

07648

25 A 35MM

PT10

07375

QV37 QUALITRONIX

UN

07374

QD31 QUALITRONIX

UN

09030 3/8”X2,00M

UN

07649

35 A 50MM

PT10

CAIXA DE PASSAGEM

CAIXA HIDRÔMETRO (REGIÃO SAAE /

CAIXA PARA MEDIDOR MONOFÁSICO

CAIXA PARA MEDIDOR POLIFÁSICO

SANEAR)

COMPLETO 177X282X140MM

247X378X185MM

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09574 805.1

UN

07553 CIA-7181-C

UN

07550 CM1-N1

UN

07551 CM3-1

UN

CAIXA PARA PROTEÇÃO GERAL

UNIÃO PARA ACOPLAMENTO DE CAIXA

CABO COAXIAL OHMS 100M

CABO DE REDE (LAN) 4PT TOP AZUL

167X263X123MM 100A

DE MEDIÇÃO

305M

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09573 1"

UN

05170

59 47% 75

RL

Cód. Ref.

Un.

07552 CDJ3

UN

09572 1.1/2”

UN

05756

59 67% 75

RL

05728 50X1

CX

CABO TELEFONE CCI PARES 100M CINZA

ANTENA EM V - 5 ESTÁGIOS

ANTENA INTERNA E EXTERNA HD 5000

ANTENA INTERNA MINI RETANGULAR -

DIGITAL

UHF/VHF/FM - C/SELETOR

Cód. Ref.

Un.

05729 50X2

RL

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05730 2011

RL

04093 031130

UN

08366 051084

UN

09989 030591

UN

SUPORTE PARA TV PLASMA/LCD/LED

DIVISOR ANTENA 900 A 2050 MHZ ALTA

EMENDA "F" UNIVERSAL PACOTE 30

EMENDA "T" JACK "F" PACOTE 30

SPRING FIXO UNIVERSAL

Cód. Ref.

Un.

04836 0,0430555556

UN

Cód. Ref.

Un.

04050 0,04375

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

05100

STV 10/71

UN

04837 0,0444444444

UN

03007

042532 PT 30

PT30

04555

041962 PT 30

PT30

CENTRAL DE RELACIONAMENTO • 27 3089.3888

97

LINHA DE PRODUTOS

2016

9096

7062-P

7051

Medição cole

Caixa p/ disj poli CDJ3

Caixa Polifásica

7181

Uniões

Caixa Hidrometro

MEDIÇÃO INDIVIDUAL, COLETIVA, ACESSÓRIOS E SANEAMENTO

ELÉTRICA

CABO CATV RCA 3+3 PLUG (AM/VM/BR)

CANALETA 20X10X2MT BRANCA C/

CHAVE TESTE

CHAVE TESTE 135MM

1,80M

DIVISÓRIA CX25

CAIXA COM 12 UNID

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04057

021148 CARTELA

UN

06607

32009 CX-25

CX25

07169 35.71.091540

UN

04018

012009 CX12

CX12

CHAVE TESTE DIGITAL

CONECTOR PARAFUSO FENDIDO

CONECTOR DE COMPRESSÃO

CONECTOR METAL COM ANEL

SIMPLES

Cód. Ref.

Un.

07639

10MM 8AWG

PT100

07640

16MM 6AWG

PT100

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07641

25MM 4AWG

PT100

06938

RG 59 (DIGITAL)

PT10

05971

RG 59U

PT30

04835 039334

UN

07642

35MM 2AWG

PT100

07572

RG 6U(DIGITAL)

PT10

04046

RG 59U

PT100

CONECTOR METAL ROSCA RG 59U

CONECTOR PORCELANA

CONECTOR PORCELANA

EXTENSÃO TELEFONE LISA BRANCO

Cód. Ref.

Un.

04042

10M BRANCO

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04036

1,5M BRANCO

UN

04045

RG 59U

PT100

04007

3P 10MM²

CX100

04006

3P 16MM²

CX100

04040

5M BRANCO

UN

EXTENSÃO TELEFONE LISA PRETO

FIXA FIOS

FIXA FIO MIGUELÃO

FIXA FIOS

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08929

10/12 (2,5 A 4MM)

PT15

10001

10MM² GCD0010

PT20

04035

1,5M PRETA

UN

08930

14/16 (1 A 1,5MM)

PT15

Cód. Ref.

Un.

09999

6MM² GCD0006

PT20

04041

10M PRETO

UN

08931

18/20 (0,5 A 0,75MM)

PT15

05197 (0,5X2,5MM)

PT15

10000

8MM² GCD0008

PT20

PASSA FIO (COLORIDO) PEAD

PASSA FIO COM ALMA DE AÇO

SOQUETE PORCELANA (RECEPTÁCULO)

SOQUETE PORCELANA (RECEPTÁCULO)

PARA PLAFON

PARA PLAFON

Cód. Ref.

Un.

Cód. Ref.

Un.

08338

10 M

UN

08342

10 M

UN

08339

15 M

UN

08343

15 M

UN

Cód. Ref.

Un.

08340

20 M

UN

08344

20 M

UN

07915 30033

CX25

Cód. Ref.

Un.

08341

30 M

UN

08345

30 M

UN

07916 330035

CX25

04011 61328

CX16

CENTRAL DE RELACIONAMENTO • 27 3089.3888

99

ELÉTRICA

SOQUETE PORCELANA RCA EXTERNO

PLAFON REDONDO COM SOQUETE

PLAFON QUADRADO C SOQUETE

PLAFON REDONDO C SOQUETE PORCEL

PORCELANA BRANCO

PORCELANA PETRA 100W/250V BR

MILLENIUN 100W/250V BR

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

04012

CX24

04013 054016

UN

07077 30127

UN

06855 30125

UN

PLUG CHATO MACHO 10A CINZA

PLUG MODULAR 8X8 RJ45 PACOTE 100

TOMADINHA MINI SOQUETE REDONDO

DISJUNTOR UNIPOLAR DIN CURVA C

PACOTE 10

COM FIO 12CM PACOTE 100

3KA

Cód. Ref.

Un.

08123 G31SLC10

UN

08124 G31SLC16

UN

08125 G31SLC20

UN

08126 G31SLC25

UN

08127 G31SLC32

UN

08128 G31SLC40

UN

08129 G31SLC50

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08130 G31SLC63

UN

04845 000952

PT100

04059

PT100

04848

PT100

08132 G32SLC10

UN

DISJUNTOR BIPOLAR DIN CURVA C 3KA

DISJUNTOR TRIPOLAR DIN CURVA C 3KA DISJUNTOR NEMA UNIPOLAR

DISJUNTOR NEMA 40A BIPOLAR

127VCA 5KA

220VCA 5KA

Cód. Ref.

Un.

Cód. Ref.

Un.

08141 G33SLC10

UN

Cód. Ref.

Un.

08133 G32SLC16

UN

08142 G33SLC16

UN

08150

TQC1215 15A

UN

08134 G32SLC20

UN

08143 G33SLC20

UN

08151

TQC1220 20A

UN

08135 G32SLC25

UN

08144 G33SLC25

UN

08152

TQC1225 25A

UN

08136 G32SLC32

UN

08145 G33SLC32

UN

08153

TQC1230 30A

UN

Cód. Ref.

Un.

08137 G32SLC40

UN

08146 G33SLC40

UN

08154

TQC1240 40A

UN

08160

TQC2430 30A

UN

08138 G32SLC50

UN

08147 G33SLC50

UN

08155

TQC1250 50A

UN

08158

TQC2440 40A

UN

08139 G32SLC63

UN

08148 G33SLC63

UN

08157

TQC1270 70A

UN

08159

TQC2450 50A

UN

DISJUNTOR NEMA 50A TRIPOLAR

DISJUNTOR 63A DIFERENCIAL DR 30MA

DISJUNTOR 63A DIFERENCIAL DR 30MA

EXTENSÃO 2P CORDÃO PARALELO 10A

220VCA 5KA

LINHA DMS

LINHA DMS

250W BRANCA

Cód. Ref.

Un.

Cód. Ref.

Un.

08162

TQC34 50A

UN

06937

3 M

UN

08163

TQC34 100A

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

06941

5 M

UN

08168 TQC3470A

UN

08487

2 MÓDULOS

UN

08490

4 MÓDULOS

UN

06945

10 M

UN

EXTENSÃO 2P CORDÃO PARALELO 10A

EXTENSÃO 2P+T CABO PP CHATO 3X0,75

EXTENSÃO 2P+T CABO PP CHATO 3X0,75

MÓDULO 1 INTERRUPTOR PARALELO

250W PRETA

10A/250V BR/PT

10A/250V BR/PT

10A 250V PETRA

Cód. Ref.

Un.

06939

3 M

UN

Cód. Ref.

Un.

06943

5 M

UN

06857

3 M

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

06947

10 M

UN

06940

5 M

UN

06944

10 M

UN

05315 80002

UN

100

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ELÉTRICA

MÓDULO 1 INTERRUPTOR SIMPLES 10A

MÓDULO KEYSTONE RJ45 PETRA

MÓDULO TOMADA 2P+T 10A 250V

MÓDULO TOMADA 2P+T 10A 250V RAPID

250V PETRA

PETRA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05317 80001

UN

05350 41004

UN

05346 39016

UN

08455 39497

UN

MÓDULO TOMADA 2P+T 20A 250V

PLACA 4X2 1 MÓDULO HORIZONTAL

PLACA 4X2 1 MÓDULO HORIZONTAL

PLACA 4X2 1 MÓDULO VERTICAL PETRA

PETRA

PETRA

RAPID

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05319 39017

UN

05332 82001H

UN

08460 86028

UN

05333 82001V

UN

PLACA 4X2 1 MÓDULO VERTICAL RAPID

PLACA 4X2 2 MÓDULOS DISTANTES

PLACA 4X2 2 MÓDULOS DISTANTES

PLACA 4X2 2 MÓDULOS PETRA

PETRA

RAPID

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08461 86029

UN

05334 82004

UN

08464 86032

UN

05335 82002

UN

PLACA 4X2 2 MÓDULOS RAPID

PLACA 4X2 3 MÓDULOS PETRA

PLACA 4X2 CEGA MILLENIUN

PLACA 4X2 COM FURO MILLENIUN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08462 86030

UN

05336 82003

UN

05409 22007

UN

05282 22006

UN

PLACA 4X4 2 MÓDULOS HORIZONTAL

PLACA 4X4 2 MÓDULOS HORIZONTAL

PLACA 4X4 4 MÓDULOS DISTANTES

PLACA 4X4 4 MÓDULOS PETRA

PETRA

RAPID

PETRA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05308 82011

UN

08466 86034

UN

05297 82044

UN

05304 82022

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

101

ELÉTRICA

PLACA 4X4 6 MÓDULOS RAPID

PLACA 4X4 CEGA MILLENIUN

PLACA REDONDA 4" COM FURO

PLACA REDONDA 4" MILLENIUN

MILLENIUN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

08468 86036

UN

05299 22010

UN

06503 22026

UN

05349 22025

UN

PLUGUE 3 SAÍDAS 2P 10A 250V

PLUGUE 3 SAÍDAS 2P 10A 250V

PLUGUE FÊMEA 2P+T 10A 250V BRANCO

PLUGUE GIGANTE 2P+T CINZA FORTE

(PROLONGADOR)

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06746

10A 250V

UN

08319 BRANCO

UN

08320 CINZA

UN

07920 39174

UN

06747

20A 250V

UN

PLUGUE MACHO 180º 2P

PLUGUE MACHO 180º 2P

PLUGUE MACHO 180º 2P+T

PLUGUE MACHO 180º 2P+T

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

06638

10A 250V BRANCO

UN

06639

20A 250V CINZA

UN

Cód. Ref.

Un.

06641

10A 250V CINZA

UN

06640

20A 250V BRANCO

UN

06637

10A 250V CINZA

UN

06644

20A 250V BRANCO

UN

06643

20A 250V CINZA

UN

PULSADOR CAMPAINHA 10A COM PLACA TOMADA COMPUTADOR RJ45 COM

TOMADA SOBREPOR EXTERNA 2P+T 10A

TOMADA SOBREPOR EXTERNA 2P+T 20A

250V MILLENIUN

PLACA MILLENIUN

250V BR

250V BR

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05269 21010

UN

05278 40416

UN

03034 39189

UN

03001 39190

UN

TOMADA TELEFONE RJ11 CONJUNTO

RELÉ FOTOCÉLULA BIVOLT CORUJITO

RELÉ FOTOCÉLULA BIVOLT PARA BASE

SENSOR DE PRESENÇA QA19 360º

PADRÃO TELEB/AMER MILLENIUN

BIVOLT COM FOTOCÉLULA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05272 40401

UN

07382 QR51

UN

07385 QR53

UN

07371

QA19 QUALITRONIX

UN

CENTRAL DE RELACIONAMENTO • 27 3089.3888

103

ELÉTRICA

SENSOR DE PRESENÇA QA26180ºBIVOLT

SENSOR DE PRESENÇA QI2 180º BIVOLT

SENSOR DE PRESENÇA QI6 180º BIVOLT

1 INTERRUPTOR PARALELO

C/ FOTOCÉLULA EXTERNO

C/ FOTOCÉLULA

C/OM FOTOCÉLULA

HORIZONTAL C/ PLACA 10A 250V PETRA

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

07373

QA26 QUALITRONIX

UN

07369 QI2

UN

07370 QI6

UN

05289 81002H

UN

1 INTERRUPTOR PARALELO+TOMADA C/

1 INTERRUPTOR PARALELO C/ PLACA

1 INTERRUPTOR SIMPLES + TOMADA

1 INTERRUPTOR SIMPLES + TOMADA

PLACA 10A 250V MILLENIUN

10A 250V MILLENIUN

COM PLACA 10A 250V PETRA

C/ PLACA 10A 250V MILLENIUN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05410 39076

UN

05288 21002

UN

05291 39057

UN

05266 39045

UN

1 INTERRUPTOR SIMPLES COM PLACA

1 INTERRUPTOR SIMPLES EXTERNO 10A

1 INTERRUPTOR SIMPLES HORIZONTAL

1 INTERRUPTOR SIMPLES+1INTERPT

10A 250V MILLENIUN

250V BR

COM PLACA 10A 250V PETRA

PARALELO C/ PLACA MILLENIUN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05263 21001

UN

06740 30089

UN

05305 81001H

UN

05267 21004

UN

1 INTERRUPTOR SIMPLES+1INTR

1 TOMADA 2P+T HORIZONTAL 10A COM

1 TOMADA 2P+T HORIZONTAL COM

1 TOMADA 2P+T VERTICAL 10A COM

PARALELO C/ PLAC 10A 250V PETRA

PLACA 250V PETRA

PLACA 10A 250V MILLENIUN

PLACA 250V MILLENIUN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05283 10A

UN

Cód. Ref.

Un.

05275 10A

UN

05359 81012

UN

05355 20A

UN

06739 39023

UN

05274 20A

UN

2 NTERRUPTORESES SIMPLES 10A COM

2 NTERRUPTORES SIMPLES COM PLACA

2 NTERRUPTORES SIMPLES+TOMAD

2 TOMADAS 2P+T HORIZONTAL 10A COM

PLACA 250V MILLENIUN

10A 250V PETRA

2P+T10A C PLAC 250V MILLENIUN

PLACA 250V MILLENIUN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05270 21003

UN

05360 81011

UN

05330 39135

UN

05294 39049

UN

104

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ELÉTRICA

2 TOMADAS 2P+T HORIZONTAL 10A COM 3 INTERRUPTOR SIMPLES 10A COM

3 INTERRUPTOR SIMPLES 10A COM

CAIXA SOBREPOR 2 MÓDULOS PETRA

PLACA 250V PETRA

PLACA 250V MILLENIUN

PLACA 250V PETRA

BRANCO (SISTEMA X)

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

05339 39056

UN

05273 21006

UN

05338 81014

UN

08318 87011

UN

CAIXA SOBREPOR 4X2 BRANCA

CAIXA SOBREPOR COM TOMADA 2P+T

CABO FLEXÍVEL 750V 1,50 MM 100M

CABO FLEXÍVEL 750V 2,50 MM 100M

20A 250V

Cód. Ref.

Un.

Cód. Ref.

Un.

09460

2,50 MM PRETO

RL

09457

1,50 MM AZUL

RL

09464

2,50 MM VERDE

RL

09456

1,50 MM PRETO

RL

09462

2,50 MM AZUL

RL

Cód. Ref.

Un.

Cód. Ref.

Un.

09459

1,50 MM VERDE

RL

09461

2,50 MM BRANCO

RL

08316 73001

UN

05301 70017

UN

09458

1,50 MM VERMELHO

RL

09463

2,50 MM VERMELHO

RL

CABO FLEXÍVEL 750V 4,00 MM 100M

CABO FLEXÍVEL 750V 6,00 MM 100M

CABO FLEXÍVEL 750V 10,00 MM 100M

CABO SEMIRRÍGIDO 750V 100M

Cód. Ref.

Un.

09467

4,00 MM AZUL

RL

Cód. Ref.

Un.

09466

4,00 MM BRANCO

RL

09472

6,00 MM VERMELHO

RL

09465

4,00 MM PRETO

RL

09470

6,00 MM PRETO

RL

Cód. Ref.

Un.

Cód. Ref.

Un.

09469

4,00 MM VERDE

RL

09473

6,00 MM VERDE

RL

09475

10,00 MM AZUL

RL

10080

16,00 MM PRETO

RL

09468

4,00 MM AZUL

RL

09471

6,00 MM AZUL

RL

09474

10,00 MM PRETO

RL

10081

16,00 MM AZUL

RL

CABO PP FLEXÍVEL 500V 100M

CORDÃO PARALELO 300V 100M BRANCO

Cód. Ref.

Un.

Cód. Ref.

Un.

09479 2X0,75MM

RL

09484

2X1,50 MM

RL

09480

2X1,00MM

RL

09487

3X1,50 MM

RL

09481 2X1,50MM

RL

09488

3X2,50 MM

RL

6° PRÊMIO ACOMAC-ES/SINDMAT 2015

09482 2X2,50MM

RL

DISTRIBUIDOR DESTAQUE

DESTAQUE

DISTRIBUIDORA

Na ÓTIMA você tem

Agradecemos a todos os clientes

e fornecedores pela confiança

facilidade de pagamento.

depositada em nossa empresa

2015

nesses 10 anos de parceria.

ES

106

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ILUMINAÇÃO

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

REATOR AF ELETRÔNICO BIVOLT

REATOR AF ELETRÔNICO BIVOLT

LANTERNA LED HIGH-FUN 9 LEDS PT12

LANTERNA LED RECARREGÁVEL BIV 7

LEDS K0068

Cód. Ref.

Un.

Cód. Ref.

Un.

05081 2X20/18W

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

05080

1X 40/36W

UN

05082 2X40/36W

UN

09360 9025

PT

09358 8368

UN

LANTERNA LED SMART-PRO 1 LED

LÂMPADA 3U 127V BRANCA

LÂMPADA 3U 25W 127V 2700K T4

LÂMPADA 3U 25W 127V 6400K T4

K4007 PT24

Cód. Ref.

Un.

07493 15W

UN

09139 11W

UN

Cód. Ref.

Un.

09448 20W

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

09359 9022

CX

07494 22W

UN

09296 25W

UN

09297 25W

UN

LÂMPADA 3U MINI 15W 127V 6400K T3

LÂMPADA COMPACTA ESPIRAL 59W

LÂMPADA DICRÓICA HALÓGENA 50W12V LÂMPADA ESPIRAL 46W 127V 6400K T4

127V 6400K T4

Cód. Ref.

Un.

09302

46W 6400K

UN

09298

11W 2700K

UN

09300

15W 2700K

UN

09299

11W 6400K

UN

09301

15W 6400K

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09305

20W 6400K

UN

09304 FM11516

UN

09303 FS15916

UN

07487 61563

UN

09295

25W 6400K

UN

LÂMPADA ESPIRAL 127V AMARELA

LÂMPADA ESPIRAL 127V BRANCA

LÂMPADA FLUORESCENTE T10-GE

LÂMPADA GELADEIRA/MICROONDAS

CLARA 15W E-14 127V

Cód. Ref.

Un.

07591 10W

UN

Cód. Ref.

Un.

07593 18W

UN

07496 14W

UN

Cód. Ref.

Un.

07594 20W

UN

07497 18W

UN

07500

40W

CX25

Cód. Ref.

Un.

07495 10W

UN

07498 24W

UN

07499 20W

CX25

04563 4667

UN

REATORES • LANTERNA • LÂMPADAS • LUMINÁRIAS E SPOTS

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

107

ILUMINAÇÃO

ILUMINAÇÃO

LÂMPADA INC. BOLINHA CRISTAL15W

LÂMPADA INC. BOLINHA LEITOSA 15W

LÂMPADA INC. ECOLOGENA A55 127V

LÂMPADA INC. VELA LISA CLARA 40W

E-27 127V PT10 UNIDADES

E-27 127V PT10 UNIDADES

127V E-14 PT10 UNIDADES

Cód. Ref.

Un.

09344 42W

PT10

Cód. Ref.

Un.

Cód. Ref.

Un.

09345 70W

PT10

Cód. Ref.

Un.

09346 4720

PT

09347 4722

PT

09343 100W

PT10

09348 4728

PT

LÂMPADA LED 4,5W MINI GLOBO

LÂMPADA LED 4.5W CANDLE

LÂMPADA LED A60 2700K-AM-BIV

LÂMPADA LED A60 6500K-BR-BIV

2700K E27

2700K E27

E27 25000H

E27 25000H

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09184 10W

UN

09185 10W

UN

09197 16101-I

UN

09196 15948-I

UN

09183 7W

UN

09137 7W

UN

LÂMPADA LED CLASSIC A60 9W 6500K

LÂMPADA LED DICRÓICA 4W SUPER

LÂMPADA LED DICRÓICA 4W SUPER LED LÂMPADA LED DICROICA PRO-COB

-BR-BIV E27 6K BRANCA

LED E27

GU 10

6400K

Cód. Ref.

Un.

09350

A60 9W BR

UN

09560

A50 6W BR

UN

09351

A65 12W BR

UN

Cód. Ref.

Un.

09562

A60 9W AM

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

09352

7W BR

UN

09494

A65 12W AM

UN

09205 DL10462

UN

09206 DL10460

UN

09563

4W AM

UN

LÂMPADA LED PAR16 5.5W 6500-BR-BIV LÂMPADA LED PAR20 4W AMARELA LÂMPADA LED PAR20 7W 2700K-AM-BIV

LÂMPADA LED PAR20 4W BRANCA

GU10 25000H 25°

127V-E27 6K

E27 25000H 35°

127V-E27 6K

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09190 81573-I

UN

09492

4W AM

UN

09193

7W AM

UN

09354 9282

UN

LÂMPADA LED PAR30 12W 3000K 100-

LÂMPADA LED PAR38 18W 3000K 100-

LÂMPADA LED TUBE T8 8W 6500K-BR-

LÂMPADA LED TUBO 18W 6400K-BR

240V E27 25000H 35°

240V E27 25000H 40°

BIV G13 40000H 150° 600MM

1,21CM BIV

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09194 81275-I

UN

09195 81532-I

UN

09198 65747-I

UN

09357 8763

UN

108

CENTRAL DE RELACIONAMENTO • 27 3089.3888

ILUMINAÇÃO

ILUMINAÇÃO

LÂMPADA LED TUBO 36W 5000K-BR

LÂMPADA LED TUBO 9W 6400K-BR

LÂMPADA LED VELA 3W 3000K E14

LÂMPADA MINI 3U 15W 127V 2700K

2,37CM BIV

600MM BIV

3U T3

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09355 8980

UN

09356 8762

UN

09213 VL10313

UN

09306 FM11512

UN

LÂMPADA MISTA DE 160W220V E27

LÂMPADA PALITO HALÓGENA DEQ 300W

LÂMPADA PALITO HALÓGENA DEQ 500W

LUMINÁRIA COMPLETA BRANCA

110-130V

110 130V

Cód. Ref.

Un.

Cód. Ref.

Un.

07501 160

UN

Cód. Ref.

Un.

Cód. Ref.

Un.

05085

2 X 18/20W

UN

07504 500

UN

09136 14080-I

UN

08373

14078- I

UN

05086

2 X 36/40W

UN

LUMINÁRIA DE EMERGÊNCIA 30 LEDS

LUMINÁRIA LED EMB. QUADRADA SLIM

LUMINÁRIA LED EMB. QUADRADA SLIM

LUMINÁRIA LED EMB. REDONDO SLIM

BIVOLT

20CM 15W 127 BR

24CM 24W 127 BR

12CM 7W 127 BR

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09361 9122

UN

09379 8989

UN

09380 9036

UN

09375 8983

UN

LUMINÁRIA LED EMB. REDONDO.SLIM

LUMINÁRIA LED EMB. REDONDO.SLIM

LUMINÁRIA LED INLINE BIV

LUMINÁRIA LED SOBREP. QUADRADA

20CM 15W 127 BR

24CM 24W 127 BR

SLIM 30CM 24W 127 BR

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09363

8765 2x14W

UN

Cód. Ref.

Un.

09376 8985

UN

09377 9039

UN

09362

8764 2x7W

UN

09381 9066

UN

LUMINÁRIA LED SOBREP. REDONDA

LUMINÁRIA TARTARUGA ALUMÍNIO

LUMINÁRIA TARTARUGA ALUMÍNIO

SPOT KIT SPORT PRATIK QUADRADA

SLIM 30CM 24W 127 BR

OVAL E27 C/ GRADE BRANCA

OVAL E27 C/ GRADE PRETA

MR16 HI-LED

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

Cód. Ref.

Un.

09565

7W AM

UN

09384 127

UN

09382 7886

UN

09383 7887

UN

09564

7W BR

UN

110

CENTRAL DE RELACIONAMENTO • 27 3089.3888

IMPERMEABILIZANTES

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

ADITIVO P/ MASSA CIPLAKAL

BIANCOLA - FRASCO 1L

BIANCOLA

EPÓXI CIPLAK - FRASCO 1KG

FRASCO 1L

Cód. Ref.

Un.

Cód. Ref.

Un.

04074

3,6 LTS

GL

04072 490647

LT

04073

18 LTS

BA

Cód. Ref.

Un.

Cód. Ref.

Un.

É um adesivo especial à base de resina de PVA que,

É um adesivo especial à base de resina de PVA que,

04732 498064

UN

02918 492432

LT

adicionado à massa de cimento, promove sua melhor

adicionado à massa de cimento, promove sua melhor

fixação em diversas superfícies, como concreto, fixação em diversas superfícies, como concreto, É um adesivo estrutural de base epóxi de média fl uidez, É um aditivo plastificante concentrado que aumenta

alvenaria, EPS e drywall, deixando-a mais durável e fácil

alvenaria, EPS e drywall, deixando-a mais durável e fácil

bicomponente, que apresenta excelente desempenho na

a trabalhabilidade da argamassa para reboco, de trabalhar. Pode ser utilizado também em chapisco, de trabalhar. Pode ser utilizado também em chapisco,

aderência de diversos materiais utilizados na construção

proporcionando maior aderência e diminuição na onde evita respingos na aplicação. Ideal para áreas onde evita respingos na aplicação. Ideal para áreas civil como concreto, aço, alumínio, etc. Para colagem: quantidade de água na massa, reduzindo o aparecimento

internas. Rendimento: 0,1Kg a 0,5Kg por m², podendo

internas. Rendimento: 0,1Kg a 0,5Kg por m², podendo

1,6Kg/m²/mm de espessura Para fixação: Rendimento:

de fissuras por retração. Rendimento: 100ml por saco de

variar conforme a espessura da argamassa ou chapisco e o

variar conforme a espessura da argamassa ou chapisco e o

1.600Kg/m³ Podendo variar conforme a qualidade e a

cimento 50kg

volume de água utilizado.

volume de água utilizado.

porosidade da superfície

HIDROPRIMER PARA MANTA ASFÁLTICA

IMPERCIT

KIMANTA (MANTA AUTOADERENTE)

KIMANTA (MANTA AUTOADERENTE)

ALUMINIZADA

TERRACOTA

Cód. Ref.

Un.

02701 10MX10CM

RL

02702 10MX15CM

RL

02703 10MX20CM

RL

Cód. Ref.

Un.

05628 10MX20CM

RL

Cód. Ref.

Un.

Cód. Ref.

Un.

04071

18 LTROS

BA

03704 10MX45CM

RL

05106 10MX20CM

RL

03705

18 LTROS

BA

04070

3,6 LITROS

GL

04429 10MX60CM

RL

05105 10MX45CM

RL

03706

3,6 LITROS

GL

04080

1 LITRO

LT

04850 10MX90CM

RL

07208

1 LITRO

LT

É uma fita multiuso composta por cimento asfáltico

É um impermeabilizante de base mineral, que age por

É uma fita multiuso composta por cimento asfáltico

enriquecido com polímeros e elastômeros. É aluminizada

É uma emulsão asfáltica de base água. Excelente promotor

meio de cristalização selando os poros da massa e

enriquecido com polímeros e elastômeros. É aluminizada

em uma das faces e autoaderente na outra. Desenvolvida

de aderência entre o sistema de impermeabilização de

proporcionando maior trabalhabilidade, sem alterar em uma das faces e autoaderente na outra. Desenvolvida para vedação, proteção acústica e térmica, tanto para

para vedação, proteção acústica e térmica, tanto para

base asfáltica e a superfície a ser impermeabilizada.

o tempo de preparação para o uso da argamassa e

altas como baixas temperaturas, em superfícies e reparos

altas como baixas temperaturas, em superfícies e reparos

Rendimento: 0,15L a 0,5L/m².

garantindo a impermeabilidade da área.

em geral. Rendimento: 1,10m²/m².

em geral. Rendimento: 1,10m²/m².

MANTA ASFÁLTICA ALUMÍNIO 3MMX10M

MANTA ASFÁLTICA POLIÉSTER

MANTA ASFÁLTICA POLIÉSTER COM

MANTA ASFÁLTICA POLIETILENO

3MMX10M/ 4MMX10M

ALUMÍNIO 3MMX10M

3MMX10M

Cód. Ref.

Un.

02700 497724

RL

Cód. Ref.

Un.

03839 497728

RL

Cód. Ref.

Un.

Cód. Ref.

Un.

É uma manta estruturada com poliéster pré-estabilizado

05381 497727

RL

06845 497720

RL

02699 497726

RL

ou filme de polietileno de alta densidade autoprotegida

na face exposta com um filme de alumínio com alta

É uma manta poliéster impermeabilizante pré-fabricada à

É uma manta poliéster impermeabilizante pré-fabricada à

É uma manta asfáltica impermeabilizante pré-fabricada à

resistência aos raios UV e grande flexibilidade. Apresenta

base de asfalto modificado com polímeros e estruturada

base de asfalto modificado com polímeros e estruturada

base de asfalto modificado com polímeros e estruturada

refletância de até 93% dos raios solares e a capacidade

com poliéster pré-estabilizado. Ideal para aplicação com poliéster pré-estabilizado. Ideal para aplicação com polietileno. Melhor custo-benefício na aplicação em de redução do ruído de impacto de chuva. Impermeabiliza

em lajes de até 150m²*. É necessário fazer proteção

em lajes de até 150m²*. É necessário fazer proteção

lajes de até 50m²*. É necessário fazer proteção mecânica

e melhora o conforto térmico do ambiente. O produto

mecânica para proteção da manta. O produto atende às

mecânica para proteção da manta. O produto atende às

para proteção da manta. O produto atende às normas

atende às normas ABNT. Rendimento: 1,15m²/m².

normas ABNT. Rendimento: 1,15m²/m².

normas ABNT. Rendimento: 1,15m²/m².

ABNT. Rendimento: 1,15m²/m².

ADESIVOS • IMPERMEABILIZANTES • MANTAS • MATERIAL DE ISOLAMENTO

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

111

Soluções para o combate a umidade

com preço justo.

BIANCOLA

MANTACRIL FAST

CIPLAK PU

HIDROPRIMER

KIMANTA

MANTA POLIETILENO

VEDA LAJE PRETO

IMPERMEABILIZANTES

MANTA POLIÉSTER TPIII P/ PISCINA

MANTACRIL FAST MANTA LIQUIDA

MANTACRIL SUPER MANTA LIQUIDA

POLY DESMOLDAR 3,6KG

4MMX10M

Cód. Ref.

Un.

08437

12 LITROS

BL

Cód. Ref.

Un.

Cód. Ref.

Un.

08438

3,6 LITROS

GL

05852 497722

RL

07063

12 LITROS

BL

07668

3,6 LITORS

GL

É uma manta líquida impermeabilizante com alto Cód. Ref.

Un.

É uma manta impermeabilizante pré-fabricada à base

teor de sólidos que garante uma impermeabilização

05745

3,6 LITROS

GL

de asfalto modificado com polímeros estruturada com

É uma manta líquida impermeabilizante de secagem

superior, excelente elasticidade e fl exibilidade. depois

poliéster pré-estabilizado. Ideal para aplicação em rápida, com alto teor de sólidos, plastificante e aditivos de completamente seca, forma uma membrana Desmoldante para forma de concreto, rende até 15X mais piscina, reservatório, muro de arrimo e laje acima de

especiais. Ideal para lajes expostas sem trânsito, forma

impermeabilizante contínua e com alta resistência ao

em relação aos demais produtos disponíveis no mercado.

150m²*. É necessário fazer proteção mecânica para

uma membrana impermeabilizante que contribui para a

sol e à chuva. contém algicida em sua formulação.

Ideal para ser usado em formas de madeiras resinadas,

proteção da manta. O produto atende às normas ABNT.

agilidade da obra. Rendimento: 1Kg a 2,5Kg/m² / 400g a

Rendimento: 1Kg a 4Kg/m² / Consumo estimado de 400g a

super resinadas e compensados, impedindo a aderência

Rendimento: 1,15m²/m².

600g/m²/demão.

500g/m²/demão.

e facilitando a limpeza sem danificar o concreto.

VEDA-LAJE PRETO

VEDA-PAREDE BRANCO

VEDA-UMIDADE FLEX

VEDA-UMIDADE PAREDE

Cód. Ref.

Un.

04079

18 LITROS

BA

Cód. Ref.

Un.

04078

3,6 LITROS

GL

Cód. Ref.

Un.

Cód. Ref.

Un.

04651

18 KILOS

CX

04069

18 LITROS

BA

05629

18 KILOS

CX

É uma emulsão asfáltica de base água, com alta 04068

3,6 LITROS

GL

É um impermeabilizante cimentício de base acrílica,

concentração de asfalto modifi cado pela adição de

É um impermeabilizante cimentício à base de resinas

composto por uma combinação de resinas, aditivos

polímeros elastômeros. Possui excelentes propriedades

É uma emulsão impermeabilizante elástica de base termoplásticas, aditivos e cimentos especiais, flexível e e cimentos especiais; semiflexível e bicomponente,

elásticas que permitem acompanhar a movimentação

acrílica. ideal para impermeabilização em lajes expostas

bicomponente, elaborado para permitir um revestimento

desenvolvido para uma impermeabilização rápida em

da estrutura, garantindo uma maior durabilidade e sem trânsito de pessoas, animais e/ou veículos e com impermeável com excelente aderência, flexibilidade e

locais com pouca movimentação da estrutura. É aplicado

impermeabilidade da área. É necessário a utilização de

caimento mínimo de 2%. fácil aplicação e melhor custo

resistência mecânica. É aplicado na forma de pintura em

na forma de pintura em demãos cruzadas. Resistente

proteção mecânica. Rendimento: 2,0Kg a 4,0Kg/m² /

benefício na impermeabilização de lajes. Rendimento:

demãos cruzadas. Resistente às pressões hidrostáticas

às pressões hidrostáticas positivas e negativas.

300g/m²/demão.

1Kg a 2,5Kg/m² / 300g a 400g/m²/demão.

positivas. Rendimento: 1Kg a 6Kg/m² / 950g/m²/demão.

Rendimento: 1Kg a 4Kg/m² / 950g/m²/demão.

MANTA SUB COBERTURA DUPLA-FACE

MANTA SUB COBERTURA SIMPLES COM

COM 1,20M LARGURA

1,20M LARGURA

Nosso atendimento

faz toda diferença.

CENTRAL DE RELACIONAMENTO

Cód. Ref.

Un.

Cód. Ref.

Un.

27 3089.3888

07724 10M²

RL

07727 10M²

RL

07725 25M²

RL

07719 25M²

RL

07726 50M²

RL

07721 50M²

RL

CENTRAL DE RELACIONAMENTO • 27 3089.3888

113

PINTURA

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

CONVERTEDOR DE FERRUGEM

CONVERTEDOR DE FERRUGEM

GLOBO FIX - FIXADOR DE CAL 150ML

METALATEX ECO SUPER GALVIT

Cód. Ref.

Un.

04500

1 L

UN

04499 500ML

UN

Cód. Ref.

Un.

04498 200ML

UN

00070 31050077

UN

04497

100 ML

UN

Fixador cola para pintura à base de cal e tintas em pó.

O CF-TF7 é o primeiro convertedor de ferrugem do

Fixa com segurança e pode ser aplicado em todo tipo

Cód. Ref.

Un.

Brasil. É ideal para eliminar a ferrugem e preparar

de caiação. Acelera o processo de fixação de caiações.

00824

1 L

UN

superfícies para pintura, dispensando a utilização de

O rendimento e o desempenho do produto dependem

00827

500 ML

UN

outros produtos, como removedores, fosfatizantes etc.

das condições ideais de preparação da superfície onde

00826

100 ML

UN

O CF-TF7 elimina a ferrugem e forma uma película que

será aplicado e de fatores externos alheios ao controle

previne a corrosão, além de facilitar a aplicação de tintas do fabricante, como uniformidade da superfície, umidade

Para a ferrugem na hora. Aplicado como tinta diretamente

e vernizes. Pode ser aplicado em qualquer estrutura

relativa do ar, temperatura e condições climáticas locais,

Fundo à base d’água indicado para promover aderência

sobre a ferrugem, convertendo-a num fundo protetor e duro

ou superfície de ferro, zinco, cobre e outros metais.

conhecimentos técnicos e práticos do aplicador e outros.

sobre superfícies de aço galvanizado e chapas zincadas,

pronto para receber tinta de acabamento. Desnecessário

O uso do CF-TF7 elimina totalmente a necessidade de

Em função desses fatores, o rendimento pode apresentar

canaletas, condutores, calhas, rufos, chapas lisas e

remover a ferrugem. Rendimento: Até 8m² por litro.

lixamento e jateamento.

outras variações.

onduladas, painéis de propaganda etc.

METALATEX MASSA ACRÍLICA BRANCA

METALATEX MASSA PVA BRANCA -

METALATEX SELADOR ACRÍLICA

PRIMER CINZA ESCURO FOSCO

GALÃO 3,6LT

Cód. Ref.

Un.

Cód. Ref.

Un.

00665

3,6 LITROS

GL

00113

3,6 LITROS

GL

Cód. Ref.

Un.

Cód. Ref.

Un.

03218

900 ML

QT

00112

900 ML

QT

00667

3,6 LITROS

GL

00552

900 ML

QT

00653

18 LITROS

LA

00114

18 LITROS

LA

00666

18 LITROS

LA

00553

3,6 LITROS

GL

00554

18 LITROS

LA

É um produto à base de resina acrílica, indicado para

É um produto à base de emulsão acrílica que possui

É um fundo à base de emulsão acrílica, destinado a selar

corrigir pequenas imperfeições, alisar e uniformizar excelente rendimento, secagem rápida e fácil aplicação, superfícies de reboco, concreto, fibrocimento, gamassas

Primer sintético de fácil aplicação e secagem rápida,

superfícies de reboco, concreto, argamassas em geral,

facilitando o lixamento e proporcionando economia da tinta

em geral, em áreas externas e internas. Proporcionar

maior economia na pintura final pela redução do número

com ação inibidora do processo de corrosão, indicado

em ambientes externos e internos, proporcionando um

de acabamento. Rendimento: Lata: 40m² a 65m² por

de demãos do acabamento, principalmente sobre para proteção de superfícies internas e externas de metal acabamento liso. Rendimento: Lata: 40m² a 60m² por

demão / Galão: 8m² a 13m² por demão / Quarto: 2m² a 4m²

superfícies novas e porosas. Rendimento: Lata: 125m²

ferroso, como grades, portões, portas, vitrôs, estruturas

demão / Galão: 8m² a 12m² por demão..

por demão.

a 170m² por demão / Galão: 25m² a 32m² por demão.

metálicas, etc.

REMOVEDOR DE TINTA SPRAY

REMOVEDOR STRIPTIZI GEL 1,0KG

RESTAURAÇÃO ACRÍLICO FLEXÍVEL

SELADORA INCOLOR PARA MADEIRA

400ML / 250G

FOSCO

Cód. Ref.

Un.

01388

900 ML

QT

01387

3,6 LITROS

GL

Cód. Ref.

Un.

A Seladora para Madeira Sherwin-Williams é um

04450

3,6 LITROS

GL

produto incolor à base de nitrocelulose, indicado como

04451

18 LITROS

LA

fundo nivelador em superfícies de madeiras maciças ou

compensadas, aglomerados, laminados, etc. Possui rápida

Complemento Acrílico Flexível é um produto formulado a

secagem e grande poder de enchimento, proporcionando

Cód. Ref.

Un.

base de resina acrílica, de alta performance, esenvolvido

melhoria do rendimento dos vernizes de acabamento, em

Cód. Ref.

Un.

05777

QUARTO 1,0 KG

QT

especialmente para restauração de superfícies com ambientes internos. Rendimento: Galão: 25m² a 35m² por 06992 400ML/250GR

UN

05778

GALÃO 3,6 LITROS

GL

trincas.

demão / Quarto: 6m² a 9m² por demão.

COMPLEMENTOS PARA PINTURA • SOLVENTES • CORANTES • TEXTURAS • TINTAS IMOBILIÁRIAS E COMPLEMENTOS • VERNIZ E COMPLEMENTOS PARA MADEIRA 114

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

PINTURA

SELA-TRINCA RESTAURAÇÃO

SUPER GALVIT

ZARCÃO VERM. FC - 990

ÁGUARRÁS MINERAL

Cód. Ref.

Un.

04452

3,6 LITROS

GL

Cód. Ref.

Un.

00222

3,6 LITROS

GL

Cód. Ref.

Un.

É um produto formulado à base de resina acrílica,

00223

900 ML

QT

00549

0,900 ML

QT

indicado para vedação de trincas em superfícies de

00550

3,6 LTS

GL

alvenaria, concreto ou fibrocimento com dimensões

Super Galvite. Alquídico, é um fundo especial, indicado

00551

18 LITROS

LA

de até 10mmX10mm. Apresenta repelência à água,

para promover aderência sobre superfícies de aço

alto poder de enchimento, ótima aderência e de fácil

galvanizado e chapas zincadas, canaletas, condutores,

Tinta anticorrosiva de fácil aplicação e secagem rápida,

aplicação. É um produto flexível, que acompanha o

calhas, rufos, chapas lisas e onduladas, painéis de

possui ação inibidora do processo de corrosão. Indicada

movimento de dilatação e retração das superfícies que

propaganda, etc. Previne o descascamento da tinta e

para proteção de superfícies internas e externas e metais

Cód. Ref.

Un.

causam as pequenas trincas e fissuras. Rendimento:

garante longa durabilidade ao acabamento final. Indicado

ferrosos como implementos agrícolas, equipamentos,

05292

900 ML

UN

Galão: 2 m² a 3 m² para trincas com 10mm x 10mm.

também para superfícies de alumínio.

pontes, etc. Indicada para o uso em serralherias.

05293

5 LITROS

UN

METALATEX ÁGUARRÁS

QUEROSENE

THINNER ACABAMENTO

THINNER COMUM MULTIUSO

Cód. Ref.

Un.

05918 7110033

QT

Solvente alifático indicado para diluição de esmaltes

sintéticos, vernizes, tinta a óleo, e complementos a base

de resinas alquídicas. Também usado para retirada dos

resíduos de tinta dos materiais utilizados em pinturas

Cód. Ref.

Un.

Cód. Ref.

Un.

com produtos base solvente. Tem como principal atributo

Cód. Ref.

Un.

05331

900 ML

UN

05411

900 ML

UN

o baixo odor, diferenciado-se dos produtos similares

05264

900 ML

UN

05265

5 LITROS

UN

05309

5 LITROS

UN

disponíveis no mercado.

05358

5 LITROS

UN

07664

18 LITROS

LA

07665

18 LITROS

LA

PEDIDO

Nossos representantes

vão até sua loja, avaliam

as demandas e fecham

o pedido pelo tablet.

CENTRAL DE RELACIONAMENTO • 27 3089.3888

115

PINTURA

CORANTE XADREZ AMARELO 50ML

PÓ XADREZ AMARELO - 250/500G

METALATEX TEXTURA LISO

NOVACOR TEXTURA RÚSTICA

Cód. Ref.

Un.

00640

LA

Cód. Ref.

Un.

03100

LA

É um produto à base de resina acrílica que possui em sua

06021

GL

composição partículas grandes de quartzo, possibilitando

um efeito de ranhuras. Proporciona efeitos decorativos,

É um produto levemente encorpado com excelentes

corrige pequenas imperfeições e tem grande resistência

propriedades de resistência. Proporciona belo efeito

à abrasão. É indicada para superfícies externas e internas

Rendimento: 50g por m² a 200g m² por demão decorativo em superfícies de alvenaria, blocos de de reboco, blocos de concreto, fibrocimento, concreto Rendimento: 1 bisnaga por Galão de 3,6L de tinta por

dependendo da cor desejada. Está com sua validade

concreto ou reboco. Indicada para ambientes internos,

aparente e repinturas sobre PVA e Acrílico. Rendimento:

demão. Está com sua validade estendida em 1 ano. Com

estendida em 1 ano. Com isso, a validade deste produto

podendo ser aplicada em ambientes externos desde que

Lata: 20m² a 35m² por demão / Galão: 4m² a 7m² por

isso, a validade deste produto passa de 2 para 3 anos.

passa de 2 para 3 anos.

com duas demãos de tinta acrílica como acabamento.

demão.

Mais de 5 mil produtos e muito mais variedade para sua loja.

www.otimaatacado.com.br

TINTAS SPRAY

CENTRAL DE RELACIONAMENTO • 27 3089.3888

116

PINTURA

METALATEX REQUINTE SUPERLAVÁVEL -

METALATEX LITORAL ACRÍLICO - RED

METALATEX ELASTIC - RED MIX E COLOR

METALATEX BACTERCRYL

RED MIX E COLOR

MIX E COLOR

Sua fórmula inovadora garante que a tinta não manche e

É uma tinta acrílica com acabamento acetinado, indicada

MetaLatex LITORAL SEM CHEIRO é uma tinta de alta

nem escorra em, no máximo 30 minutos após a

principalmente para ambientes que necessitem de limpeza

qualidade à base de resina acrílica e acabamentos aplicação, mesmo com a atuação de fatores climáticos É uma tinta acrílica com fórmula inovadora, recomendada

frequente, como corredores, quartos de criança, salas de

acetinado e fosco, indicada para áreas externas e internas

como a chuva, pingos de água e orvalho. Pode ser

para banheiros, cozinhas, adegas, saunas, lavanderias,

jantar, salas de aula, entre outros. Sua fórmula exclusiva

ou para aplicação em superfícies que apresentem aplicado em dias úmidos. Secagem rápida, resistente garagens, telhas de fibrocimento, indústrias, hospitais,

facilita a remoção de manchas na pintura causadas por

umidade excessiva, pois contém poderoso algicida e

à chuva após 30 minutos de sua aplicação. Excelente

hotéis, câmaras frias, restaurantes etc., ou seja,

alimentos, bebidas, lápis de cores, marcas de dedos,

antimofo. Mantém as cores firmes por mais tempo e não

cobertura e rendimento. Ambiente externos pintados sem

ambientes externos e internos propensos a umidade

etc.,mantendo o efeito decorativo das superfícies pintadas

desbota, pois resiste à ação do sol pela exposição aos

preocupação com o clima. Mais agilidade na finalização

e vapores. Excelente na prevenção da proliferação

após a limpeza. Rendimento: Lata: 225m² a 325m² por

raios U.V. Rendimento: Lata: 225m² a 325m² por demão /

da obra. Reduz os riscos de prejuízos no caso de chuva.

de fungos e mofo, pois contém poderoso fungicida.

demão / Galão: 45m² a 65m² por demão.

Galão: 45m² a 65m² por demão.

Alta durabilidade. Resistente ao desbotamento.

Rendimento: Lata: 225m² a 325m² por demão.

METALATEX ECO TELHA

NOVACOR PISO MAIS RESISTENTE

NOVACOR PISO ULTRA

NOVACOR AZULEJO ACETINADO

É uma tinta acrílica muito prática, especialmente

MetaLatex ECO TELHA TÉRMICA é o primeiro produto

É uma tinta à base de resina acrílica, antiderrapante,

desenvolvida para possibilitar a mudança e a renovação

do mercado que além de colorir e proteger, mantém

indicada para aplicação em superfícies que necessitem de

das cores de azulejos e pastilhas sem reformas.

sua casa mais fresca no verão e quente no inverno,

É uma tinta à base de resina acrílica especial para

grande resistência ao tráfego de pessoas e automóveis,

Proporciona alta aderência na superfície, além de um

promovendo sensação de conforto térmico no ambiente.

pisos cimentados, mesmo que já tenham sido pintados

como pisos cimentados de estacionamentos, garagens,

ótimo rendimento. Sua nova fórmula deve ser diluída

No verão reflete a energia solar mantendo sua casa com

anteriormente. Indicada para quadras poliesportivas, quadras esportivas, etc. Sua fórmula permite resistência somente com água, o que evita gastos adicionais com

temperatura mais amena, e no inverno transfere a energia

demarcação de garagens, pisos comerciais, áreas de

a produtos de limpeza, gasolina, graxas e óleos, podendo

diluentes químicos, além de ser menos agressiva ao

absorvida pela telha para o ambiente interno, mantendo

recreação, etc. Tem grande poder de cobertura e alta

ser aplicada em pisos de postos de gasolina, oficinas

meio ambiente. É recomendada para paredes internas e

sua casa mais aquecida. É uma tinta que além de ser à

durabilidade. Por isso, é muito resistente ao tráfego de

mecânicas, entre outros. Possui excelente durabilidade,

externas azulejadas de cozinhas, banheiros e lavanderias

base d’água, ter secagem rápida e excelente rendimento,

pessoas, carros e intempéries quando aplicada sobre

grande poder de cobertura e acabamento semibrilho.

de residências ou estabelecimentos comerciais e

reduz o consumo de energia pelo uso de ventiladores e

superfícies corretamente preparadas e conservadas. Rendimento: Lata: 150m² a 200m² por demão / Galão: industriais, não havendo a necessidade de mão de obra

condicionadores de ar. Rendimento: Lata: 140m² a 180m²

Rendimento: Lata: 350m² por demão / Galão: 70m² por

30m² a 40m² por demão / Quarto (900ml): 7,5m² a 10m²

especializada para a sua aplicação. Rendimento: Galão:

por demão / Galão:30m² a 40m² por demão.

demão / Quarto (900ml) 17,5m² por demão.

por demão.

40m² a 50m² por demão.

NOVACOR EPOXI

METALATEX ACRÍLICO E SEMIBRILHO -

NOVACOR ACRÍLICO COBRE MAIS RED

NOVACOR EXTRA ACRÍLICA RED MIX E

RED MIX E COLOR

MIX E COLOR

COLOR

Novacor Cobre Mais é uma tinta acrílica standard sem

cheiro com alto poder de cobertura. Proporciona o

rendimento ideal, na medida certa, para quaisquer

ambientes, garantindo ótimo rendimento e desempenho,

já que se trata de um produto de ótima qualidade e com

É uma tinta acrílica Premium, que além da excelente

ausência de odor. • Por garantir um acabamento fosco,

Tinta epóxi à base d’água, de grande resistência e

cobertura, da alta resistência e durabilidade, secagem

disfarça eventuais imperfeições da superfície, deixando

durabilidade, de secagem rápida, com acabamento rápida e ótimo rendimento, reforça o compromisso e o ambiente mais elegante e os retoques na pintura

NOVACOR PAREDE ACRÍLICO SEM CHEIRO é uma tinta

brilhante, desenvolvida especialmente para aplicação em

respeito da Sherwin-Williams com o meio ambiente.

ficam imperceptíveis. • Assim, o produto oferece um

acrílica indicada para exteriores e interiores que, em

pisos, vidros, metais e azulejos em banheiros, cozinhas,

Desenvolvida com matérias-primas de alta tecnologia,

acabamento impecável para o ambiente, com bom custo-

sua nova formulação, apresenta 30% mais rendimento.

lavanderias e outras.Possui alta resistência à limpeza

sua formulação permite que a pintura seja feita em

benefício, pois reduz o investimento em mão de obra

Além de ser sem cheiro, permite que a pintura seja feita

frequente e umidade. Possui o diferencial de ser um

áreas internas ocupadas, garantindo que o ambiente

especializada e o consumo de tinta, além de proporcionar

em áreas internas ocupadas e garante que o ambiente

produto monocomponente (pronto para uso) e de baixo

fique sem cheiro* em até três horas após aplicação.

a utilização do ambiente em menor tempo. Rendimento:

fique sem cheiro em até 3 horas após aplicação.

odor por ser à base d’água. Rendimento: Galão (3,6L):

Rendimento: Galão: 45m² a 65m² por demão / Lata:

Galão: 60 a 76m² por demão Lata: 300 a 380m² por

Rendimento: Lata: 200m² a 300m² por demão / Galão:

40m² a 50m² por demão.

225m² a 325m²por demão.

demão. DISPONÍVEL NAS BASES: E e F.

40m² a 60m² por demão.

CENTRAL DE RELACIONAMENTO • 27 3089.3888

117

PINTURA

DURAPLAST ACRÍLICA

KEM TONE ACRÍLICA

METALATEX ESMALTE

METALATEX ECO ESMALTE RED MIX E

COLOR

Alquídico, com sua fórmula inovadora e de altíssima

É uma tinta à base de resina acrílica modificada, À base d’água é uma tinta com ótimo poder de cobertura qualidade proporciona um baixo odor e belíssimo A base d´água é uma tinta com ótimo poder de cobertura indicada para áreas internas e externas, resistente à

e de fino acabamento, que proporciona embelezamento

acabamento para superfícíes externas e internas de

e de fino acabamento, que proporciona embelezamento

água e intempéries, podendo ser aplicada sobre reboco,

e proteção de superfícies externas e internas de metais,

madeira, metais, cerâmicas, vimes etc. Para manter

e proteção de superfícies externas e internas de metais,

massa corrida ou acrílica, concreto, fibrocimento, gesso

madeiras, vimes, entre outras. Sua fórmula exclusiva não

o baixo odor do esmalte, é necessário a diluição com

madeiras, vimes entre outras. Sua fórmula exclusiva não

e repinturas, mesmo que já tenham sido pintadas com

deixa a cor branca amarelar e garante uma secagem ultra

Metalatex Aguarrás baixo odor. Alta durabilidade. Galão

deixa a cor branca amarelar e garante uma secagem ultra

tinta látex. Produto de fácil aplicação e ótima cobertura.

rápida, baixo odor, fácil aplicação e o maior brilho da

(3,6L) = 40m² a 55m² / demão. Galão (3,2L) = 35m² a

rápida, baixo odor, fácil aplicação e o maior brilho da

Rendimento: Lata: 150 m² a 225 m² por demão / Galão:

categoria. Rendimento: Galão: 40m² a 55m² por demão

48m². Quarto (900ml) = 10m² a 14m² / demão. Quarto

categoria. Rendimento: Galão: 40 m² a 55 m² por demão /

30 m² a 45 m² por demão. m² a 45 m² por demão.

/ Quarto (900ml): 10m² a 13m² por demão.

(800ml) = 9m² a 12m².

Quarto (900ml): 10 m² a 13 m² por demão.

NOVACOR ESMALTE ACETINADO

METALATEX ECO FUNDO PREPARADOR

METALATEX FUNDO PREPARADOR DE

NOVACOR FUNDO ANTIFERRUGEM

PAREDE

Novacor Esmalte Sintético é um produto de alta

qualidade, recomendado para uso em ambientes externos

É um produto acrílico à base d’água, de alto poder de

Produto à base de resina acrílica e solventes alifático pronto e internos. Possui fácil aplicação, ótima secagem e alto

penetração, especialmente desenvolvido para tratar para uso, que dispensa diluição, possui alto poder de rendimento, podendo ser aplicado em metais, madeiras,

as superfícies de alvenaria arenosas, calcinadas que

penetração e baixíssimo odor. Especialmente desenvolvido

vimes, etc., formando uma película aderente e flexível

possuem restos de cal, reboco fraco, tinta velha e/ou

para tratar as superfícies de alvenaria arenosas, calcinadas de grande resistência a intempéries, óleos, graxas e

descascadas, como também fibrocimento, gesso etc.

que possuem restos de cal, reboco fraco, tinta velha e/

Tinta anticorrosiva para aplicação em superfícies de

gorduras. Rendimento: Galão: 40m² a 55m² por demão

Rendimento: Lata (18L): 175m² a 275m² por demão.

ou descascadas, como também fibrocimento e gesso.

ferro ou aço que, assim como o zarcão, protege contra a

/ Quarto: 10m² a 14m² por demão / 1/16 Galão (225ml):

Galão (3,6L): 35m² a 55m² por demão. Quarto (900ml):

Rendimento: Lata (18L): 200m² a 250m² por demão. Galão

ferrugem. Rendimento: Galão (3,6L): 30 a 40 m²/ demão.

2,5m² a 3,5m² por demão.

9m² a 14m² por demão.

(3,6L): 40m² a 55m² por demão.

¼ de galão(900ml): 7,5 a 10 m² / demão.

SUPER ADERE FUNDO BRILHANTE

NOVACOR FUNDO FOSCO

NOVACOR GESSO E DRYWALL

NOVACOR MASSA A ÓLEO

Tinta à base de emulsão acrílica desenvolvida especialmente Super Adere é um fundo promotor de aderência

para aplicação direta sobre gesso e drywall (gesso

acrílico à base d’água, de alto poder de penetração,

É uma tinta de fundo, elaborada para a preparação

acartonado), proporcionando efeito decorativo e de proteção especialmente desenvolvido para dar resistência e de superfícies de madeira em ambientes exteriores e à superfície. Também pode ser aplicado em superfícies

É um produto à base de resina alquídica longa em óleo,

flexibilidade às superfícies de baixa porosidade e aos

interiores, selando os poros e oferecendo boa base de

internas de reboco e massa corrida. Principais atributos:

é ideal para correção de imperfeições e nivelamento de

mais variados substratos tais como: concreto, reboco,

adesão às demãos de acabamento. Rendimento: Galão

Fixa partículas solta, tem ótima aderência e possui secagem superfícies de madeira, preparando-as para as demãos

emboço e outros. Rendimento: Galão (3,6L): 15 m² a

(3,6L)- 28m² a 40m² / demão. Quarto (900ml)- 7m² a

rápida. Rendimento: Lata (18L): 150m² a 225m² por demão.

de acabamento. Rendimento: Galão (3,6L): 8m² a 12m² /

25m² por demão.

10m² / demão.

Galão (3,6L): 30m² a 45m² por demão.

demão. Quarto (900ml): 2m² a 3m² / demão.

118

CENTRAL DE RELACIONAMENTO • 27 3089.3888

Proteção e acabamento par

Proteção e acabamento para madeira

CURTA

SIGA

VEJA

ASSISTA

Osmocolor Mon

®

tana

A proteção que sua madeira merece

Osmocolor Stain possui um acabamento

hidrorrepelente que penetra nas fibras,

formando uma película muito fina com

=

o poder de acompanhar os movimentos

da madeira.

Osmocolor Stain não descasca,

possibilitando renovações mais fáceis,

sem a remoção da película anterior.

ALTO RENDIMENTO

CASTANHO

TRANSPARENTE

NATURAL

MOGNO

IMBUIA

CASTANHEIRA

UV DECK

900 ml

536393

332380

333182

333433

332453

333026 900 ml

3,6 litros

537004

537055

537012

537020

537039

537047 3,6 litros

Pentox® Montana

Pentox®Cupim

Depois de Pentox os cupins

aerossol

vão passar longe da sua casa

Imunizante, com excelente poder de

Com bico injetor especial, é

indicado para o combate ao

fixação e longo efeito residual contra

ataque localizado de brocas e

cupins e brocas.

cupins em peças de madeira.

3,6 litros

900 ml 400 ml spray

010820

010324

010332

Striptizi® Montana

Nunca foi tão fácil voltar ao original

Remove facilmente esmaltes, texturas,

stains, vernizes e seladores de base

alquídica, nitrocelulósica, acrílica,

poliuretânica e epóxi de uso imobiliário.

Em forma de gel, fixa-se nas superfícies

verticais sem escorrer.

4kg

1kg

536369

536377

Mazza® Montana

Restauração que é massa

BRANCO

CEREJEIRA

IMBUIA

A Mazza acrílica da Montana foi

especialmente formulada para o reparo de

imperfeições e nivelamento de superfícies

de madeira. Pode ser aplicada em móveis,

220g

536342

536326

536300

em lambris, para calafetar tacos e

assoalhos de madeira, compensados e em

1,6kg

536334

536318

536296

marcenaria em geral.

www.montana.com.br

PINTURA

METALATEX ECO RESINA

NOVACOR RESINA IMPERMEABILIZANTE

METALATEX VERNIZ ACRÍLICO PARA

OSMOCOLOR STAIN UV DECK

IMPERMEABILIZANTE

PEDRAS

Osmocolor Stain Castanho UV Deck é ideal para áreas

como decks de piscina, móveis de jardim, cercas e

pergolados, pois oferece proteção para superfícies que

Produto desenvolvido para proteger e realçar a tonalidade

sofrem intensa exposição aos raios ultravioleta, além de

natural de superfícies porosas como: pedras naturais

Produto acrílico com acabamento brilhante, que protege

Sua película incolor semi-brilhante resiste à umidade,

dar à madeira um tom nobre. Osmocolor já é sinônimo

(ardósia, pedra mineira, pedra goiana etc.), concreto

e realça a tonalidade natural de superfícies porosas

sol, chuva e proliferação de fungos, protege e embeleza

de qualidade e possui registro no IBAMA como stain

aparente, telhas de barro ou fibrocimento, tijolo aparente, como pedras naturais tijolo aparente, cerâmicas e piso

superfícies de concreto e bloco aparente, tijolo à vista,

preservativo, o que comprova sua ação prolongada e

cerâmicas. Rendimento: Lata (18L): 175m² a 275m²

cimentado e sobre superfícies pintadas com Novacor

pedra mineira e ardósia (em paredes) etc. Rendimento:

eficiente na proteção contra fungos que mancham e

por demão.Galão (3,6L): 35m² a 55m² por demão.

Piso já curada. Rendimento: Lata (18L): 145 m² a 180 m²

Lata (18L): 150m² a 225m² por demão. Galão (3,6L):

diminuem a vida útil da madeira. Rendimento: Balde de

Quarto:(900ml): 9m² a 14m² por demão.

por demão. Galão (3,6L): 30m² a 40 m² por demão.

30m² a 45m² por demão.

18L, Galão de 3,6L e Lata de 900ml

OSMOCOLOR STAIN ST NATURAL

OSMOCOLOR STAIN TRANSPARENTE

VERNIZ ISOLARE

SW VERNIZ PREMIUM

Algumas madeiras comumente utilizadas, como o Ipê,

Osmocolor Stain Natural UV Gold oferece proteção Osmocolor Stain Transparente é excelente para dar nó de Pinus, Grapia, Itaúba e o Cumaru, produzem especial para superfícies submetidas à intensa exposição

acabamento com alta transparência em superfícies sob

uma resina natural que pode manchar e comprometer

de luz solar como portões, portas, pergolados, beirais

média exposição solar como varandas, gazebos, lambris

o acabamento. Para isso não acontecer, a solução é o

Produto à base de resina alquídica, de ultra ação, sendo

etc, pois possui duplo filtro solar. Osmocolor Stain já é

de forros e beirais. Osmocolor já é sinônimo de qualidade

Isolare , verniz isolante e penetrante para tratamento

o produto ideal para proporcionar o melhor aspecto

sinônimo de qualidade e possui registro no IBAMA como

e possui registro no IBAMA como stain preservativo,

de madeiras resinosas . Por ser 100% incolor , realça

decorativo e de proteção para superfícies de madeira,

stain preservativo, o que comprova sua ação prolongada

o que comprova sua ação prolongada e eficiente na

a tonalidade natural da madeira e ainda garante um

oferecendo como diferencial o fato de ser o único produto

e eficiente na proteção contra fungos que mancham e

proteção contra fungos que mancham e diminuem a vida

acabamento final nobre e acetinado quando utilizado

com baixo odor de sua categoria. Rendimento: Galão

diminuem a vida útil da madeira. Rendimento: Lata de

útil da madeira. Rendimento: Lata de 18L, Galão de 3,6L

em ambientes internos. Rendimento: Galão de 3,6L e

(3,6L): 50m² a 65m² por demão. ¼ galão (900ml):

18L, Galão de 3,6L e Lata de 900ml

e Lata de 900ml.

Lata de 900ml

12m² a 16m² por demão.

VERNIZ COPAL

VERNIZ FILTRO SOLAR

VERNIZ MARÍTIMO

MASSA PARA MADEIRA

Cód. Ref.

Un.

05779

220GR BRANCA

UN

05781

220GR CEREJEIRA

UN

05784

220GR IMBUIA

UN

05782

220GR IPÊ

UN

Produto a base de resina alquídica, desenvolvido para

05780

220GR MARFIM

UN

dar acabamento e proteção principalmente a superfícies

05783 220GRMOGNO

UN

externas e internas de madeira. É resistente à ação

O Verniz Marítimo Sherwin-Williams é um produto à base

nociva de raios ultravioleta sobre a madeira, além de

de resina alquídica indicado para realçar e enobrecer as

É comum aparecerem pequenas trincas e rachaduras

Produto a base de resina alquídica para dar acabamento a

proporcionar maior proteção contra os efeitos da chuva e

superfícies de diversos tipos de madeira. Sua variedade

superficiais em móveis antigos e esquadrias de

superfícies de madeira em ambientes internos. É fácil de

da maresia, dando uma durabilidade superior à superfície.

de cores e de acabamentos (fosco ou brilhante) permite

madeira. Também é comum, com o tempo, que parte da

aplicar, proporciona bom nivelamento e rápida secagem.

Sua variedade de cores e de acabamentos (acetinado ou

combinações com diversos estilos de decoração, calafetação original descole e deixe acumular poeira nas Seu acabamento é brilhante, o que realça as superfícies

brilhante) permite combinações com diversos estilos de

proporcionando ambientes diferenciados. É resistente

frestas dos assoalhos. A solução para esses pequenos

de madeira, sem alterar a sua cor original, pois é incolor.

decoração, proporcionando ambientes diferenciados. ao atrito e às intempéries, sendo uma ótima opção tanto problemas é prática, rápida, ecológica e de baixo custo:

Rendimento: Galão (3,6L): 35m² a 45m² por demão.

Rendimento: Galão (3,6L): 40m² a 60m² por demão. ¼

para áreas internas como externas. Rendimento: Galão

Mazza, massa acrílica base água e com baixo odor.

¼ galão (900ml): 9m² a 11m² por demão.

galão (900ml): 10m² a 15m² por demão.

(3,6L): 38m² a 50m² por demão.

Rendimento: Baldes de 1,6kg e 6,4kg, e bisnaga de 220g.

CENTRAL DE RELACIONAMENTO • 27 3089.3888

121

PINTURA

METALATEX ECO FUNDO BRANCO FOSCO PARA MADEIRA

METALATEX ECO MASSA NÍVELADORA PARA MADEIRA

É um produto voltado para o bem-estar de quem a usa e do meio ambiente. Sua fórmula exclusiva não utiliza aguarrás É um produto voltado para o bem-estar de quem a usa e do meio ambiente. Sua fórmula exclusiva não utiliza aguarrás como solvente, fazendo com que o seu grande diferencial seja o baixo odor durante a aplicação. Por ser à base d’água, como solvente, fazendo com que o seu grande diferencial seja o baixo odor durante a aplicação. Por ser à base d’água, facilita a limpeza e a reutilização de pincéis, rolos, desempenadeiras e espátulas. Rendimento: Galão (3,6L): 35m² a 50m²

facilita a limpeza e a reutilização de pincéis, rolos, desempenadeiras e espátulas. Rendimento: Galão (3,6L): 8m² a 12m²

por demão. Quarto (900ml): 9m² a 13m² por demão.

por demão. Quarto (900ml): 2m² a 3m² por demão.

Nossa frota própria

garante a entrega

sempre a tempo.

122

CENTRAL DE RELACIONAMENTO • 27 3089.3888

PINTURA

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

ALTA TEMPERATURA

ALUMEN

ARTE URBANA

DECOR

É uma tinta acrílica em aerossol especialmente

É uma tinta acrílica em spray, de secagem rápida,

desenvolvida para os diversos estilos de arte urbana, com

É uma linha de produtos formulados com resinas

com excelente poder de cobertura e alta resistência às

pigmentos de qualidade que garantem maior durabilidade

acrílicas de secagem rápida, que garantem ótimo

É uma tinta em spray especialmente desenvolvida para

intempéries. Especialmente formulada para pintura de

da cor, além de uma cobertura superior. Tem mais de 48

acabamento e grande durabilidade. Possui ótimo poder

pintura de partes externas de objetos ou superfícies

alumínio anodizado, alumínio comum (sem tratamento)

cores diferenciadas, bico mais anatômico e tecnologia

de cobertura, resistência às intempéries e excelente

metálicas, expostas às altas temperaturas, apresentando

e não polido. Pode ser utilizada em áreas externas e

para maior controle da pressão. Pode ser usada em

efeito decorativo. Pode ser usado em ambientes

resistência a até 600°C. Rendimento: 1,0 m² a 1,2 m² por

internas. Rendimento: 1,0 m² a 1,2 m² por embalagem,

áreas externas e internas. Rendimento: de acordo com a

internos ou externos. Rendimento: 1,6 m² a 2,1 m² por

embalagem, por demão.

por demão.

quantidade aplicada.

embalagem, por demão.

DECOR VERNIZ PARA USO GERAL

ESMALTE SINTÉTICO BRANCO FOSCO

LUMINOSA

METALIK EXTERIOR

É uma tinta acrílica em spray, com uma bela seleção

de cores, que proporciona um efeito luminoso com

É uma tinta em spray anticorrosiva que proporciona

É uma tinta em spray resistente às intempéries, com

a incidência da luz. É indicada para uso interno e

efeitos metálicos para decorar e embelezar objetos.

É um verniz em spray indicado para acabamento sobre as

excelente acabamento, alto rendimento, secagem rápida

pode ser usada na decoração de vitrines, salões,

Apresenta secagem rápida e excelente acabamento. Pode

cores do Colorgin Decor Spray. Rendimento: 1,6 m² a 2,1

e fácil aplicação. Rendimento: 1,1 m² a 1,3 m² por

artesanatos, etc. Rendimento: 1,0 m² a 1,2 m² por

ser usada em ambientes externos e internos. Rendimento:

m² por embalagem, por demão.

embalagem, por demão.

embalagem, por demão.

1,2 m² a 1,4 m² por embalagem, por demão.

METALIK INTERIOR

COLORGIN PLÁSTICO

SUPER GALVITE

USO GERAL

Cód. Ref.

Un.

04523

TB

Cód. Ref.

Un.

00039

TB

É uma tinta em spray com alta tecnologia, que É um fundo especial com coloração branco gelo fosco, É uma tinta acrílica em spray, especialmente desenvolvida

proporciona total e permanente aderência, dispensando

indicado para promover aderência. Este produto não

É uma tinta acrílica em spray de secagem rápida, alta

para proporcionar efeitos metálicos que valorizam o uso de primer ou fundo especial. Pode ser usado em precisa ser diluído e deve ser aplicado diretamente sobre

resistência, ótimo rendimento e grande variedade de cores,

objetos artesanais e decorações internas. Rendimento:

superfícies externas e internas. Rendimento: 1,1 m² a 1,3

a superfície. Rendimento: 1,4 m² a 1,7 m², por para reparos, pinturas e decoração de objetos em geral.

1,2 m² a 1,5 m² por embalagem, por demão.

m² por embalagem, por demão.

embalagem, por demão.

Rendimento: 1,8 m² a 2,3 m² por embalagem, por demão.

SPRAYS

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

123

PRODUTOS SHERWIN-WILLIAMS

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

CÓDIGO

BASES CORANTES SISTEMA

EMBALAGEM

03673

METALATEX LITORAL ACRILICO ACETINADO - BASE Z

GL 3,2 LTS

03674

METALATEX LITORAL ACRILICO ACETINADO - BASE Z

LATA 16 LTS

02525

CORANTE SISTEMA TINTOMETRICO BLACK

QUARTO 0,946 ML

01434

METALATEX TEXTURA RELEVO - BASE ZW - LATA 14 LITROS

LATA 14 LTS

02524

CORANTE SISTEMA TINTOMETRICO BLUE

QUARTO 0,946 ML

06900

NOVACOR COBRE MAIS - BASE E

GL 3,2 LTS

02528

CORANTE SISTEMA TINTOMETRICO DEEP GOLD

QUARTO 0,946 ML

06901

NOVACOR COBRE MAIS - BASE E

LATA 16 LTS

02532

CORANTE SISTEMA TINTOMETRICO GREEN

QUARTO 0,946 ML

06902

NOVACOR COBRE MAIS - BASE F

GL 3,2 LTS

02531

CORANTE SISTEMA TINTOMETRICO MAGENTA

QUARTO 0,946 ML

06903

NOVACOR COBRE MAIS - BASE F

LATA 16 LTS

02526

CORANTE SISTEMA TINTOMETRICO MARROM

QUARTO 0,946 ML

05675

NOVACOR EPOXI - BASE E

GL 3,2 LTS

02529

CORANTE SISTEMA TINTOMETRICO RAW UMBER

QUARTO 0,946 ML

01472

NOVACOR EXTRA ACRÍLICA ACETINADO - BASE E

GL 3,2 LTS

02533

CORANTE SISTEMA TINTOMETRICO RED

QUARTO 0,946 ML

01473

NOVACOR EXTRA ACRÍLICA ACETINADO - BASE E

LATA 16 LTS

02530

CORANTE SISTEMA TINTOMETRICO WHITE

QUARTO 0,946 ML

01474

NOVACOR EXTRA ACRÍLICA ACETINADO - BASE F

GL 3,2 LTS

02527

CORANTE SISTEMA TINTOMETRICO YELLOW

QUARTO 0,946 ML

01475

NOVACOR EXTRA ACRÍLICA ACETINADO - BASE F

LATA 16 LTS

02513

METALATEX ACRILICO FOSCO - BASE LY

GALÃO 3,2 LTS

01467

NOVACOR EXTRA ACRÍLICA FOSCO - BASE E

GL 3,2 LTS

02514

METALATEX ACRILICO FOSCO - BASE LY

LATA 16 LTS

01468

NOVACOR EXTRA ACRÍLICA FOSCO - BASE E

LATA 16 LTS

02512

METALATEX ACRILICO FOSCO - BASE LY

QUARTO 0,800 ML

01466

NOVACOR EXTRA ACRÍLICA FOSCO - BASE E

QUARTO 0,800 ML

02510

METALATEX ACRILICO FOSCO - BASE VY

GALÃO 3,2 LTS

01470

NOVACOR EXTRA ACRÍLICA FOSCO - BASE F

GL 3,2 LTS

02511

METALATEX ACRILICO FOSCO - BASE VY

LATA 16 LTS

01471

NOVACOR EXTRA ACRÍLICA FOSCO - BASE F

LATA 16 LTS

02509

METALATEX ACRILICO FOSCO - BASE VY

QUARTO 0,800 ML

01469

NOVACOR EXTRA ACRÍLICA FOSCO - BASE F

QUARTO 0,800 ML

01423

METALATEX ACRILICO FOSCO - BASE W

GALÃO 3,2 LTS

01462

NOVACOR EXTRA ACRÍLICA SEMIBRILHO - BASE E

GL 3,2 LTS

01426

METALATEX ACRILICO FOSCO - BASE W

LATA 16 LTS

01463

NOVACOR EXTRA ACRÍLICA SEMIBRILHO - BASE E

LATA 16 LTS

01420

METALATEX ACRILICO FOSCO - BASE W

QUARTO 0,800 ML

01464

NOVACOR EXTRA ACRÍLICA SEMIBRILHO - BASE F

GL 3,2 LTS

01421

METALATEX ACRILICO FOSCO - BASE XY

GALÃO 3,2 LTS

01465

NOVACOR EXTRA ACRÍLICA SEMIBRILHO - BASE F

LATA 16 LTS

01424

METALATEX ACRILICO FOSCO - BASE XY

LATA 16 LTS

01477

NOVACOR TEXTURA RELEVO - BASE E

LATA 14 LTS

01418

METALATEX ACRILICO FOSCO - BASE XY

QUARTO 0,800 ML

01479

NOVACOR TEXTURA RÚSTICA - BASE E

LATA 14 LTS

01422

METALATEX ACRILICO FOSCO - BASE Z

GALÃO 3,2 LTS

01478

NOVACOR TEXTURA RÚSTICA - BASE F/H

LATA 14 LTS

01425

METALATEX ACRILICO FOSCO - BASE Z

LATA 16 LTS

01419

METALATEX ACRILICO FOSCO - BASE Z

QUARTO 0,800 ML

CÓDIGO

CORANTE LÍQUIDO - XADREZ

EMBALAGEM

02522

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE LY

GALÃO 3,2 LTS

00053

CORANTE XADREZ AMARELO

50 ML

02523

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE LY

LATA 16 LTS

00054

CORANTE XADREZ AZUL

50 ML

02521

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE LY

QUARTO 0,800 ML

07531

CORANTE XADREZ BRANCO

50 ML

02519

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE VY

GALÃO 3,2 LTS

00055

CORANTE XADREZ LARANJA

50 ML

02520

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE VY

LATA 16 LTS

00057

CORANTE XADREZ MARROM

50 ML

02518

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE VY

QUARTO 0,800 ML

00056

CORANTE XADREZ OCRE

50 ML

01429

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE W

GALÃO 3,2 LTS

00058

CORANTE XADREZ PRETO

50 ML

01432

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE W

LATA 16 LTS

00060

CORANTE XADREZ VERDE

50 ML

02516

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE W

QUARTO 0,800 ML

00059

CORANTE XADREZ VERMELHO

50 ML

01427

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE XY

GALÃO 3,2 LTS

00630

CORANTE XADREZ VIOLETA

50 ML

01430

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE XY

LATA 16 LTS

02517

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE XY

QUARTO 0,800 ML

CÓDIGO

GLOBO FIX - FIXADOR DE CAL

EMBALAGEM

01428

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE Z

GALÃO 3,2 LTS

00070

GLOBO FIX - FIXADOR DE CAL

PACOTE 150 ML

01431

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE Z

LATA 16 LTS

02515

METALATEX ACRILICO REQUINTE (ACETINADO) - BASE Z

QUARTO 0,800 ML

CÓDIGO

DURAPLAST

EMBALAGEM

02507

METALATEX ACRILICO SEMIBRILHO - BASE LY

GALÃO 3,2 LTS

00096

DURAPLAST ACRÍLICA BRANCO

GALÃO 3,6 LTS

02508

METALATEX ACRILICO SEMIBRILHO - BASE LY

LATA 16 LTS

00097

DURAPLAST ACRÍLICA BRANCO LATA

LATA 18 LTS

02506

METALATEX ACRILICO SEMIBRILHO - BASE LY

QUARTO 0,800 ML

00101

DURAPLAST ACRÍLICA GELO

LATA 18 LTS

02504

METALATEX ACRILICO SEMIBRILHO - BASE VY

GALÃO 3,2 LTS

04464

DURAPLAST ACRÍLICA RAIO DE SOL

GALÃO 3,6 LTS

02505

METALATEX ACRILICO SEMIBRILHO - BASE VY

LATA 16 LTS

02503

METALATEX ACRILICO SEMIBRILHO - BASE VY

QUARTO 0,800 ML

CÓDIGO

KEM TONE

EMBALAGEM

01414

METALATEX ACRILICO SEMIBRILHO - BASE W

GALÃO 3,2 LTS

00361

KEM TONE ACRÍLICA AMARELO CANARIO

GALÃO 3,6 LTS

01417

METALATEX ACRILICO SEMIBRILHO - BASE W

LATA 16 LTS

00362

KEM TONE ACRÍLICA AMARELO CANARIO

LATA 18 LTS

02501

METALATEX ACRILICO SEMIBRILHO - BASE W

QUARTO 0,800 ML

04369

KEM TONE ACRÍLICA AMARELO SOL

GALÃO 3,6 LTS

01412

METALATEX ACRILICO SEMIBRILHO - BASE XY

GALÃO 3,2 LTS

04370

KEM TONE ACRÍLICA AMARELO SOL

LATA 18 LTS

01415

METALATEX ACRILICO SEMIBRILHO - BASE XY

LATA 16 LTS

00363

KEM TONE ACRÍLICA AREIA

GALÃO 3,6 LTS

02502

METALATEX ACRILICO SEMIBRILHO - BASE XY

QUARTO 0,800 ML

00364

KEM TONE ACRÍLICA AREIA

LATA 18 LTS

01413

METALATEX ACRILICO SEMIBRILHO - BASE Z

GALÃO 3,2 LTS

00365

KEM TONE ACRÍLICA AZUL CEU

GALÃO 3,6 LTS

01416

METALATEX ACRILICO SEMIBRILHO - BASE Z

LATA 16 LTS

00366

KEM TONE ACRÍLICA AZUL CEU

LATA 18 LTS

02500

METALATEX ACRILICO SEMIBRILHO - BASE Z

QUARTO 0,800 ML

04367

KEM TONE ACRÍLICA AZUL HORTENSIA

GALÃO 3,6 LTS

01460

METALATEX ECO ESMALTE ACETINADO - BASE XY

GALÃO 3,2 LTS

04368

KEM TONE ACRÍLICA AZUL HORTENSIA

LATA 18 LTS

01461

METALATEX ECO ESMALTE ACETINADO - BASE Z

GALÃO 3,2 LTS

04375

KEM TONE ACRÍLICA AZUL INDIGO

GALÃO 3,6 LTS

01456

METALATEX ECO ESMALTE ALTO BRILHO - BASE XY

GALÃO 3,2 LTS

04376

KEM TONE ACRÍLICA AZUL INDIGO

LATA 18 LTS

01454

METALATEX ECO ESMALTE ALTO BRILHO - BASE XY

QUARTO 0,800 ML

06566

KEM TONE ACRÍLICA AZUL OCEANO

GALÃO 3,6 LTS

01457

METALATEX ECO ESMALTE ALTO BRILHO - BASE Z

GALÃO 3,2 LTS

06571

KEM TONE ACRÍLICA AZUL OCEANO

LATA 18 LTS

01455

METALATEX ECO ESMALTE ALTO BRILHO - BASE Z

QUARTO 0,800 ML

00367

KEM TONE ACRÍLICA BIANCO SERENO

GALÃO 3,6 LTS

06890

METALATEX ELASTIC ACRILICO ACETINADO - BASE W

GALÃO 3,2 LTS

00368

KEM TONE ACRÍLICA BIANCO SERENO

LATA 18 LTS

06891

METALATEX ELASTIC ACRILICO ACETINADO - BASE W

LATA 16 LTS

00369

KEM TONE ACRÍLICA BRANCO

GALÃO 3,6 LTS

06892

METALATEX ELASTIC ACRILICO ACETINADO - BASE XY

GL 3,2 LTS

00370

KEM TONE ACRÍLICA BRANCO

LATA 18 LTS

06896

METALATEX ELASTIC ACRILICO ACETINADO - BASE XY

LATA 16 LTS

00373

KEM TONE ACRÍLICA CAMURÇA

GALÃO 3,6 LTS

06904

METALATEX ELASTIC ACRILICO ACETINADO - BASE Z

GALÃO 3,2 LTS

00374

KEM TONE ACRÍLICA CAMURCA

LATA 18 LTS

06905

METALATEX ELASTIC ACRILICO ACETINADO - BASE Z

LATA 16 LTS

04371

KEM TONE ACRÍLICA CENOURA

GALÃO 3,6 LTS

01453

METALATEX ESMALTE ACETINADO (BASE SOLVENTE) - BASE W

GL 3,2 LTS

04372

KEM TONE ACRÍLICA CENOURA

LATA 18 LTS

01450

METALATEX ESMALTE ACETINADO (BASE SOLVENTE) - BASE W

QUARTO 0,800 ML

01055

KEM TONE ACRÍLICA ERVA DOCE

GALÃO 3,6 LTS

01448

METALATEX ESMALTE ACETINADO (BASE SOLVENTE) - BASE XY

QUARTO 0,800 ML

01056

KEM TONE ACRÍLICA ERVA DOCE

LATA 18 LTS

01449

METALATEX ESMALTE ACETINADO (BASE SOLVENTE) - BASE Z

QUARTO 0,800 ML

00371

KEM TONE ACRÍLICA GELO

GALÃO 3,6 LTS

01451

METALATEX ESMALTE ACETINADO (BASE SOLVENTE) BASE XY

GL 3,2 LTS

00372

KEM TONE ACRÍLICA GELO

LATA 18 LTS

01445

METALATEX ESMALTE ALTO BRILHO (BASE SOLVENTE) - BASE XY

GL 3,2 LTS

00379

KEM TONE ACRÍLICA MARFIM

GALÃO 3,6 LTS

01442

METALATEX ESMALTE ALTO BRILHO (BASE SOLVENTE) BASE XY

QUARTO 0,800 ML

00380

KEM TONE ACRÍLICA MARFIM

LATA 18 LTS

01446

METALATEX ESMALTE ALTO BRILHO (BASE SOLVENTE) BASE Z

GL 3,2 LTS

00381

KEM TONE ACRÍLICA PALHA

GALÃO 3,6 LTS

03679

METALATEX LITORAL ACRILICO ACETINADO - BASE LY

GL 3,2 LTS

00382

KEM TONE ACRÍLICA PALHA

LATA 18 LTS

03680

METALATEX LITORAL ACRILICO ACETINADO - BASE LY

LATA 16 LTS

00383

KEM TONE ACRÍLICA PEROLA

GALÃO 3,6 LTS

03677

METALATEX LITORAL ACRILICO ACETINADO - BASE VY

GL 3,2 LTS

00384

KEM TONE ACRÍLICA PEROLA

LATA 18 LTS

03678

METALATEX LITORAL ACRILICO ACETINADO - BASE VY

LATA 16 LTS

00387

KEM TONE ACRÍLICA PRETO

GALÃO 3,6 LTS

03675

METALATEX LITORAL ACRILICO ACETINADO - BASE W

GL 3,2 LTS

00388

KEM TONE ACRÍLICA PRETO

LATA 18 LTS

03676

METALATEX LITORAL ACRILICO ACETINADO - BASE W

LATA 16 LTS

06567

KEM TONE ACRÍLICA ROSA AÇAI

GALÃO 3,6 LTS

03671

METALATEX LITORAL ACRILICO ACETINADO - BASE XY

GL 3,2 LTS

06572

KEM TONE ACRÍLICA ROSA AÇAI

LATA 18 LTS

03672

METALATEX LITORAL ACRILICO ACETINADO - BASE XY

LATA 16 LTS

06575

KEM TONE ACRÍLICA VANILLA

LATA 18 LTS

126

CENTRAL DE RELACIONAMENTO • 27 3089.3888 • NA ÓTIMA VOCÊ TEM FACILIDADE DE PAGAMENTO.

PRODUTOS SHERWIN-WILLIAMS

06568

KEM TONE ACRÍLICA VERDE KIWI

GALÃO 3,6 LTS

02607

METALATEX ECO ESMALTE ALTO BRILHO TABACO

QUARTO 0,900 ML

06573

KEM TONE ACRÍLICA VERDE KIWI

LATA 18 LTS

00735

METALATEX ECO ESMALTE ALTO BRILHO VERDE FOLHA

GALÃO 3,6 LTS

04379

KEM TONE ACRÍLICA VERDE LIMAO

GALÃO 3,6 LTS

00736

METALATEX ECO ESMALTE ALTO BRILHO VERDE FOLHA

QUARTO 0,900 ML

04380

KEM TONE ACRÍLICA VERDE LIMAO

LATA 18 LTS

00734

METALATEX ECO ESMALTE ALTO BRILHO VERMELHO

GALÃO 3,6 LTS

04381

KEM TONE ACRÍLICA VERDE PERA

GALÃO 3,6 LTS

02043

METALATEX ECO ESMALTE ALTO BRILHO VERMELHO

QUARTO 0,900 ML

04382

KEM TONE ACRÍLICA VERDE PERA

LATA 18 LTS

CÓDIGO

METALATEX ECO COMPLEMENTOS

EMBALAGEM

00391

KEM TONE ACRÍLICA VERDE PISCINA

GALÃO 3,6 LTS

00392

KEM TONE ACRÍLICA VERDE PISCINA

LATA 18 LTS

00633

METALATEX ECO FUNDO BRANCO FOSCO P/ MADEIRA

GALÃO 3,6 LTS

04383

KEM TONE ACRÍLICA VERMELHO CEREJA

GALÃO 3,6 LTS

00634

METALATEX ECO FUNDO BRANCO FOSCO P/ MADEIRA

QUARTO 0,900 ML

04384

KEM TONE ACRÍLICA VERMELHO CEREJA

LATA 18 LTS

01339

METALATEX ECO FUNDO PREPARADOR DE PAREDES

GALÃO 3,6 LTS

04385

KEM TONE ACRÍLICA VERMELHO RUSTICO

GALÃO 3,6 LTS

01338

METALATEX ECO FUNDO PREPARADOR DE PAREDES

LATA 18 LTS

04386

KEM TONE ACRÍLICA VERMELHO RUSTICO

LATA 18 LTS

01340

METALATEX ECO FUNDO PREPARADOR DE PAREDES

QUARTO 0,900 ML

04387

KEM TONE ACRÍLICA VIOLETA ALFAZEMA

GALÃO 3,6 LTS

00985

METALATEX ECO MASSA NÍVELADORA P/ MADEIRA

GALÃO 3,6 LTS

04388

KEM TONE ACRÍLICA VIOLETA ALFAZEMA

LATA 18 LTS

00631

METALATEX ECO MASSA NÍVELADORA P/ MADEIRA

QUARTO 0,900 ML

CÓDIGO

METALATEX ACRÍLICO FOSCO PERFEITO

EMBALAGEM

00705

METALATEX ECO RESINA IMPERMEABILIZANTE IN

LATA 18 LTS

00703

METALATEX ECO RESINA IMPERMEABILIZANTE IN

QUARTO 0,900 ML

07540

METALATEX ACRILICO FOSCO PERFEITO AMBAR

GALÃO 3,6 LTS

00704

METALATEX ECO RESINA IMPERMEBEABILIZANTE IN

GALÃO 3,6 LTS

07541

METALATEX ACRILICO FOSCO PERFEITO AMBAR

LATA 18 LTS

01336

METALATEX ECO SUPER GALVIT

GALÃO 3,6 LTS

07538

METALATEX ACRILICO FOSCO PERFEITO AMEIXA

GALÃO 3,6 LTS

01337

METALATEX ECO SUPER GALVIT

QUARTO 0,900 ML

07539

METALATEX ACRILICO FOSCO PERFEITO AMEIXA

LATA 18 LTS

CÓDIGO

METALATEX TELHA

EMBALAGEM

00397

METALATEX ACRILICO FOSCO PERFEITO AREIA

GALÃO 3,6 LTS

00398

METALATEX ACRILICO FOSCO PERFEITO AREIA

LATA 18 LTS

04081

METALATEX ECO TELHA TERMICO BRANCO

GALÃO 3,6 LTS

07532

METALATEX ACRILICO FOSCO PERFEITO AVELA

GALÃO 3,6 LTS

04082

METALATEX ECO TELHA TERMICO BRANCO

LATA 18 LTS

07533

METALATEX ACRILICO FOSCO PERFEITO AVELA

LATA 18 LTS

03166

METALATEX ECO TELHA TERMICO CERÂMICA ONIX

GALÃO 3,6 LTS

07534

METALATEX ACRILICO FOSCO PERFEITO AZUL MEDITERRANEO

GALÃO 3,6 LTS

03167

METALATEX ECO TELHA TERMICO CERÂMICA ONIX

LATA 18 LTS

07535

METALATEX ACRILICO FOSCO PERFEITO AZUL MEDITERRANEO

LATA 18 LTS

03164

METALATEX ECO TELHA TERMICO CERÂMICA TELHA

GALÃO 3,6 LTS

01302

METALATEX ACRILICO FOSCO PERFEITO BIANCO SERENO

GALÃO 3,6 LTS

03165

METALATEX ECO TELHA TERMICO CERÂMICA TELHA

LATA 18 LTS

01303

METALATEX ACRILICO FOSCO PERFEITO BIANCO SERENO

LATA 18 LTS

03170

METALATEX ECO TELHA TERMICO CHAMPAGNE

GALÃO 3,6 LTS

00399

METALATEX ACRILICO FOSCO PERFEITO BRANCO

GALÃO 3,6 LTS

03171

METALATEX ECO TELHA TERMICO CHAMPAGNE

LATA 18 LTS

00400

METALATEX ACRILICO FOSCO PERFEITO BRANCO

LATA 18 LTS

03162

METALATEX ECO TELHA TERMICO CINZA

GALÃO 3,6 LTS

07536

METALATEX ACRILICO FOSCO PERFEITO CINZA URBANO

GALÃO 3,6 LTS

03163

METALATEX ECO TELHA TERMICO CINZA

LATA 18 LTS

07537

METALATEX ACRILICO FOSCO PERFEITO CINZA URBANO

LATA 18 LTS

03172

METALATEX ECO TELHA TERMICO PEROLA

GALÃO 3,6 LTS

00768

METALATEX ACRILICO FOSCO PERFEITO CONCRETO

GALÃO 3,6 LTS

03173

METALATEX ECO TELHA TERMICO PEROLA

LATA 18 LTS

00769

METALATEX ACRILICO FOSCO PERFEITO CONCRETO

LATA 18 LTS

03168

METALATEX ECO TELHA TERMICO VERM. OXIDO

GALÃO 3,6 LTS

01304

METALATEX ACRILICO FOSCO PERFEITO ERVA DOCE

GALÃO 3,6 LTS

03169

METALATEX ECO TELHA TERMICO VERM. OXIDO

LATA 18 LTS

01307

METALATEX ACRILICO FOSCO PERFEITO ERVA DOCE

LATA 18 LTS

CÓDIGO

METALATEX ELASTIC ACRÍLICO

EMBALAGEM

00401

METALATEX ACRILICO FOSCO PERFEITO GELO

GALÃO 3,6 LTS

00402

METALATEX ACRILICO FOSCO PERFEITO GELO

LATA 18 LTS

06906

METALATEX ELASTIC ACRICILICO ACETINADO GELO

GALÃO 3,6 LTS

01305

METALATEX ACRILICO FOSCO PERFEITO LARANJA

GALÃO 3,6 LTS

06910

METALATEX ELASTIC ACRILICO ACETINADO AZUL RETRO

GALÃO 3,6 LTS

01308

METALATEX ACRILICO FOSCO PERFEITO LARANJA

LATA 18 LTS

06911

METALATEX ELASTIC ACRILICO ACETINADO AZUL RETRO LATA

LATA 18 LTS

00403

METALATEX ACRILICO FOSCO PERFEITO MARFIM

GALÃO 3,6 LTS

06862

METALATEX ELASTIC ACRILICO ACETINADO BRANCO

GALÃO 3,6 LTS

00404

METALATEX ACRILICO FOSCO PERFEITO MARFIM

LATA 18 LTS

06863

METALATEX ELASTIC ACRILICO ACETINADO BRANCO

LATA 18 LTS

01395

METALATEX ACRILICO FOSCO PERFEITO MEL

GALÃO 3,6 LTS

06908

METALATEX ELASTIC ACRILICO ACETINADO CINZA ESCURO

GALÃO 3,6 LTS

01394

METALATEX ACRILICO FOSCO PERFEITO MEL

LATA 18 LTS

06907

METALATEX ELASTIC ACRILICO ACETINADO GELO

LATA 18 LTS

00405

METALATEX ACRILICO FOSCO PERFEITO PALHA

GALÃO 3,6 LTS

06915

METALATEX ELASTIC ACRILICO ACETINADO MARSCHMALLOW

LATA 18 LTS

00406

METALATEX ACRILICO FOSCO PERFEITO PALHA

LATA 18 LTS

06914

METALATEX ELASTIC ACRILICO ACETINADO MARSHMALLOW

GALÃO 3,6 LTS

00407

METALATEX ACRILICO FOSCO PERFEITO PEROLA

GALÃO 3,6 LTS

08311

METALATEX ELASTIC ACRILICO ACETINADO TERRACOTA

GALÃO 3,6 LTS

00408

METALATEX ACRILICO FOSCO PERFEITO PEROLA

LATA 18 LTS

08312

METALATEX ELASTIC ACRILICO ACETINADO TERRACOTA

LATA 18 LTS

05098

METALATEX ACRILICO FOSCO PERFEITO ROSA SOFT

GALÃO 3,6 LTS

06912

METALATEX ELASTIC ACRILICO ACETINADO VERDE ITACARE

GALÃO 3,6 LTS

00770

METALATEX ACRILICO FOSCO PERFEITO TERRACOTA

GALÃO 3,6 LTS

06913

METALATEX ELASTIC ACRILICO ACETINADO VERDE ITACARE

LATA 18 LTS

00740

METALATEX ACRILICO FOSCO PERFEITO TERRACOTA

LATA 18 LTS

06909

METALATEX ELASTIC ARCILICO ACETINADO CINZA ESCURO

LATA 18 LTS

01306

METALATEX ACRILICO FOSCO PERFEITO VANILA

GALÃO 3,6 LTS

CÓDIGO

METALATEX ESMALTE - SOLVENTE

EMBALAGEM

01309

METALATEX ACRILICO FOSCO PERFEITO VANILA

LATA 18 LTS

04481

METALATEX ACRILICO FOSCO PERFEITO VERDE ECO

GALÃO 3,6 LTS

06724

METALATEX ESMALTE ALTO BRILHO ALUMÍNIO (BASE SOLVENTE)

GALÃO 3,6 LTS

04480

METALATEX ACRILICO FOSCO PERFEITO VERDE ECO

LATA 18 LTS

06725

METALATEX ESMALTE ALTO BRILHO ALUMÍNIO (BASE SOLVENTE)

QUARTO 0,900 ML

04849

METALATEX ACRILICO FOSCO PERFEITO VERMELHO RÚSTICO

GALÃO 3,6 LTS

04479

METALATEX ESMALTE ALTO BRILHO BRANCO (BASE SOLVENTE)

GALÃO 3,6 LTS

04366

METALATEX ACRILICO FOSCO PERFEITO VERMELHO RUSTICO

LATA 18 LTS

06691

METALATEX ESMALTE ALTO BRILHO BRANCO (BASE SOLVENTE)

QUARTO 0,900 ML

00699

METALATEX ACRILICO SEMI BRILHO AREIA

GALÃO 3,6 LTS

06692

METALATEX ESMALTE ALTO BRILHO GELO (BASE SOLVENTE)

GALÃO 3,6 LTS

06693

METALATEX ESMALTE ALTO BRILHO GELO (BASE SOLVENTE)

QUARTO 0,900 ML

CÓDIGO

METALATEX SEMIBRILHO

EMBALAGEM

06726

METALATEX ESMALTE ALTO BRILHO OURO (BASE SOLVENTE)

GALÃO 3,6 LTS

00413

METALATEX ACRILICO SEMI BRILHO BRANCO

GALÃO 3,6 LTS

06727

METALATEX ESMALTE ALTO BRILHO OURO (BASE SOLVENTE)

QUARTO 0,900 ML

00414

METALATEX ACRILICO SEMI BRILHO BRANCO

LATA 18 LTS

CÓDIGO

METALATEX FUNDO PREPARADOR - BASE SOLVENTE

EMBALAGEM

00415

METALATEX ACRILICO SEMI BRILHO GELO

GALÃO 3,6 LTS

00417

METALATEX ACRILICO SEMI BRILHO MARFIM

GALÃO 3,6 LTS

00643

METALATEX FUNDO PREPARADOR DE PAREDE PRONTO P/ USO

GALÃO 3,6 LTS

00421

METALATEX ACRILICO SEMI BRILHO PEROLA

GALÃO 3,6 LTS

00664

METALATEX FUNDO PREPARADOR DE PAREDE PRONTO P/ USO

LATA 18 LTS

CÓDIGO

METALATEX ÁGUARAZ

EMBALAGEM

CÓDIGO

METALATEX LITORAL

EMBALAGEM

05919

METALATEX ÁGUARAZ - GALÃO 5,0 LITROS

GALÃO 5 LITROS

00338

METALATEX LITORAL ACRILICO ACETINADO AMARELO CAMBURI

LATA 18 LTS

05918

METALATEX ÁGUARAZ - QUARTO 0,900ML

QUARTO 0,900 ML

00340

METALATEX LITORAL ACRILICO ACETINADO AMARELO GAROPABA

LATA 18 LTS

00342

METALATEX LITORAL ACRILICO ACETINADO AREIA GENIPABU

LATA 18 LTS

CÓDIGO

METALATEX BACTECRYL - BANHEIROS E COZINHAS

EMBALAGEM

00348

METALATEX LITORAL ACRILICO ACETINADO BRANCO

LATA 18 LTS

00638

METALATEX BACTERCRYL BANHEIROS & COZINHAS ACE BRANCO

QUARTO 0,900 ML

00350

METALATEX LITORAL ACRILICO ACETINADO GELO

LATA 18 LTS

00637

METALATEX BACTERCRYL BANHEIROS & COZINHAS ACETI BRANCO

GALÃO 3,6 LTS

00822

METALATEX LITORAL ACRILICO ACETINADO LARANJA SAUIPE

LATA 18 LTS

00352

METALATEX LITORAL ACRILICO ACETINADO PALHA ITAUNAS

LATA 18 LTS

CÓDIGO

METALATEX ECO ESMALTE - BASE D’ÁGUA

EMBALAGEM

00354

METALATEX LITORAL ACRILICO ACETINADO PEROLA GUARUJA

LATA 18 LTS

00431

METALATEX ECO ESMALTE ACETINADO BRANCO

GALÃO 3,6 LTS

01676

METALATEX LITORAL ACRILICO ACETINADO TERRACOTA

LATA 18 LTS

00432

METALATEX ECO ESMALTE ACETINADO BRANCO

QUARTO 0,900 ML

00356

METALATEX LITORAL ACRILICO ACETINADO VERDE ITACARE

LATA 18 LTS

00433

METALATEX ECO ESMALTE ACETINADO GELO

GALÃO 3,6 LTS

04195

METALATEX LITORAL ACRILICO FOSCO AMARELO CAMBURI

LATA 18 LTS

00434

METALATEX ECO ESMALTE ACETINADO GELO

QUARTO 0,900 ML

04196

METALATEX LITORAL ACRILICO FOSCO AREIA GENIPABU

LATA 18 LTS

00441

METALATEX ECO ESMALTE ALTO BRILHO AMARELO OURO

GALÃO 3,6 LTS

04198

METALATEX LITORAL ACRILICO FOSCO BRANCO

LATA 18 LTS

00442

METALATEX ECO ESMALTE ALTO BRILHO AMARELO OURO

QUARTO 0,900 ML

04183

METALATEX LITORAL ACRILICO FOSCO PALHA ITAUNAS

GALÃO 3,6 LTS

00443

METALATEX ECO ESMALTE ALTO BRILHO AREIA

GALÃO 3,6 LTS

04193

METALATEX LITORAL ACRILICO FOSCO PALHA ITAUNAS

LATA 18 LTS

00444

METALATEX ECO ESMALTE ALTO BRILHO AREIIA

QUARTO 0,900 ML

04197

METALATEX LITORAL ACRILICO FOSCO TERRACOTA

GALÃO 3,6 LTS

00445

METALATEX ECO ESMALTE ALTO BRILHO AZUL DEL REY

GALÃO 3,6 LTS

04199

METALATEX LITORAL ACRILICO FOSCO VERDE ITACARE

LATA 18 LTS

00446

METALATEX ECO ESMALTE ALTO BRILHO AZUL DEL REY

QUARTO 0,900 ML

04191

METALATEX LITORAL ACRILICO FOSCO VERDE PERNAMBUCO

LATA 18 LTS

02608

METALATEX ECO ESMALTE ALTO BRILHO AZUL FRANÇA

GALÃO 3,6 LTS

CÓDIGO

METALATEX COMPLEMENTOS

EMBALAGEM

02609

METALATEX ECO ESMALTE ALTO BRILHO AZUL FRANÇA

QUARTO 0,900 ML

00447

METALATEX ECO ESMALTE ALTO BRILHO BRANCO

GALÃO 3,6 LTS

00665

METALATEX MASSA ACRÍLICA BRANCA

GALÃO 3,6 LTS

00448

METALATEX ECO ESMALTE ALTO BRILHO BRANCO

QUARTO 0,900 ML

00653

METALATEX MASSA ACRÍLICA BRANCA

LATA 18 LTS

00449

METALATEX ECO ESMALTE ALTO BRILHO GELO

GALÃO 3,6 LTS

03218

METALATEX MASSA ACRÍLICA BRANCA

QUARTO 0,900 ML

00450

METALATEX ECO ESMALTE ALTO BRILHO GELO

QUARTO 0,900 ML

00113

METALATEX MASSA PVA BRANCA

GALÃO 3,6 LTS

00453

METALATEX ECO ESMALTE ALTO BRILHO MARFIM

GALÃO 3,6 LTS

00114

METALATEX MASSA PVA BRANCA

LATA 18 LTS

00454

METALATEX ECO ESMALTE ALTO BRILHO MARFIM

QUARTO 0,900 ML

00112

METALATEX MASSA PVA BRANCA

QUARTO 0,900 ML

00457

METALATEX ECO ESMALTE ALTO BRILHO PLATINA

GALÃO 3,6 LTS

00667

METALATEX SELADOR ACRÍLICA

GALÃO 3,6 LTS

00458

METALATEX ECO ESMALTE ALTO BRILHO PLATINA

QUARTO 0,900 ML

00666

METALATEX SELADOR ACRÍLICA

LATA 18 LTS

01980

METALATEX ECO ESMALTE ALTO BRILHO PRETO

GALÃO 3,6 LTS

01979

METALATEX ECO ESMALTE ALTO BRILHO PRETO

QUARTO 0,900 ML

02606

METALATEX ECO ESMALTE ALTO BRILHO TABACO

GALÃO 3,6 LTS

CENTRAL DE RELACIONAMENTO • 27 3089.3888

127

PRODUTOS SHERWIN-WILLIAMS

CÓDIGO

METALATEX REQUINTE - ACRÍLICO ACETINADO

EMBALAGEM

06413

NOVACOR ESMALTE ALTO BRILHO CINZA MEDIO

GALÃO 3,6 LTS

06485

NOVACOR ESMALTE ALTO BRILHO CINZA MEDIO

QUARTO 0,900 ML

00986

METALATEX REQUINTE SUPERLAVÁVEL ACRILICO ACETINADO BRANCO

GALÃO 3,6 LTS

06409

NOVACOR ESMALTE ALTO BRILHO DEL REY

GALÃO 3,6 LTS

00987

METALATEX REQUINTE SUPERLAVÁVEL ACRILICO ACETINADO BRANCO

LATA 18 LTS

06577

NOVACOR ESMALTE ALTO BRILHO GELO

1/16 225 ML

01644

METALATEX REQUINTE SUPERLAVÁVEL ACRILICO ACETINADO GELO

LATA 18 LTS

06414

NOVACOR ESMALTE ALTO BRILHO GELO

GALÃO 3,6 LTS

01645

METALATEX REQUINTE SUPERLAVÁVEL ACRILICO ACETNIADO GELO

GALÃO 3,6 LTS

06578

NOVACOR ESMALTE ALTO BRILHO GELO

QUARTO 0,900 ML

CÓDIGO

METALATEX TEXTURAS

EMBALAGEM

06579

NOVACOR ESMALTE ALTO BRILHO LARANJA

GALÃO 3,6 LTS

06021

METALATEX TEXTURA ACRÍLICA LISA BRANCA

LATA 18 LTS

06581

NOVACOR ESMALTE ALTO BRILHO LARANJA

QUARTO 0,900 ML

03094

METALATEX TEXTURA ACRÍLICA LISA BRANCA

GALÃO 3,6 LTS

06411

NOVACOR ESMALTE ALTO BRILHO MARFIM

GALÃO 3,6 LTS

03090

METALATEX TEXTURA RISCADO BRANCA

GALÃO 3,6 LTS

06495

NOVACOR ESMALTE ALTO BRILHO MARFIM

QUARTO 0,900 ML

03100

METALATEX TEXTURA RISCADO BRANCA

LATA 18 LTS

06791

NOVACOR ESMALTE ALTO BRILHO MARROM

1/16 225 ML

06521

NOVACOR ESMALTE ALTO BRILHO MARROM

GALÃO 3,6 LTS

CÓDIGO

METALATEX TEXTURAS

EMBALAGEM

06551

NOVACOR ESMALTE ALTO BRILHO MARROM

QUARTO 0,900 ML

00635

METALATEX VERNIZ ACRILICO IN PARA PEDRAS

GALÃO 3,6 LTS

06481

NOVACOR ESMALTE ALTO BRILHO MARROM CONHAQUE

GALÃO 3,6 LTS

00636

METALATEX VERNIZ ACRILICO IN PARA PEDRAS

LATA 18 LTS

06482

NOVACOR ESMALTE ALTO BRILHO MARROM CONHAQUE

QUARTO 0,900 ML

06787

NOVACOR ESMALTE ALTO BRILHO PLATINA

1/16 225 ML

CÓDIGO

NOVACOR COBRE MAIS

EMBALAGEM

06412

NOVACOR ESMALTE ALTO BRILHO PLATINA

GALÃO 3,6 LTS

08497

NOVACOR ACRILICO COBRE MAIS AMARELO SOL FOSCO

GALÃO 3,6 LTS

06552

NOVACOR ESMALTE ALTO BRILHO PLATINA

QUARTO 0,900 ML

08498

NOVACOR ACRILICO COBRE MAIS AMARELO SOL FOSCO

LATA 18 LTS

06580

NOVACOR ESMALTE ALTO BRILHO PRETO

1/16 225 ML

06810

NOVACOR ACRILICO COBRE MAIS AREIA FOSCO

GALÃO 3,6 LTS

06417

NOVACOR ESMALTE ALTO BRILHO PRETO

GALÃO 3,6 LTS

06811

NOVACOR ACRILICO COBRE MAIS AREIA FOSCO

LATA 18 LTS

06490

NOVACOR ESMALTE ALTO BRILHO PRETO

QUARTO 0,900 ML

06800

NOVACOR ACRILICO COBRE MAIS BIANCO SERENO FOSCO

GALÃO 3,6 LTS

06790

NOVACOR ESMALTE ALTO BRILHO TABACO

1/16 225 ML

06801

NOVACOR ACRILICO COBRE MAIS BIANCO SERENO FOSCO

LATA 18 LTS

06415

NOVACOR ESMALTE ALTO BRILHO TABACO

GALÃO 3,6 LTS

06802

NOVACOR ACRILICO COBRE MAIS BRANCO FOSCO

GALÃO 3,6 LTS

06583

NOVACOR ESMALTE ALTO BRILHO TABACO

QUARTO 0,900 ML

06803

NOVACOR ACRILICO COBRE MAIS BRANCO FOSCO

LATA 18 LTS

06793

NOVACOR ESMALTE ALTO BRILHO VERDE FOLHA

1/16 225 ML

06804

NOVACOR ACRILICO COBRE MAIS CAMURÇA FOSCO

GALÃO 3,6 LTS

06493

NOVACOR ESMALTE ALTO BRILHO VERDE FOLHA

GALÃO 3,6 LTS

06805

NOVACOR ACRILICO COBRE MAIS CAMURÇA FOSCO

LATA 18 LTS

06563

NOVACOR ESMALTE ALTO BRILHO VERDE FOLHA

QUARTO 0,900 ML

06898

NOVACOR ACRILICO COBRE MAIS CENOURA FOSCO

GALÃO 3,6 LTS

06492

NOVACOR ESMALTE ALTO BRILHO VERDE PALMEIRA

GALÃO 3,6 LTS

06899

NOVACOR ACRILICO COBRE MAIS CENOURA FOSCO

LATA 18 LTS

06584

NOVACOR ESMALTE ALTO BRILHO VERDE PALMEIRA

QUARTO 0,900 ML

08493

NOVACOR ACRILICO COBRE MAIS CONCRETO FOSCO

GALÃO 3,6 LTS

06616

NOVACOR ESMALTE ALTO BRILHO VERMELHO

1/16 225 ML

08494

NOVACOR ACRILICO COBRE MAIS CONCRETO FOSCO

LATA 18 LTS

06410

NOVACOR ESMALTE ALTO BRILHO VERMELHO

GALÃO 3,6 LTS

06894

NOVACOR ACRILICO COBRE MAIS ERVA DOCE FOSCO

GALÃO 3,6 LTS

06585

NOVACOR ESMALTE ALTO BRILHO VERMELHO

QUARTO 0,900 ML

06895

NOVACOR ACRILICO COBRE MAIS ERVA DOCE FOSCO

LATA 18 LTS

06792

NOVACOR ESMALTE ALTO BRILHO VERMELHO CHASSI

1/16 225 ML

08499

NOVACOR ACRILICO COBRE MAIS FLAMINGO FOSCO

GALÃO 3,6 LTS

06487

NOVACOR ESMALTE ALTO BRILHO VERMELHO CHASSI

GALÃO 3,6 LTS

08500

NOVACOR ACRILICO COBRE MAIS FLAMINGO FOSCO

LATA 18 LTS

06586

NOVACOR ESMALTE ALTO BRILHO VERMELHO CHASSI

QUARTO 0,900 ML

06798

NOVACOR ACRILICO COBRE MAIS GELO FOSCO

GALÃO 3,6 LTS

06494

NOVACOR ESMALTE FOSCO PRETO

GALÃO 3,6 LTS

06799

NOVACOR ACRILICO COBRE MAIS GELO FOSCO

LATA 18 LTS

06589

NOVACOR ESMALTE FOSCO GRAFITE CLARO

GALÃO 3,6 LTS

06796

NOVACOR ACRILICO COBRE MAIS MARFIM FOSCO

GALÃO 3,6 LTS

06591

NOVACOR ESMALTE FOSCO GRAFITE CLARO

QUARTO 0,900 ML

06797

NOVACOR ACRILICO COBRE MAIS MARFIM FOSCO

LATA 18 LTS

06590

NOVACOR ESMALTE FOSCO GRAFITE ESCURO

GALÃO 3,6 LTS

06812

NOVACOR ACRILICO COBRE MAIS PALHA FOSCO

GALÃO 3,6 LTS

06592

NOVACOR ESMALTE FOSCO GRAFITE ESCURO

QUARTO 0,900 ML

06813

NOVACOR ACRILICO COBRE MAIS PALHA FOSCO

LATA 18 LTS

06588

NOVACOR ESMALTE FOSCO PRETO

1/16 225 ML

06806

NOVACOR ACRILICO COBRE MAIS PEROLA FOSCO

GALÃO 3,6 LTS

06558

NOVACOR ESMALTE FOSCO PRETO

QUARTO 0,900 ML

06807

NOVACOR ACRILICO COBRE MAIS PEROLA FOSCO

LATA 18 LTS

CÓDIGO

NOVACOR EXTRA ACRÍLICO

EMBALAGEM

08491

NOVACOR ACRILICO COBRE MAIS PESSEGO FOSCO

GALÃO 3,6 LTS

08492

NOVACOR ACRILICO COBRE MAIS PESSEGO FOSCO

LATA 18 LTS

00333

NOVACOR EXTRA ACRÍLICA ACETINADO BRANCO

GALÃO 3,6 LTS

08501

NOVACOR ACRILICO COBRE MAIS TANGERINA FOSCO

GALÃO 3,6 LTS

00334

NOVACOR EXTRA ACRÍLICA ACETINADO BRANCO

LATA 18 LTS

08502

NOVACOR ACRILICO COBRE MAIS TANGERINA FOSCO

LATA 18 LTS

00293

NOVACOR EXTRA ACRÍLICA FOSCO AMARELO CANARIO

GALÃO 3,6 LTS

06808

NOVACOR ACRILICO COBRE MAIS VERDE CAMPESTRE FOSCO

GALÃO 3,6 LTS

00294

NOVACOR EXTRA ACRÍLICA FOSCO AMARELO CANARIO

LATA 18 LTS

06809

NOVACOR ACRILICO COBRE MAIS VERDE CAMPESTRE FOSCO

LATA 18 LTS

05618

NOVACOR EXTRA ACRÍLICA FOSCO AMARELO SOL

GALÃO 3,6 LTS

06888

NOVACOR ACRILICO COBRE MAIS VERDE JARDIM FOSCO

GALÃO 3,6 LTS

05619

NOVACOR EXTRA ACRÍLICA FOSCO AMARELO SOL

LATA 18 LTS

06889

NOVACOR ACRILICO COBRE MAIS VERDE JARDIM FOSCO

LATA 18 LTS

00297

NOVACOR EXTRA ACRÍLICA FOSCO AREIA

GALÃO 3,6 LTS

08495

NOVACOR ACRILICO COBRE MAIS VERDE LIMAO FOSCO

GALÃO 3,6 LTS

00298

NOVACOR EXTRA ACRÍLICA FOSCO AREIA

LATA 18 LTS

08496

NOVACOR ACRILICO COBRE MAIS VERDE LIMAO FOSCO

LATA 18 LTS

05627

NOVACOR EXTRA ACRÍLICA FOSCO AZUL INDIGO

GALÃO 3,6 LTS

05626

NOVACOR EXTRA ACRÍLICA FOSCO AZUL INDIGO

LATA 18 LTS

CÓDIGO

NOVACOR AZULEJO

EMBALAGEM

05624

NOVACOR EXTRA ACRÍLICA FOSCO AZUL SERENO

GALÃO 3,6 LTS

00262

NOVACOR AZULEJO AC BRANCO

GALÃO 3,6 LTS

05625

NOVACOR EXTRA ACRÍLICA FOSCO AZUL SERENO

LATA 18 LTS

00874

NOVACOR EXTRA ACRÍLICA FOSCO BIANCO SERENO

GALÃO 3,6 LTS

CÓDIGO

NOVACOR EPOXI

EMBALAGEM

00878

NOVACOR EXTRA ACRÍLICA FOSCO BIANCO SERENO

LATA 18 LTS

05666

NOVACOR EPOXI AMARELO 300

GALÃO 3,6 LTS

00303

NOVACOR EXTRA ACRÍLICA FOSCO BRANCO

GALÃO 3,6 LTS

05667

NOVACOR EPOXI AZUL 500

GALÃO 3,6 LTS

00304

NOVACOR EXTRA ACRÍLICA FOSCO BRANCO

LATA 18 LTS

05669

NOVACOR EPOXI BRANCO 100

GALÃO 3,6 LTS

00305

NOVACOR EXTRA ACRÍLICA FOSCO CAMURÇA

GALÃO 3,6 LTS

05670

NOVACOR EPOXI CINZA CLARO 201

GALÃO 3,6 LTS

00306

NOVACOR EXTRA ACRÍLICA FOSCO CAMURÇA

LATA 18 LTS

05671

NOVACOR EPOXI CINZA ESCURO 203

GALÃO 3,6 LTS

00875

NOVACOR EXTRA ACRÍLICA FOSCO ERVA DOCE

GALÃO 3,6 LTS

05668

NOVACOR EPOXI LARANJA 350

GALÃO 3,6 LTS

00879

NOVACOR EXTRA ACRÍLICA FOSCO ERVA DOCE

LATA 18 LTS

05672

NOVACOR EPOXI PRETO 700

GALÃO 3,6 LTS

00313

NOVACOR EXTRA ACRÍLICA FOSCO GELO

GALÃO 3,6 LTS

05673

NOVACOR EPOXI VERDE 604

GALÃO 3,6 LTS

00314

NOVACOR EXTRA ACRÍLICA FOSCO GELO

LATA 18 LTS

05674

NOVACOR EPOXI VERMELHO 400

GALÃO 3,6 LTS

00315

NOVACOR EXTRA ACRÍLICA FOSCO MARFIM

GALÃO 3,6 LTS

00316

NOVACOR EXTRA ACRÍLICA FOSCO MARFIM

LATA 18 LTS

CÓDIGO

NOVACOR ESMALTE - BASE SOLVENTE

EMBALAGEM

00317

NOVACOR EXTRA ACRÍLICA FOSCO PALHA

GALÃO 3,6 LTS

00187

NOVACOR ESMALTE ACETINADO AZUL DEL REY

GALÃO 3,6 LTS

00318

NOVACOR EXTRA ACRÍLICA FOSCO PALHA

LATA 18 LTS

06418

NOVACOR ESMALTE ACETINADO BRANCO

GALÃO 3,6 LTS

00319

NOVACOR EXTRA ACRÍLICA FOSCO PEROLA

GALÃO 3,6 LTS

06498

NOVACOR ESMALTE ACETINADO BRANCO

QUARTO 0,900 ML

00320

NOVACOR EXTRA ACRÍLICA FOSCO PEROLA

LATA 18 LTS

06851

NOVACOR ESMALTE ACETINADO CERÂMICA

GALÃO 3,6 LTS

05620

NOVACOR EXTRA ACRÍLICA FOSCO TANGERINA

GALÃO 3,6 LTS

06852

NOVACOR ESMALTE ACETINADO CERÂMICA

QUARTO 0,900 ML

05621

NOVACOR EXTRA ACRÍLICA FOSCO TANGERINA

LATA 18 LTS

06659

NOVACOR ESMALTE ACETINADO GELO

GALÃO 3,6 LTS

05617

NOVACOR EXTRA ACRÍLICA FOSCO TERRACOTA NATURAL

GALÃO 3,6 LTS

06666

NOVACOR ESMALTE ACETINADO GELO

QUARTO 0,900 ML

05616

NOVACOR EXTRA ACRÍLICA FOSCO TERRACOTA NATURAL

LATA 18 LTS

06582

NOVACOR ESMALTE ALTO BRILHO ALUMÍNIO

1/16 225 ML

02409

NOVACOR EXTRA ACRÍLICA FOSCO VERDE ITACARE

GALÃO 3,6 LTS

06416

NOVACOR ESMALTE ALTO BRILHO ALUMÍNIO

GALÃO 3,6 LTS

02410

NOVACOR EXTRA ACRÍLICA FOSCO VERDE ITACARE

LATA 18 LTS

06483

NOVACOR ESMALTE ALTO BRILHO ALUMÍNIO

QUARTO 0,900 ML

05623

NOVACOR EXTRA ACRÍLICA FOSCO VERDE LIMAO

GALÃO 3,6 LTS

06784

NOVACOR ESMALTE ALTO BRILHO AMARELO

1/16 225 ML

05622

NOVACOR EXTRA ACRÍLICA FOSCO VERDE LIMAO

LATA 18 LTS

06491

NOVACOR ESMALTE ALTO BRILHO AMARELO

GALÃO 3,6 LTS

03848

NOVACOR EXTRA ACRÍLICA FOSCO VERDE PRIMAVERA

GALÃO 3,6 LTS

06549

NOVACOR ESMALTE ALTO BRILHO AMARELO

QUARTO 0,900 ML

03849

NOVACOR EXTRA ACRÍLICA FOSCO VERDE PRIMAVERA

LATA 18 LTS

06480

NOVACOR ESMALTE ALTO BRILHO AREIA

GALÃO 3,6 LTS

06025

NOVACOR EXTRA ACRÍLICA FOSCO VERMELHO CEREJA

GALÃO 3,6 LTS

06489

NOVACOR ESMALTE ALTO BRILHO AREIA

QUARTO 0,900 ML

06026

NOVACOR EXTRA ACRÍLICA FOSCO VERMELHO CEREJA

LATA 18 LTS

06488

NOVACOR ESMALTE ALTO BRILHO AZUL CELESTE

GALÃO 3,6 LTS

00329

NOVACOR EXTRA ACRÍLICA SEMIBRILHO BRANCO

GALÃO 3,6 LTS

06550

NOVACOR ESMALTE ALTO BRILHO AZUL CELESTE

QUARTO 0,900 ML

00330

NOVACOR EXTRA ACRÍLICA SEMIBRILHO BRANCO

LATA 18 LTS

06786

NOVACOR ESMALTE ALTO BRILHO AZUL DEL REY

1/16 225 ML

00331

NOVACOR EXTRA ACRÍLICA SEMIBRILHO GELO

GALÃO 3,6 LTS

06554

NOVACOR ESMALTE ALTO BRILHO AZUL DEL REY

QUARTO 0,900 ML

00332

NOVACOR EXTRA ACRÍLICA SEMIBRILHO GELO

LATA 18 LTS

06785

NOVACOR ESMALTE ALTO BRILHO AZUL FRANÇA

1/16 225 ML

00075

NOVACOR FUNDO ANTIFERRUGEM VERMELHO ÓXIDO

GALÃO 3,6 LTS

06408

NOVACOR ESMALTE ALTO BRILHO AZUL FRANCA

GALÃO 3,6 LTS

00076

NOVACOR FUNDO ANTIFERRUGEM VERMELHO ÓXIDO

QUARTO 0,900 ML

06553

NOVACOR ESMALTE ALTO BRILHO AZUL FRANÇA

QUARTO 0,900 ML

CÓDIGO

NOVACOR COMPLEMENTOS - SOLVENTE

EMBALAGEM

06576

NOVACOR ESMALTE ALTO BRILHO BRANCO

1/16 225 ML

06484

NOVACOR ESMALTE ALTO BRILHO BRANCO

GALÃO 3,6 LTS

00073

NOVACOR FUNDO BRANCO FOSCO

GALÃO 3,6 LTS

06496

NOVACOR ESMALTE ALTO BRILHO BRANCO

QUARTO 0,900 ML

00074

NOVACOR FUNDO BRANCO FOSCO

QUARTO 0,900 ML

06564

NOVACOR ESMALTE ALTO BRILHO CINZA ESCURO

1/16 225 ML

00663

NOVACOR GESSO BRANCO

GALÃO 3,6 LTS

06486

NOVACOR ESMALTE ALTO BRILHO CINZA ESCURO

GALÃO 3,6 LTS

00626

NOVACOR GESSO BRANCO

LATA 18 LTS

06497

NOVACOR ESMALTE ALTO BRILHO CINZA ESCURO

QUARTO 0,900 ML

00071

NOVACOR MASSA A ÓLEO

GALÃO 3,6 LTS

00072

NOVACOR MASSA A ÓLEO

QUARTO 0,900 ML

128

CENTRAL DE RELACIONAMENTO • 27 3089.3888

PRODUTOS SHERWIN-WILLIAMS

CÓDIGO

NOVACOR PISO

EMBALAGEM

01312

NOVACOR PISO ULTRA VERDE

LATA 18 LTS

01314

NOVACOR PISO ULTRA VERMELHO SEGURANÇA

LATA 18 LTS

00224

NOVACOR PISO MAIS RESISTENTE AMARELO

GALÃO 3,6 LTS

00226

NOVACOR PISO MAIS RESISTENTE AMARELO

LATA 18 LTS

CÓDIGO

NOVACOR RESINA IMPERMEABILIZANTE

EMBALAGEM

00225

NOVACOR PISO MAIS RESISTENTE AMARELO

QUARTO 0,900 ML

01561

NOVACOR RESINA IMPERMEABILIZANTE

GALÃO 3,6 LTS

00227

NOVACOR PISO MAIS RESISTENTE AMARELO DEMARCACAO

GALÃO 3,6 LTS

01560

NOVACOR RESINA IMPERMEABILIZANTE

LATA 18 LTS

00229

NOVACOR PISO MAIS RESISTENTE AMARELO DEMARCACAO

LATA 18 LTS

00228

NOVACOR PISO MAIS RESISTENTE AMARELO DEMARCAÇÃO

QUARTO 0,900 ML

CÓDIGO

NOVACOR TEXTURA ACRÍLICA

EMBALAGEM

00230

NOVACOR PISO MAIS RESISTENTE AZUL

GALÃO 3,6 LTS

00640

NOVACOR TEXTURA RÚSTICA BRANCA

LATA 18 LTS

00232

NOVACOR PISO MAIS RESISTENTE AZUL

LATA 18 LTS

00231

NOVACOR PISO MAIS RESISTENTE AZUL

QUARTO 0,900 ML

CÓDIGO

RESTAURAÇÃO - SHERWIN WILLIAMS

EMBALAGEM

00233

NOVACOR PISO MAIS RESISTENTE BRANCO

GALÃO 3,6 LTS

04450

RESTAURACAO ACRILICO FLEXIVEL FOSCO

GALÃO 3,6 LTS

00235

NOVACOR PISO MAIS RESISTENTE BRANCO

LATA 18 LTS

04451

RESTAURACAO ACRILICO FLEXIVEL FOSCO

LATA 18 LTS

00234

NOVACOR PISO MAIS RESISTENTE BRANCO

QUARTO 0,900 ML

01387

SELADORA IN PARA MADEIRA

GALÃO 3,6 LTS

00238

NOVACOR PISO MAIS RESISTENTE CASTOR

LATA 18 LTS

01388

SELADORA IN PARA MADEIRA

QUARTO 0,900 ML

00236

NOVACOR PISO MAIS RESISTENTE CASTOR

GALÃO 3,6 LTS

04452

SELA-TRINCA RESTAURACAO

GALÃO 3,6 LTS

00237

NOVACOR PISO MAIS RESISTENTE CASTOR

QUARTO 0,900 ML

00239

NOVACOR PISO MAIS RESISTENTE CINZA

GALÃO 3,6 LTS

CÓDIGO

FUNDOS ADERENTES

EMBALAGEM

00241

NOVACOR PISO MAIS RESISTENTE CINZA

LATA 18 LTS

06866

SUPER ADERE FUNDO BRILHANTE IN

GALÃO 3,6 LTS

00240

NOVACOR PISO MAIS RESISTENTE CINZA

QUARTO 0,900 ML

00222

SUPER GALVIT

GALÃO 3,6 LTS

00242

NOVACOR PISO MAIS RESISTENTE CINZA CHUMBO

GALÃO 3,6 LTS

00223

SUPER GALVIT

QUARTO 0,900 ML

00244

NOVACOR PISO MAIS RESISTENTE CINZA CHUMBO

LATA 18 LTS

00243

NOVACOR PISO MAIS RESISTENTE CINZA CHUMBO

QUARTO 0,900 ML

CÓDIGO

LINHA MADEIRA

EMBALAGEM

00247

NOVACOR PISO MAIS RESISTENTE CONCRETO

LATA 18 LTS

01342

SW VERNIZ PREMIUM BRIL IMBUIA

GALÃO 3,6 LTS

00245

NOVACOR PISO MAIS RESISTENTE CONCRETO

GALÃO 3,6 LTS

01347

SW VERNIZ PREMIUM BRIL IMBUIA

QUARTO 0,900 ML

00246

NOVACOR PISO MAIS RESISTENTE CONCRETO

QUARTO 0,900 ML

01385

VERNIZ COPAL

GALÃO 3,6 LTS

00670

NOVACOR PISO MAIS RESISTENTE MARROM

GALÃO 3,6 LTS

01386

VERNIZ COPAL

QUARTO 0,900 ML

00669

NOVACOR PISO MAIS RESISTENTE MARROM

LATA 18 LTS

01379

VERNIZ FILTRO SOLAR ACET IN

GALÃO 3,6 LTS

00248

NOVACOR PISO MAIS RESISTENTE PRETO

GALÃO 3,6 LTS

01380

VERNIZ FILTRO SOLAR ACET IN

QUARTO 0,900 ML

00250

NOVACOR PISO MAIS RESISTENTE PRETO

LATA 18 LTS

01377

VERNIZ FILTRO SOLAR BRIL MOGNO

QUARTO 0,900 ML

00249

NOVACOR PISO MAIS RESISTENTE PRETO

QUARTO 0,900 ML

01374

VERNIZ FILTRO SOLAR BRILH IN

QUARTO 0,900 ML

00251

NOVACOR PISO MAIS RESISTENTE VERDE

GALÃO 3,6 LTS

01373

VERNIZ FILTRO SOLAR BRILH IN GALÃO

GALÃO 3,6 LTS

00253

NOVACOR PISO MAIS RESISTENTE VERDE

LATA 18 LTS

01378

VERNIZ FILTRO SOLAR BRILHA IMBUIA

QUARTO 0,900 ML

00252

NOVACOR PISO MAIS RESISTENTE VERDE

QUARTO 0,900 ML

01376

VERNIZ FILTRO SOLAR BRILHANT IMBUIA

GALÃO 3,6 LTS

00254

NOVACOR PISO MAIS RESISTENTE VERMELHO

GALÃO 3,6 LTS

01375

VERNIZ FILTRO SOLAR BRILHANTE MOGNO

GALÃO 3,6 LTS

00256

NOVACOR PISO MAIS RESISTENTE VERMELHO

LATA 18 LTS

01364

VERNIZ MARITIMO BRILHANTE IMBUIA

GALÃO 3,6 LTS

00255

NOVACOR PISO MAIS RESISTENTE VERMELHO

QUARTO 0,900 ML

01366

VERNIZ MARITIMO BRILHANTE IMBUIA

QUARTO 0,900 ML

00257

NOVACOR PISO MAIS RESISTENTE VERMELHO SEGURANCA

GALÃO 3,6 LTS

01361

VERNIZ MARITIMO BRILHANTE IN

GALÃO 3,6 LTS

00259

NOVACOR PISO MAIS RESISTENTE VERMELHO SEGURANCA

LATA 18 LTS

01362

VERNIZ MARITIMO BRILHANTE IN

QUARTO 0,900 ML

00258

NOVACOR PISO MAIS RESISTENTE VERMELHO SEGURANCA

QUARTO 0,900 ML

01363

VERNIZ MARITIMO BRILHANTE MOGNO

GALÃO 3,6 LTS

01313

NOVACOR PISO ULTRA AMARARELO DEMARCACAO

LATA 18 LTS

01365

VERNIZ MARITIMO BRILHANTE MOGNO

QUARTO 0,900 ML

01315

NOVACOR PISO ULTRA AZUL

LATA 18 LTS

01370

VERNIZ MARITIMO FOSCO IMBUIA

GALÃO 3,6 LTS

01316

NOVACOR PISO ULTRA BRANCO

LATA 18 LTS

01372

VERNIZ MARITIMO FOSCO IMBUIA

QUARTO 0,900 ML

01318

NOVACOR PISO ULTRA CINZA

LATA 18 LTS

01367

VERNIZ MARITIMO FOSCO IN

GALÃO 3,6 LTS

01319

NOVACOR PISO ULTRA CINZA CHUMBO

LATA 18 LTS

01368

VERNIZ MARITIMO FOSCO IN

QUARTO 0,900 ML

01317

NOVACOR PISO ULTRA CONCRETO

LATA 18 LTS

CÓDIGO

ALTA TEMPERATURA

EMBALAGEM

00710

COLORGIN DECOR SPRAY - AZUL COLONIAL

350 ML

00707

COLORGIN DECOR SPRAY - AZUL MEDIO

350 ML

00006

COLORGIN ALTA TEMPERATURA ALUMÍNIO

350 ML

00706

COLORGIN DECOR SPRAY - BRANCO

350 ML

03033

COLORGIN ALTA TEMPERATURA BRANCO

350 ML

02413

COLORGIN DECOR SPRAY - BRANCO FOSCO

350 ML

00005

COLORGIN ALTA TEMPERATURA PRETO FOSCO

350 ML

00023

COLORGIN DECOR SPRAY - CINZA

350 ML

CÓDIGO ALUMEN

EMBALAGEM

00024

COLORGIN DECOR SPRAY - GRAFITE METALICO

350 ML

00035

COLORGIN ALUMEN ALUMÍNIO 350ML

350 ML

04938

COLORGIN DECOR SPRAY - LARANJA

350 ML

04456

COLORGIN ALUMEN BRANCO BRILHANTE 350ML

350 ML

00025

COLORGIN DECOR SPRAY - MARROM BARROCO

350 ML

08281

COLORGIN ALUMEN BRONZE 1001 350ML

350 ML

08287

COLORGIN DECOR SPRAY - MARROM CAFÉ

350 ML

08282

COLORGIN ALUMEN BRONZE 1003 350ML

350 ML

00026

COLORGIN DECOR SPRAY - PRETO BRILHANTE

350 ML

00763

COLORGIN ALUMEN BRONZE CLARO 350ML

350 ML

00712

COLORGIN DECOR SPRAY - PRETO FOSCO

350 ML

00764

COLORGIN ALUMEN BRONZE ESCURO 350ML

350 ML

00028

COLORGIN DECOR SPRAY - PRIMER CINZA

350 ML

00765

COLORGIN ALUMEN PRETO FOSCO 350ML

350 ML

00713

COLORGIN DECOR SPRAY - VERDE

350 ML

00032

COLORGIN DECOR SPRAY - VERDE AMAZONAS METALICO

350 ML

CÓDIGO

ARTE URBANA

EMBALAGEM

00709

COLORGIN DECOR SPRAY - VERDE FOLHA

350 ML

08646

COLORGIN ARTE URBANA AMARELO CANARIO 400 ML

400 ML

00714

COLORGIN DECOR SPRAY - VERMELHO

350 ML

08647

COLORGIN ARTE URBANA AMARELO SOL 400 ML

400 ML

00033

COLORGIN DECOR SPRAY - VERMELHO METALICO

350 ML

08653

COLORGIN ARTE URBANA AZUL CEU 400 ML

400 ML

00029

COLORGIN DECOR SPRAY - VERNIZ PARA USO GERAL

350 ML

09117

COLORGIN ARTE URBANA AZUL MACKENZIE 400ML

400 ML

CÓDIGO LUMINOSA

EMBALAGEM

08667

COLORGIN ARTE URBANA AZUL MIRO 400 ML

400 ML

09113

COLORGIN ARTE URBANA AZUL NETUNO 400ML

400 ML

00020

COLORGIN LUMINOSA AMARELO

350 ML

09120

COLORGIN ARTE URBANA BAMBU 400ML

400 ML

00021

COLORGIN LUMINOSA AZUL

350 ML

08663

COLORGIN ARTE URBANA BRANCO 400 ML

400 ML

00767

COLORGIN LUMINOSA LARANJA

350 ML

09122

COLORGIN ARTE URBANA BRANCO TRANSLUCIDO 400ML

400 ML

00766

COLORGIN LUMINOSA MARAVILHA

350 ML

09119

COLORGIN ARTE URBANA CACAU 400ML

400 ML

02060

COLORGIN LUMINOSA VERDE

350 ML

09118

COLORGIN ARTE URBANA CARAMELO 400,L

400 ML

00019

COLORGIN LUMINOSA VERMELHO

350 ML

08658

COLORGIN ARTE URBANA CINZA CLARO 400 ML

400 ML

02061

COLORGIN LUMINOSA VIOLETA

350 ML

08659

COLORGIN ARTE URBANA CINZA LONDRES 400 ML

400 ML

CÓDIGO METALIK

EMBALAGEM

09114

COLORGIN ARTE URBANA FRAMBOESA 400ML

400 ML

00732

COLORGIN METALIK BRONZE

350 ML

09121

COLORGIN ARTE URBANA FUME 400ML

400 ML

00004

COLORGIN METALIK COBRE

350 ML

08255

COLORGIN ARTE URBANA LARANJA 400 ML

400 ML

00001

COLORGIN METALIK CROMADO

350 ML

08662

COLORGIN ARTE URBANA LILAS 400 ML

400 ML

00733

COLORGIN METALIK DOURADO

350 ML

08650

COLORGIN ARTE URBANA MAGENTA 400 ML

400 ML

00002

COLORGIN METALIK OURO METALICO EXTERIOR

350 ML

08656

COLORGIN ARTE URBANA MARROM TABACO 400 ML

400 ML

02593

COLORGIN METALIK OURO METALICO INTERIOR

350 ML

08664

COLORGIN ARTE URBANA PRETO 400 ML

400 ML

00003

COLORGIN METALIK PRATA INTERIOR

350 ML

08672

COLORGIN ARTE URBANA ROSA BLUSH 400 ML

400 ML

08649

COLORGIN ARTE URBANA ROSA LIRIO 400 ML

400 ML

CÓDIGO PLÁSTICOS

EMBALAGEM

08648

COLORGIN ARTE URBANA ROSA LOTUS 400 ML

400 ML

08234

COLORGIN PLASTICO AMARELO SOL BR 350ML

350 ML

08258

COLORGIN ARTE URBANA ROXO 400 ML

400 ML

08233

COLORGIN PLASTICO BRANCO BR 350ML

350 ML

08670

COLORGIN ARTE URBANA TANGERINA 400 ML

400 ML

08232

COLORGIN PLASTICO VERMELHO MALAGUETA BR 350ML

350 ML

08669

COLORGIN ARTE URBANA VERDE ERVILHA 400 ML

400 ML

08260

COLORGIN ARTE URBANA VERDE NEON 400 ML

400 ML

CÓDIGO

USO GERAL

EMBALAGEM

09115

COLORGIN ARTE URBANA VERMELHO ACAI 400ML

400 ML

00039

COLORGIN USO GERAL ALUMÍNIO P/ RODAS

400 ML

08651

COLORGIN ARTE URBANA VERMELHO FERRARI 400 ML

400 ML

00754

COLORGIN USO GERAL BI ROSA GBR

400 ML

08652

COLORGIN ARTE URBANA VERMELHO MALAGUETA 400 ML

400 ML

00737

COLORGIN USO GERAL BI ROXO DAKAR

400 ML

08660

COLORGIN ARTE URBANA VIOLETA 400 ML

400 ML

00036

COLORGIN USO GERAL BRANCO RÁPIDO REFRIGERADOR

400 ML

09116

COLORGIN ARTE URBANA VIOLETA ESSENCIA 400ML

400 ML

00861

COLORGIN USO GERAL GRAFITE MEDIO P/ RODAS

400 ML

CÓDIGO DECOR

EMBALAGEM

00038

COLORGIN USO GERAL PRETO FOSCO

400 ML

00037

COLORGIN USO GERAL PRETO RÁPIDO

400 ML

00022

COLORGIN DECOR SPRAY - ALUMÍNIO 500

350 ML

00757

COLORGIN USO GERAL PRIMER RÁPIDO CINZA

400 ML

00708

COLORGIN DECOR SPRAY - AMARELO

350 ML

00030

COLORGIN DECOR SPRAY - AZUL ANGRA METALICO

350 ML

00711

COLORGIN DECOR SPRAY - AZUL CEU

350 ML

CENTRAL DE RELACIONAMENTO • 27 3089.3888

129

Entenda como a ÓTIMA é uma

grande parceira nas suas vendas.

Em um prazo máximo de 30 minutos, seu

pedido é transmitido para o nosso centro

1 Nossos representantes vão até

sua loja, avaliam as demandas e

fecham o pedido pelo tablet.

2 de distribuição e separado para envio.

SUA LOJA

PEDIDO

Nossa localização estratégica, e frota

dedicada, garantem que seu pedido seja

3 entregue em até 24h na Grande Vitória e

Mais um cliente feliz.

48h no interior do Espírito Santo.

4

SUA LOJA

CENTRAL DE RELACIONAMENTO

27 3089.3888

www.otimaatacado.com.br

/otimaatacadoes

/atacadootima

arizona.flow

PDF/X-4 ISO

QUALIDADE

POR DENTRO,

POR FORA

E PARA TODA VIDA.

Todos os produtos Docol são produzidos

e testados atendendo normas internacionais

de qualidade. Por isso a Docol oferece Garantia

TORNEIRA PARA

Toda Vida em seus produtos.

LAVATORIO DE MESA TRIÒ

00500906

`

TORNEIRA PARA LAVATORIO

ACB. PARA VALVULA DÈ

`

DE MESA BICO ALTA TRIO

DESCARGA SALVAGUA BOX

00503206

00566806

1_Único com 3 anéis

de vedação (evita

vazamentos)

2_Anéis de borracha

nitrílica (maior

durabilidade)

3_Vedante não

ACABAMENTO

ACABAMENTO PARA

ACB. PARA VALVULA DÈ

encapsulado

PARA REGISTRO

REGISTRO TRIO

DESCARGA ESPECIAL GELO

(evita deformação)

00449606

00501906

POLAR

01500121

4_Haste não

ascendente

5_Liga de latão

(100% dentro das

Normas ABNT)

4

TORNEIRA PARA COZINHA

TORNEIRA PARA

VALVULA DE DESCARGA 1 1/2’’

`

DE PAREDE PERTUTTI

COZINHA DE PAREDE PERTUTTI

01021500

1

00266606

00266606

2

5

3

REGISTRO DE PRESSAO

˜

DOCOL BASE

CAIXA KIT ACESSORIOS

`

TORNEIRA PARA LAVATORIÒ

DOCOLIDEA

DE MESA PRESSMATIC ALFA

VALVULÀ

25140500 1/2’’

00586306

00446106

DE SUCCAO

˜

25140600 3/4’’

300106000

`

51517_220x297.indd 1

4/22/16 6:41 PM

Agencia: NBS SP | Cliente: DURATEX

Processado por arizona.flow em Fri Apr 22 18:44:11 2016

BLACK YELLOW MAGENTA CYAN

www.arizona.com.br +55 11 3847-1977

51517_220x297.pdf - 220.0 x 297.0 mm - pag. 1